\begin{table}%t3
\caption{\label{tab:parameters}Stellar parameters as determined from the different methods.}
\par
%\centering
\small
\begin{tabular}{ccccccccccrlrcl}
\hline\hline
 Object              &
  $(V-I)_{0}$        &
  $I_{0}$            &
  $V_{0}$            & 
  $M_{\rm V}$        &  
  $d$                & 
  $T_{\rm eff}$      & 
  $\log g$           &  
  $\xi_{\rm t}$      &  
  Mass               & 
\multicolumn{2}{c}{$\log \epsilon({\rm Fe})$}       & 
 [Fe/H]              &             
  Age                \\
                     & 
 $\rm [mag]$         & 
 $\rm [mag]$         & 
 $\rm [mag]$         & 
 $\rm [mag]$         &  
 $\rm [kpc]$         & 
 $\rm [K]$           &  
 $\rm [cgs]$         &   
 $\rm [\kms]$        &    
 $\rm [M_{\odot}]$   &  
 \ion{Fe}{i}         &  
 \ion{Fe}{ii}        &
                     &  
 $\rm [Gyr]$         &
  \\  
\hline
OGLE-2008-BLG-209S &    --  &    --  & 18.35  &     3.83    &  8.0  & 5243  &  3.82  &   1.01 & 1.02 & 7.24 & 7.24 & $-0.33$ & 8.5 &  Method 1   \\
   $''$     &  0.73  & 17.05  & 17.68  &     3.16    &  8.0  & 5307  &  3.69  &   1.13 & 1.31 & 7.26 & 7.12 & $-0.31$ & 3.8 &  Method 2   \\
   $''$     &        &        &        &             &       & 5250  &  3.60  &   1.40 &      & 7.04 & 7.04 & $-0.42$ &     &  Method 3   \\
   $''$     &        &        &        &             &       & 5325  &  3.60  &   1.30 &      & 7.16 & 7.16 & $-0.32$ &     &  Method 4   \\
\hline
OGLE-2006-BLG-265S &    --  &    --  & 19.10  &     4.58    &  8.0  & 5486  &  4.24  &   1.17 & 1.05 & 8.02 & 8.01 & $ 0.44$ & 7.5 &  Method 1   \\
   $''$     &  0.68  & 18.11  & 18.69  &     4.17    &  8.0  & 5526  &  4.11  &   1.25 & 1.10 & 8.02 & 7.91 & $ 0.44$ & 7.0 &  Method 2   \\
   $''$     &        &        &        &     4.30    &       & 5650  &  4.40  &   1.20 &      & 8.05 & 8.07 & $ 0.56$ &     &  \cite{johnson2007}        \\
\hline
MOA-2006-BLG-099S &    --  &    --  & 19.35  &     4.83    &  8.0  & 5741  &  4.47  &   0.84 & 1.12 & 7.96 & 7.95 & $ 0.39$ &  *  &  Method 1   \\
   $''$     &  0.74  & 18.17  & 18.81  &     4.29    &  8.0  & 5852  &  4.32  &   1.03 & 1.18 & 7.99 & 7.81 & $ 0.42$ & 2.8 &  Method 2   \\
   $''$     &        &        &        &     4.50    &       & 5800  &  4.40  &   1.50 &      &      &      & $ 0.36$ &     &  \cite{johnson2008}        \\
\hline
OGLE-2007-BLG-349S &    --  &    --  & 19.35  &     4.83    &  8.0  & 5229  &  4.18  &   0.78 & 0.94 & 7.96 & 7.95 & $ 0.41$ &13.0 &  Method 1   \\
   $''$     &  0.78  & 18.72  & 19.40  &     4.88    &  8.0  & 5210  &  4.18  &   0.76 & 0.93 & 7.96 & 7.96 & $ 0.40$ &13.7 &  Method 2   \\
   $''$     &        &        &        &             &       & 5480  &  4.50  &   1.00 &      & 8.02 &      & $ 0.51$ &     &  \cite{cohen2008}   \\
\hline
\end{tabular}
\end{table}