\begin{table}%t9
 %\centering
\par
\caption{\label{tab:lup_new}New candidate members of Lupus~1, 3, and 4.}
\small \begin{tabular}{lccccccccccccccccl}
\hline\hline
Object & $R_{\rm C}$ & $I_{\rm C}$ & $z_{\rm WFI}$ & $J$ & $H$ & $K_S$ & $[3.6]$ & [4.5] & [5.8] & [8.0] & [24]& $A_V$ & $T_{\rm eff}$ & $L$ & $M$ & age & Notes \\
 & & & & & & & & & & & & (mag) & (K) & (L$_\odot$) & ($M_\odot$) & (Myr) & \\
\hline
\multicolumn{17}{c}{\it Lupus 1}\\
153652.8-340956 &   14.00 & 12.08 & 11.59 & 10.39 &  9.50 &  9.19 &       &       &       &       &  8.92 &  1.0 &  3400 &  0.31 &  0.45 &  2.   & \\
153654.1-342307 &   13.88 & 12.45 & 12.11 & 10.99 & 10.17 &  9.94 &       &       &       &       &       &  0.3 &  3700 &  0.15 &  0.62 & 12.8  & \\
153659.4-341425 &   13.53 & 11.83 & 11.34 & 10.31 &  9.53 &  9.26 &       &       &       &       &  9.37 &  0.2 &  3300 &  0.26 &  0.30 &  1.1  & \\
153701.1-332255 &   16.53 & 14.26 & 13.43 & 12.23 & 11.66 & 11.31 &       &       &       &       &       &  0.4 &  2900 &  0.039 &  0.07 & 1.4  & \\
153703.1-331927 &   16.54 & 14.35 & 13.60 & 12.40 & 11.83 & 11.55 &       &       &       &       &       &  0.4 &  3000 &  0.034 &  0.07 & 1.6  & \\
153709.9-330129 &   18.17 & 15.65 & 14.72 & 13.49 & 12.82 & 12.47 &       &       &       &       &       &  0.6 &  2800 &  0.013 &  0.05 &  4.  & \\
153735.0-340240 &   16.83 & 14.98 & 14.43 & 13.20 & 12.49 & 12.24 &       &       &       &       &       &  0.2 &  3100 &  0.017 &  0.09 & 6.4  & \\
153736.0-345902 &   13.90 & 12.29 & 11.92 & 10.67 &  9.86 &  9.63 &       &       &       &       &  9.37 &  0.7 &  3600 &  0.21 &  0.57 &  6.4  & \\
153742.9-332034 &   13.65 & 11.77 & 11.24 &  9.95 &  9.18 &  8.97 &  8.77 &  8.84 &  8.75 &  8.65 &  9.11 &  0.8 &  3300 &  0.39 &  0.40 &  1.   & \\
153745.7-342920 &   13.64 & 11.56 & 10.88 &  9.74 &  9.07 &  8.85 &       &       &       &       &  8.93 &  0.2 &  3000 &  0.39  &   --   & $<$1 & \\
153750.9-332722 &   13.76 & 12.03 & 11.54 & 10.36 &  9.57 &  9.32 &  9.26 &  9.30 &  9.18 &  9.04 &  9.32 &  0.6 &  3400 &  0.27 &  0.45 &  2.5  & \\
153753.2-343256 &   13.87 & 12.35 & 11.95 & 10.82 & 10.03 &  9.81 &  9.66 &  9.73 &  9.66 &  9.54 & 10.13 &  0.4 &  3600 &  0.17 &  0.50 &  6.3  & \\
153756.8-342117 &   13.78 & 12.23 & 11.96 & 10.79 & 10.03 &  9.84 &       &       &       &       &  9.67 &  0.2 &  3600 &  0.16 &  0.57 &  8.9  & \\
153805.7-341535 &   13.50 & 11.66 & 11.18 & 10.03 &  9.26 &  9.08 &       &       &       &       &  9.07 &  0.2 &  3200 &  0.32 &  0.30 &  1.   & \\
153808.7-343557 &   13.62 & 11.88 & 11.40 & 10.28 &  9.45 &  9.23 &  9.11 &  9.18 &  9.04 &  8.98 &  9.16 &  0.5 &  3400 &  0.29 &  0.35 &  1.3  & \\
153815.5-350342 &   18.23 & 16.04 & 15.22 & 13.87 & 13.08 & 12.68 &       &       &       &       &       &  1.2 &  3000 &  0.011 &  0.08 &  8.  & \\
