\begin{table}%ta.1
%\centering
\par
\caption{\label{mwc137}Table of fluxes for MWC 137.} 
\small  \begin{tabular}{lllll}
\hline\hline\noalign{\smallskip}
Wavelength ($\mu m$) & Flux (Jy) & Flux error (Jy) & Beam size ($''$) & Reference / Flux type \\
\hline\noalign{\smallskip}
0.440 & 0.019 & 0.001 & 0.8 & TYCHO-2 BAND$\_$B \\
0.550 & 0.081 & 0.001 & 0.8 & TYCHO-2 BAND$\_$V \\
0.700 & 0.017 & 0.003 & 0.9 & USNO-B BAND$\_$R$\_$JOHNSON$\_$MORGAN \\
0.900 & 0.012 & 0.002 & 0.9 & USNO-B BAND$\_$I$\_$JOHNSON$\_$MORGAN \\
1.235 & 0.499 & 0.010 & 2 & BAND$\_$J$\_$2MASS \\
1.620 & 0.428 & 0.001 & 1 & Morel (1978) BAND$\_$H$\_$JOHNSON$\_$MORGAN \\
1.662 & 0.749 & 0.017 & 2 & BAND$\_$H$\_$2MASS \\
2.159 & 1.500 & 0.030 & 2 & BAND$\_$Ks$\_$2MASS \\
2.200 & 1.719 & 0.001 & 1 & Morel (1978) BAND$\_$K$\_$JOHNSON$\_$MORGAN \\
3.400 & 3 & 0 & 1 & Morel (1978) BAND$\_$L$\_$JOHNSON$\_$MORGAN \\
8.280 & 4.308 & 0.01 & 18.3 & BAND$\_$A$\_$MSX6C \\
12.000 & 10.9 & 0.1 & 30 & Hillenbrand (1992, IRAS) \\
12.130 & 4.371 & 0.010 & 18.3 & BAND$\_$C$\_$MSX6C \\
14.650 & 2.713 & 0.010 & 18.3 & BAND$\_$D$\_$MSX6C \\
21.340 & 4.834 & 0.010 & 18.3 & BAND$\_$E$\_$MSX6C \\
25.000 & 25.7 & 0.1 & 30 & Hillenbrand (1992, IRAS) \\
60.000 & 245.0 & 1.0 & 60 & Hillenbrand (1992, IRAS) \\
100 & 519.0 & 1.0 & 120 & Hillenbrand (1992, IRAS) \\
350 & 4 & 1 & 18.5 & Mannings (1994) \\
450 & 1.66 & 0.25 & 18.3 & Mannings (1994) \\
750 & 0.300 & 0.060 & 18.0 & Mannings (1994) \\
800 & 0.370 & 0.050 & 17.0 & Mannings (1994) \\
1100 & 0.095 & 0.014 & 18.8 & Mannings (1994) \\
1300 & 0.090 & 0.013 & 19.8 & Mannings (1994) \\
1400 & 0.0071 & $6\times 10^{-4}$ & $3.05 \times 1.78$ & Our data \\
2700 & 0.0041 & $2.0\times10^{-4}$ & $6.2\times3.63$ & Our data \\
7000 & 2.35 $10^{-3}$ & $1.3\times10^{-4}$ & $2.21\times 1.66$ & Our data \\
13~000 & 0.0024 & $5 \times 10^{-4}$ & $5.18 \times 3.19$ & Our data \\
36~000 & $5.7 \times 10^{-4}$ & $5 \times 10^{-5}$ & 0.3 & Skinner (1993) \\
60~000 & $<$$6.0 \times 10^{-4}$ & -- & 1.7 & Skinner (1993) \\
 \hline
\end{tabular}
%\vspace*{2mm}
\end{table}