\begin{table}%T2
\par
\caption{\label{tbl:freqs}Frequencies, amplitudes and phases derived from $B$-band light curve of \target.
Formal fitting errors on the last digit(s) are included within parentheses.}
\small
%\centering
\par
\begin{tabular}{clcclc}
\hline\hline
 & Freq. [$\mu$Hz] & Period [s] & Ampl. [mma] & Phase [rad] & $S/N$ \\ 
\hline          
$f_3$ &  6703.23(54) &   149.28 &  2.0(1) &  --0.76(18) &  12.7\\
$f_2$ &  6712.23(40) &   148.98 &  2.6(1) &  --1.32(14) &  16.7\\
$f_1$ &  6949.64(5)  &   143.89 &  6.2(1) &  --3.12(2)  &  40.5\\
\hline                                   
\end{tabular}
\end{table}