153820.2-350215 &   13.70 & 12.05 & 11.60 & 10.41 &  9.60 &  9.34 &       &       &       &       &  9.42 &  0.6 &  3500 &  0.27 &  0.40 &  2.   & \\
153821.4-341519 &   13.91 & 12.40 & 12.13 & 10.95 & 10.18 &  9.96 &       &       &       &       &       &  0.3 &  3700 &  0.15 &  0.57 & 10.1  & \\
153824.8-340629 &   13.64 & 11.52 & 10.79 &  9.50 &  8.64 &  8.43 &       &       &       &       &  8.23 &  0.8 &  3000 &  0.60  &   --   & $<$1 & \\
153831.6-331031 &   13.90 & 12.19 & 11.77 & 10.43 &  9.56 &  9.29 &  9.18 &  9.25 &  9.15 &  9.02 &       &  1.3 &  3700 &  0.31 &  0.62 &  4.   & \\
153837.4-342202 &   17.25 & 15.25 & 14.66 & 13.39 & 12.80 & 12.59 &       &       &       &       &       &  0.3 &  3100 &  0.013 &  0.1  & 10.  & \\
153859.5-343458 &   13.44 & 11.54 & 11.00 & 10.00 &  9.48 &  9.24 &  9.13 &  9.09 &  9.04 &  8.97 &  9.31 &  0.2 &  3400 &  0.31 &  0.45 &  2.   & \\
153900.3-345534 &   13.40 & 11.76 & 11.36 & 10.20 &  9.47 &  9.23 &  9.11 &       &  9.08 &       &  9.28 &  0.2 &  3400 &  0.28 &  0.40 &  1.8  & \\
153902.1-342040 &   13.76 & 12.26 & 11.88 & 10.74 &  9.90 &  9.71 &  9.58 &  9.69 &  9.57 &  9.46 &  9.40 &  0.5 &  3700 &  0.19 &  0.70 & 11.3  & \\
153905.2-341210 &   13.47 & 11.69 & 11.11 &  9.96 &  9.16 &  8.90 &       &  8.95 &       &  8.68 &  9.17 &  0.6 &  3300 &  0.39 &  0.40 &  1.   & \\
153921.8-340020 &   18.81 & 16.29 & 15.38 & 13.99 & 13.27 & 12.84 &       &       &       &       &       &  0.5 &  2700 &  0.0082 & 0.04 &  5.  & \\
153922.3-334909 &   13.89 & 12.27 & 11.92 & 10.82 &  9.97 &  9.76 &       &       &       &       &  9.74 &  0.4 &  3600 &  0.18 &  0.57 &  8.   & \\
153929.0-340339 &   13.89 & 12.36 & 12.01 & 10.88 & 10.12 &  9.89 &       &       &       &       &       &  0.3 &  3600 &  0.16 &  0.50 &  7.2  & \\
153929.2-334322 &   13.82 & 12.06 & 11.55 & 10.40 &  9.56 &  9.32 &  9.23 &       &  9.16 &       &  9.25 &  0.7 &  3400 &  0.27 &  0.35 &  1.4  & \\
153930.5-342058 &   13.66 & 12.02 & 11.63 & 10.49 &  9.80 &  9.60 &  9.49 &  9.55 &  9.42 &  9.34 &  9.34 &  0.2 &  3500 &  0.21 &  0.40 &  2.8  & \\
153932.6-335205 &   13.98 & 12.24 & 11.75 & 10.49 &  9.55 &  9.31 &       &       &       &       &  9.30 &  1.2 &  3600 &  0.30 &  0.57 &  3.6  & \\
153933.2-350151 &   13.90 & 12.29 & 11.79 & 10.58 &  9.70 &  9.45 &       &       &       &       &  9.42 &  1.1 &  3700 &  0.26 &  0.60 &  5.   & \\
153940.8-333941 &   14.04 & 12.44 & 11.99 & 10.90 & 10.22 &  9.97 &  9.84 &       &  9.77 &       &  9.58 &  0.2 &  3500 &  0.15 &  0.40 &  5.   & \\
153943.8-341506 &   13.61 & 11.96 & 11.62 & 10.49 &  9.85 &  9.69 &       &  9.65 &       &  9.44 &  9.60 &  0.2 &  3600 &  0.20 &  0.57 &  6.4  & \\
153950.8-340456 &   14.13 & 12.57 & 12.19 & 11.02 & 10.16 &  9.93 &       &       &       &       &       &  0.7 &  3700 &  0.16 &  0.70 & 15.9  & \\
