\begin{table}%t3
\caption{\label{bestprm}Parameters of the model of the best fit of the visibility data and estimated uncertainties. Some parameters are poorly constrained and lack an error bar (see Sect.~3.4 for further details).}
\par
%\centering
\small
\begin{tabular}{c c}
\hline
\hline
Parameter & Value\\
\hline
%& \\[-8pt]
$R_{\rm in}$ [AU] &		$\rm 6.0^{+0.5}_{-1.5}$\\
$i$ &				${50^\circ}^{+10^\circ}_{-20^\circ}$ \\
$\alpha$ &			$\rm 2.0^{+0.3}_{-0.3}$\\
$\beta$ &			$0.7$\\
$h_{100}$ [AU] &		$\rm 3.5^{+2.0}_{-1.5}$\\
$\log (M_{\rm d}/M_\odot$) &	$-3.5$\\
${M_{\rm am. C}}/{M_{\rm d}}$ & $\rm 0.6^{+0.2}_{-0.4}$\\[2pt]
\hline
\end{tabular}
\end{table}