\begin{table}%t2
\caption{Delay times to the sub-mm/mm bands 
relative to the \mbox{NIR/X-ray} flare times as derived from our modeling.
\label{delaydata}}
\par
%
\par
%\centering
\par
\begin{tabular}{lccccccc}\hline \hline 
Component & NIR/      &340~GHz & 43~GHz  & Delay& Delay   \\
          & X-ray     &    &     &  340~GHz &  43~GHz   \\ \hline
$\alpha$  & 3.3       & 4  & 6   &  0.7     &2.7   \\
$\beta$   & 3.8       &5.5 &11.5 &  1.7     &7.7   \\
$\gamma$  & 8.3       & 9  &13   &  0.7     &4.7   \\
$\delta$  & 10.4      & 11 &16   &  0.6     &5.6   \\
$\epsilon$& 1.6       & 2  & 9   &  0.4     &7.4   \\
$\zeta$   & 0.7       & 1  & 5   &  0.3     &4.3   \\
$\eta$    & $\sim$9.0 & 10 &15   &  1.0     &6.0   \\
\hline 
\end{tabular}
\end{table}