153955.6-341103 &   13.57 & 11.83 & 11.30 & 10.17 &  9.35 &  9.14 &       &       &       &       &  9.22 &  0.4 &  3300 &  0.31 &  0.35 &  1.1  & \\
154006.1-343224 &   13.78 & 12.20 & 11.82 & 10.62 &  9.92 &  9.67 &       &       &       &       &       &  0.3 &  3500 &  0.19 &  0.40 &  3.2  & \\
154006.9-332331 &   13.45 & 11.75 & 11.46 & 10.29 &  9.42 &  9.15 &       &       &       &       &  9.03 &  0.6 &  3600 &  0.31 &  0.50 &  2.5  & \\
154009.4-342734 &   13.48 & 11.68 & 11.23 & 10.04 &  9.56 &  9.32 &  9.25 &  9.22 &  9.15 &  9.05 &  9.31 &  0.2 &  3400 &  0.28 &  0.40 &  1.8  & \\
154013.7-340142 &   13.81 & 12.21 & 11.88 & 10.73 & 10.05 &  9.85 &       &       &       &       &  9.92 &  0.2 &  3600 &  0.17 &  0.50 &  6.3  & \\
\hline
154018.5-342614 &   14.44 & 12.61 & 12.18 & 11.01 & 10.43 & 10.16 &  9.85 &  9.83 &  9.77 &  9.67 &  9.67 &  0.2 &  3300 &  0.12 &  0.25 &  2.5  & 1 \\
154033.8-342607 &   13.47 & 11.79 & 11.46 & 10.27 &  9.65 &  9.47 &  9.46 &  9.44 &  9.35 &  9.23 &  9.47 &  0.2 &  3500 &  0.24 &  0.57 &  5.   & \\
154038.1-341417 &   13.50 & 11.97 & 11.70 & 10.46 &  9.66 &  9.44 &  9.38 &  9.49 &  9.34 &  9.28 &  9.33 &  0.5 &  3700 &  0.25 &  0.62 &  5.7  & \\
154040.4-340455 &   13.56 & 11.54 & 10.80 &  9.81 &  9.18 &  8.99 &  8.94 &  8.98 &  8.87 &  8.80 &  9.03 &  0.2 &  3100 &  0.37  &   --   & $<$1 & \\
154047.2-331347 &   13.99 & 12.50 & 12.20 & 11.06 & 10.22 &  9.95 &       &       &       &       &  9.79 &  0.4 &  3700 &  0.15 &  0.62 & 12.8  & \\
154053.7-342745 &   13.74 & 12.24 & 11.97 & 10.76 & 10.03 &  9.87 &  9.75 &  9.84 &  9.73 &  9.60 &  9.71 &  0.3 &  3700 &  0.17 &  0.70 & 14.3  & \\
154116.9-335544 &   13.71 & 12.07 & 11.67 & 10.50 &  9.77 &  9.57 &  9.49 &  9.52 &  9.49 &  9.31 &  9.66 &  0.2 &  3400 &  0.21 &  0.35 &  2.2  & \\
154118.0-344301 &   13.60 & 11.83 & 11.18 & 10.10 &  9.37 &  9.13 &  8.98 &  8.99 &  8.91 &  8.83 &  9.06 &  0.3 &  3200 &  0.31 &  0.30 &  1.   & \\
154122.0-344015 &   14.23 & 12.61 & 12.10 & 11.08 & 10.41 & 10.21 & 10.03 &  9.99 &  9.90 &  9.86 &  9.55 &  0.2 &  3500 &  0.12 &  0.40 &  6.4  & \\
154126.7-334732 &   13.69 & 12.02 & 11.32 & 10.14 &  9.39 &  9.15 &  9.01 &  9.19 &  8.96 &  8.92 &  9.37 &  0.7 &  3300 &  0.32 &  0.40 &  1.4  & \\
154130.4-342759 &   13.44 & 11.81 & 11.39 & 10.13 &  9.27 &  9.03 &  8.90 &  9.03 &  8.90 &  8.79 &  9.08 &  1.0 &  3700 &  0.38 &  0.75 &  4.5  & \\
154136.0-342532 &   13.58 & 11.96 & 11.54 & 10.33 &  9.47 &  9.19 &  9.15 &  9.23 &  9.08 &  9.02 &  9.24 &  0.9 &  3700 &  0.32 &  0.70 &  5.   & \\
154136.0-343818 &   13.47 & 11.83 & 11.37 & 10.40 &  9.74 &  9.56 &  9.48 &  9.56 &  9.46 &  9.32 &  9.60 &  0.3 &  3700 &  0.24 &  0.62 &  6.3  & \\
154144.0-343530 &   13.40 & 11.50 & 10.77 &  9.83 &  9.23 &  8.98 &  8.82 &  8.83 &  8.70 &  8.66 &  8.73 &  0.2 &  3200 &  0.37 &  0.30 &  1.   & \\
