\begin{table}%t16
\caption{\label{108100}HD 108100.}
%\centering
\small
\begin{tabular}{rrrrrrrrrr}
 \hline\hline
 HD 108100 & & &  $U$ & $B1$ & $B$ & $B2$ & $V1$ & $V$ & $G$ \\ 
 \hline
 & Mean magnitudes: &  &     7.9628 &     7.5625 &     6.5931 &     7.9882 &     7.8371 &     7.1152 &     8.2101 \\ 
 & Errors:          &  &     0.0007 &     0.0008 &     0.0008 &     0.0007 &     0.0006 &     0.0006 &     0.0006 \\ 
 \hline
 & Amplitude errors: &  &     0.0010 &     0.0011 &     0.0011 &     0.0010 &     0.0009 &     0.0009 &     0.0009 \\ 
 \hline
%&&&&&&&&& \\[-8pt]
HD 108100 & Frequency (${\rm d}^{-1}$) & Period($d$) &$U$ & $B1$ & $B$ & $B2$ & $V1$ & $V$ & $G$ \\ 
 \hline
 $f_1$      &      1.40134 &      0.71360 &     0.0076 &     0.0124 &     0.0118 &     0.0109 &     0.0084 &     0.0085 &     0.0074 \\ 
 Errors      &      0.00007 &      0.00004 \\ 
 & Amplitude ratios: & &       0.61 &       1.00 &       0.95 &       0.88 &       0.68 &       0.69 &       0.60 \\ 
 & Errors:           & &       0.09 &       0.13 &       0.12 &       0.12 &       0.10 &       0.09 &       0.09 \\ 
 \hline
 $f_2$      &      1.32572 &      0.75431 &     0.0064 &     0.0104 &     0.0098 &     0.0091 &     0.0072 &     0.0065 &     0.0061 \\ 
 Errors      &      0.00008 &      0.00005 \\ 
 & Amplitude ratios: & &       0.61 &       1.00 &       0.94 &       0.88 &       0.69 &       0.63 &       0.59 \\ 
 & Errors:           & &       0.11 &       0.15 &       0.14 &       0.14 &       0.12 &       0.11 &       0.11 \\ 
 \hline
 $f_3$      &      1.36559 &      0.73228 &     0.0039 &     0.0047 &     0.0045 &     0.0049 &     0.0036 &     0.0032 &     0.0029 \\ 
 Errors      &      0.00017 &      0.00009 \\ 
 & Amplitude ratios: & &       0.81 &       0.96 &       0.93 &       1.00 &       0.74 &       0.65 &       0.60 \\ 
 & Errors:           & &       0.26 &       0.30 &       0.29 &       0.30 &       0.25 &       0.23 &       0.22 \\ 
 \hline
\end{tabular}
\end{table}