\begin{table}%t1
%\centering
\par
\caption{\label{table}Properties of the 3 massive UCDs detected in our survey,
ordered by magnitude. Errors are given in parentheses. ``CCOS'' in the
object identifier stands for Centaurus Compact Object Survey, see also
Mieske et~al. (\cite{Mieske07}). The last column gives a 2$\sigma$
upper limit to the half-light radius in pc estimated from HST WFPC2
archival imaging. }
\begin{tabular}{c|cccccccc}
\hline\hline 
ID & RA (J2000) & Dec (J2000)&$V_0$ & $(V-R)_0$ & $(V-I)_{\rm 0,estimated}$&  $v_{\rm rad}$ [km~s$^{-1}$]& $R$ &$r_{\rm h}$ [pc]\\
\hline
 CCOS J192.129-41.401 & 12:48:30.88 & --41:24:04.96 & 21.15 &  0.51 &  0.77 &   2650 (47) & 8.06 & \\
CCOS J192.200-41.334 & 12:48:48.01 & --41:20:01.52 & 21.22 &  0.64 &  1.03 &   2061 (76) & 5.79 & $\la$8--9\\ 
  CCOS J191.958-41.258 & 12:47:49.93 & --41:15:28.04 & 21.34 &  0.90 &  1.52 &   3185 (60) & 5.94 & \\ 
 \hline
\end{tabular}
\end{table}