154148.3-350145 &   14.34 & 12.60 & 12.07 & 11.04 & 10.44 & 10.22 &       &       &       &       &       &  0.3 &  3500 &  0.12 &  0.50 & 10.   & \\
154149.5-334517 &   14.13 & 12.56 & 12.17 & 10.86 & 10.08 &  9.77 &  9.66 &  9.67 &  9.56 &  9.49 & 10.05 &  0.9 &  3700 &  0.19 &  0.62 &  8.9  & \\
154151.7-335809 &   13.50 & 11.52 & 10.95 &  9.51 &  8.74 &  8.43 &  8.28 &  8.36 &  8.24 &  8.14 &  8.28 &  1.3 &  3300 &  0.66 &  0.45 &  1.   & \\
154201.8-345449 &   13.48 & 11.96 & 11.70 & 10.51 &  9.75 &  9.53 &       &       &       &       &  9.52 &  0.2 &  3600 &  0.21 &  0.50 &  4.5  & \\
154257.6-341928 &   15.02 & 13.21 & 12.73 & 11.23 & 10.41 & 10.09 &  9.80 &  9.77 &  9.65 &  9.62 &  9.79 &  1.7 &  3700 &  0.16 &  0.70 & 15.9  & \\
154344.5-335834 &   13.37 & 11.62 & 11.14 & 10.03 &  9.29 &  9.10 &  9.00 &  9.02 &  8.93 &  8.83 &  9.15 &  0.2 &  3300 &  0.32 &  0.40 &  1.4  & \\
154401.4-340229 &   13.65 & 12.09 & 11.71 & 10.52 &  9.65 &  9.41 &  9.33 &  9.45 &  9.31 &  9.19 &  9.46 &  0.8 &  3700 &  0.26 &  0.60 &  5.   & \\
154406.0-343238 &   13.66 & 12.06 & 11.75 & 10.60 &  9.78 &  9.57 &  9.49 &  9.59 &  9.47 &  9.31 &  9.60 &  0.4 &  3600 &  0.21 &  0.50 &  4.5  & \\
154433.9-335254 &   17.16 & 15.05 & 14.31 & 13.05 & 12.48 & 12.13 &       & 11.41 &       & 10.60 &  8.94 &  0.5 &  3000 &  0.019 &  0.08 & 4.5  & \\
154624.2-343443 &   13.73 & 12.00 & 11.67 & 10.39 &  9.61 &  9.35 &       &       &       &       &       &  0.6 &  3500 &  0.26 &  0.40 &  2.   & \\
154637.4-344307 &   14.69 & 12.70 & 12.03 & 10.71 &  9.70 &  9.31 &       &       &       &       &       &  2.0 &  3500 &  0.30 &  0.45 &  2.   & \\
\multicolumn{17}{c}{\it Lupus 3}\\
160509.3-391203 &  14.00 & 12.00 & 11.80 & 10.57 &  9.90 &  9.66 &       &       &       &       &      &  0.2 &   3300 &  0.34  &   0.35 &   1.  &                                 \\
160523.5-391849 &  17.58 & 14.32 & 11.95 & 10.37 &  9.41 &  8.83 &       &       &       &       &      &  3.5 &   2500 &  0.82  &    --   & $<$1  &  2, 5 \\
160528.6-384621 &  17.06 & 14.74 & 13.93 & 12.63 & 12.07 & 11.78 &       &       &       &       &      &  0.5 &   2900 &  0.048 &   0.09 &   2.  &                                 \\
160539.8-384811 &  15.63 & 13.82 & 13.33 & 12.01 & 11.45 & 11.17 &       &       &       &       &      &  0.3 &   3200 &  0.084 &   0.2  &   2.5 &                                 \\
160545.8-385454 &  17.10 & 14.97 & 14.31 & 12.97 & 12.35 & 12.04 &       &       &       &       &      &  0.2 &   2900 &  0.034 &   0.07 &   1.6 &                                 \\
160603.8-385952 &  16.99 & 15.02 & 14.48 & 13.18 & 12.61 & 12.35 &       &       &       &       &      &  0.3 &   3100 &  0.028 &   0.11 &   4.5 &                                 \\
160624.4-392158 &  13.82 & 11.77 & 11.48 & 10.11 &  9.38 &  9.12 &       &       &       &       &      &  0.5 &   3200 &  0.56  &    --   & $<$1  &                                 \\
160632.4-391541 &  15.74 & 13.92 & 13.47 & 12.17 & 11.62 & 11.26 &       &       &       &       &      &  0.2 &   3200 &  0.073 &   0.175&   2.5 &                                 \\
160644.6-390432 &  15.19 & 13.10 & 12.34 & 11.08 & 10.47 & 10.16 &       &       &       &       &      &  0.2 &   2900 &  0.19  &    --   &  $<$1 &                                 \\
160647.5-391624 &  16.64 & 14.62 & 14.01 & 12.76 & 12.23 & 11.92 &       &       &       &       &      &  0.3 &   3100 &  0.042 &   0.15 &   4.5 &                                 \\
\hline
160658.7-390405 &  17.52 & 15.19 & 14.28 & 12.95 & 12.33 & 12.00 &       &       &    & &      &  0.4 &   2800 &  0.035 &   0.06 &   1.  &                       \\
160659.5-390605 &  13.98 & 11.96 & 11.67 & 10.49 &  9.74 &  9.52 &  9.38 &  9.46 &  9.38 &  9.25 &       &  0.2 &   3200 &  0.38  &   0.3  &   1.  & \\
160659.6-384601 &  16.96 & 15.06 & 14.47 & 13.16 & 12.61 & 12.36 &       &       &       &       &       &  0.3 &   3100 &  0.028 &   0.11 &   4.5 &                                 \\
160702.6-391203 &  14.05 & 11.86 & 11.42 & 10.04 &  9.07 &  8.75 &  8.54 &  8.74 &  8.56 &  8.48 &  8.53 &  1.7 &   3400 &  0.90  &   0.57 &   1.  &                                \\
160713.5-383525 &  15.25 & 13.03 & 12.21 & 10.71 &  9.70 &  9.37 &       &       &       &       &        &  2.6 &   3400 &  0.58  &   0.57 &   1.1 &                                 \\
160727.1-391601 &  14.02 & 12.07 & 11.63 & 10.51 & 10.00 &  9.79 &  9.64 &       &  9.56 &       &  9.75 &  0.3 &   3400 &  0.34  &   0.45 &   1.8 &                                \\
160732.3-383508 &  13.84 & 11.74 & 10.97 &  9.82 &  9.03 &  8.78 &       &       &       &       &  8.61 &  0.2 &   2900 &  0.68  &    --   &  $<$1 &                                \\
160734.3-392742 &  13.85 & 11.84 & 11.15 &  9.84 &  9.07 &  8.80 &       &       &       &       &  8.56 &  0.9 &   3100 &  0.77  &    --   &  $<$1 &                                \\
160735.3-392507 &  14.17 & 12.37 & 12.08 & 10.88 & 10.17 &  9.99 &  9.86 &  9.89 &  9.82 &  9.75 &  9.55 &  0.2 &   3400 &  0.26  &   0.4  &   2.  &                                \\
160745.9-385245 &  13.84 & 12.18 & 11.75 & 10.58 &  9.90 &  9.65 &       &  9.65 &       &  9.43 &  9.88 &  0.3 &   3400 &  0.34  &   0.35 &   1.  &                                \\
160747.4-392606 &  14.03 & 12.08 & 11.60 & 10.33 &  9.58 &  9.37 &  9.29 &  9.37 &  9.28 &  9.22 &  9.25 &  0.3 &   3100 &  0.43  &    --   &  $<$1 &                                 \\
160755.2-390603 &  18.83 & 16.06 & 14.89 & 13.14 & 12.12 & 11.65 & 11.22 & 10.98 & 10.88 & 10.79 & 10.69 &  3.1 &   2900 &  0.065 &   0.1  &   1.3 &  3  \\
160758.7-392109 &  14.02 & 12.08 & 11.51 & 10.08 &  9.28 &  8.98 &  8.92 &  8.96 &  8.85 &  8.78 &  8.84 &  1.5 &   3400 &  0.73  &   0.57 &   1.  &                                \\
160800.2-390259 &  16.50 & 14.30 & 13.47 & 12.14 & 11.45 & 11.07 & 10.59 & 10.18 &  9.88 &  9.12 &  6.58 &  0.7 &   2900 &  0.085 &   0.1  &   1.3 &                                \\
160804.6-384558 &  13.67 & 11.72 & 11.26 & 10.07 &  9.41 &  9.24 &       &       &       &       &  9.17 &  0.2 &   3200 &  0.52  &    --   &  $<$1 &                                \\
160804.8-390449 &  19.62 & 16.76 & 15.59 & 13.91 & 13.17 & 12.61 & 12.11 & 12.01 & 11.86 & 11.80 & 10.26 &  1.9 &   2700 &  0.021 &   0.04 &   1.1 &                                \\
160817.4-390105 &  15.21 & 13.31 & 12.69 & 11.47 & 10.83 & 10.53 & 10.35 & 10.22 & 10.15 & 10.07 &  9.82 &  0.3 &   3100 &  0.15  &   0.2  &   1.3 &  3  \\
160822.8-390058 &  14.48 & 12.75 & 12.26 & 11.03 & 10.29 & 10.02 &  9.87 &  9.52 &  9.09 &  8.39 &  6.85 &  0.6 &   3400 &  0.25  &   0.45 &   2.8 &  1 \\
160825.2-384055 &  14.75 & 13.06 & 12.62 & 11.40 & 10.72 & 10.49 &       &       &       &       &        &  0.2 &   3300 &  0.16  &   0.25 &   1.8 &  1  \\
160826.8-384101 &  17.71 & 15.67 & 14.74 & 13.40 & 12.76 & 12.44 &       &       &       &       &  8.55 &  0.6 &   2900 &  0.025 &  0.06  &   2.  &                                 \\
160827.8-390040 &  14.22 & 12.44 & 12.01 & 10.79 & 10.05 &  9.80 &  9.78 &  9.61 &  9.52 &  9.41 & 11.30 &  0.4 &   3300 &  0.30  &   0.3  &   1.  &  1 \\
160829.3-383551 &  14.65 & 12.45 & 11.72 & 10.28 &  9.30 &  8.83 &       &       &       &       &  8.18 &  2.4 &   3400 &  0.86  &   0.57 &   1.  &                                \\
160831.6-384729 &  13.68 & 11.64 & 10.92 &  9.67 &  8.92 &  8.62 &  8.18 &  8.22 &  8.04 &  7.73 &  6.00 &  0.5 &   3000 &  0.84  &    --   &  $<$1 &  1  \\
160833.0-385222 &  17.96 & 15.37 & 14.45 & 12.85 & 12.25 & 11.90 & 11.40 & 11.35 & 11.23 & 11.15 & 11.17 &  0.7 &   2700 &  0.039 &    --   &  $<$1 &                                \\
160835.5-390035 &  16.23 & 13.88 & 13.05 & 11.52 & 11.00 & 10.61 & 10.14 & 10.04 &  9.97 &  9.88 &  9.41 &  0.6 &   2800 &  0.13  &    --   &  $<$1 & 3 \\
160836.2-392302 &  13.83 & 11.78 & 11.09 &  9.88 &  9.04 &  8.65 &  8.34 &  7.07 &  7.10 &  6.11 &  4.11 &  0.9 &   3100 &  0.83  &    --   &  $<$1 &  1, 4 \\
160836.4-393119 &  15.77 & 12.90 & 11.57 &  9.84 &  8.74 &  8.27 &       &       &       &       &  6.23 &  3.6 &   2900 &  1.58  &    --   &  $<$1 &                                \\
160839.8-392922 &  15.44 & 13.49 & 12.95 & 11.73 & 11.15 & 10.92 &       &       &       &       &        &  0.3 &   3200 &  0.11  &   0.25 &   2.8 &                                 \\
160844.3-374443 &  13.25 & 11.50 & 11.07 &  9.83 &  9.12 &  8.90 &       &       &       &       &        &  0.3 &   3300 &  0.69  &   0.45 &   1.  &                                 \\
160846.4-393347 &  14.03 & 12.22 & 11.76 & 10.59 &  9.90 &  9.70 &       &       &       &       &  9.50 &  0.3 &   3300 &  0.34  &   0.35 &   1.  &                                \\
160846.6-384112 &  14.81 & 12.57 & 11.78 & 10.26 &  9.24 &  8.89 &       &       &       &       &  7.65 &  2.7 &   3400 &  0.90  &   0.57 &   1.  &                                \\
160855.6-392316 &  14.00 & 12.20 & 11.80 & 10.45 &  9.68 &  9.47 &  9.30 &  9.39 &  9.31 &  9.21 &  9.36 &  0.8 &   3400 &  0.44  &   0.5  &   1.4 &                                \\
160855.8-382633 &  16.76 & 14.78 & 14.12 & 12.96 & 12.40 & 12.11 &       &       &       &       &        &  0.3 &   3100 &  0.035 &   0.15 &   5.6 &                                 \\
160857.3-392849 &  14.15 & 12.40 & 12.06 & 10.80 & 10.04 &  9.88 &  9.73 &  9.74 &  9.78 &  9.62 &  9.52 &  0.4 &   3400 &  0.29  &   0.35 &   1.3 &                                \\
160903.7-385610 &  13.64 & 11.75 & 11.23 &  9.86 &  9.03 &  8.81 &  8.69 &  8.80 &  8.60 &  8.48 &  8.65 &  1.2 &   3400 &  0.85  &   0.57 &   1.  &                                \\
160903.8-384126 &  13.75 & 11.89 & 11.38 & 10.09 &  9.32 &  9.11 &       &       &       &       &  8.90 &  0.8 &   3300 &  0.61  &   0.45 &   1.  &                                \\
160904.6-392112 &  14.61 & 12.52 & 11.99 & 10.68 & 10.01 &  9.76 &  9.50 &  9.45 &  9.34 &  9.21 &  9.15 &  0.3 &   3000 &  0.29  &    --   &  $<$1 &                                \\
160908.5-390213 &  13.75 & 11.97 & 11.49 & 10.33 &  9.72 &  9.47 &  9.37 &  9.26 &  9.18 &  9.10 &  9.42 &  0.2 &   3300 &  0.41  &   0.4  &   1.  &                                \\
160915.7-385139 &  15.42 & 13.72 & 13.28 & 12.04 & 11.50 & 11.22 & 10.89 & 10.85 & 10.77 & 10.68 & 11.38 &  0.3 &   3400 &  0.083 &   0.35 &   8.  &                                 \\
160917.6-392537 &  13.91 & 11.98 & 11.42 & 10.13 &  9.45 &  9.19 &  9.13 &  9.11 &  9.06 &  8.93 &  9.27 &  0.4 &   3100 &  0.51  &    --   &  $<$1 &                                 \\
160920.8-384510 &  18.29 & 15.97 & 15.05 & 13.55 & 12.91 & 12.59 &       &       &       &       &        &  0.7 &   2800 &  0.02  &   0.055&   1.8 &                                  \\
160922.8-385550 &  14.58 & 12.62 & 12.04 & 10.83 & 10.21 &  9.91 &  9.59 &  9.61 &  9.54 &  9.47 &  9.39 &  0.3 &   3100 &  0.26  &   0.2  &   1.  &                                 \\
\hline
160928.0-384853 &  16.08 & 13.99 & 13.25 & 11.93 & 11.32 & 11.00 &       &       &       &       &        &  0.2 &   2900 &  0.089 &   0.1  &   1.3 &                                  \\
160937.4-391044 &  14.42 & 12.73 & 12.27 & 11.04 & 10.36 & 10.06 & 10.00 &  9.83 &  9.73 &  9.68 &  9.91 &  0.3 &   3300 &  0.23  &   0.3  &   1.4 &                                 \\
160939.5-384431 &  13.86 & 11.76 & 11.09 &  9.80 &  8.98 &  8.73 &  8.57 &  8.70 &  8.58 &  8.49 &  8.54 &  0.7 &   3000 &  0.78  &    --   &  $<$1 &                                 \\
161001.1-384315 &  13.75 & 11.94 & 11.44 & 10.19 &  9.52 &  9.27 &  9.18 &  9.32 &  9.17 &  9.08 &  9.23 &  0.3 &   3200 &  0.48  &   0.3  &   1.  &                                 \\
161013.5-384208 &  13.88 & 12.09 & 11.62 & 10.31 &  9.53 &  9.28 &  9.20 &  9.35 &  9.17 &  9.06 &  8.96 &  0.9 &   3400 &  0.52  &   0.5  &   1.  &                                 \\
161013.9-375958 &  16.66 & 14.37 & 13.50 & 12.23 & 11.55 & 11.24 & 10.87 &       & 10.69 &       & 10.44 &  0.3 &   2800 &  0.069 &    --   &  $<$1 &                                 \\
161030.6-383151 &  17.39 & 15.18 & 14.45 & 13.27 & 12.70 & 12.37 & 12.04 & 12.07 & 11.77 & 11.78 & 11.87 &  0.4 &   3000 &  0.028 &   0.075&   2.8 &                                 \\
161033.2-383023 &  14.20 & 12.40 & 11.83 & 10.77 & 10.08 &  9.83 &  9.62 &  9.75 &  9.49 &  9.50 &  9.17 &  0.3 &   3300 &  0.30  &   0.3  &   1.  &                                 \\
161034.3-381031 &  13.60 & 11.95 & 11.57 & 10.39 &  9.67 &  9.42 &  9.30 &  9.40 &  9.21 &  9.23 &  9.28 &  0.3 &   3400 &  0.42  &   0.45 &   1.1 &                                 \\
161036.7-380927 &  13.25 & 11.51 & 11.06 &  9.71 &  9.00 &  8.74 &  8.57 &  8.71 &  8.59 &  8.49 &  8.46 &  0.7 &   3400 &  0.84  &   0.57 &   1.  &                                 \\
161041.9-382304 &  14.32 & 12.56 & 12.13 & 10.93 & 10.28 & 10.04 &  9.99 &  9.83 &  9.77 &  9.64 &  9.67 &  0.2 &   3300 &  0.24  &   0.35 &   1.8 &                                 \\
161059.0-391451 &  15.72 & 13.87 & 13.43 & 12.13 & 11.52 & 11.26 & 10.95 &       & 10.81 &       & 10.60 &  0.3 &   3200 &  0.077 &   0.175&   2.3 &                                 \\
161114.8-384618 &  13.86 & 11.76 & 11.27 &  9.76 &  9.00 &  8.85 &  8.74 &  8.84 &  8.71 &  8.63 &  8.60 &  0.9 &   3100 &  0.78  &    --   &  $<$1 &                                 \\
161138.1-384135 &  14.17 & 12.42 & 11.99 & 10.91 & 10.23 & 10.05 &  9.83 &  9.84 &  9.77 &  9.71 &  9.67 &  0.2 &   3400 &  0.25  &   0.45 &   2.8 &  1 \\
161200.9-383625 &  13.94 & 12.15 & 11.60 & 10.38 &  9.57 &  9.32 &  9.18 &  9.25 &  9.14 &  9.07 &  9.08 &  0.9 &   3400 &  0.50  &   0.5  &   1.1 &                                 \\
161207.6-381324 &  14.42 & 12.72 & 12.28 & 10.92 & 10.26 &  9.99 &  9.73 &  9.69 &  9.62 &  9.50 &  9.50 &  0.6 &   3400 &  0.26  &   0.4  &   2.  &                                 \\
161210.4-390904 &  18.74 & 16.21 & 15.31 & 13.85 & 13.17 & 12.78 & 12.30 & 12.24 & 12.10 & 12.03 &        &  0.5 &   2700 &  0.016 &   0.04 &   1.1 &                                  \\
161225.6-381742 &  17.42 & 15.30 & 14.63 & 13.10 & 12.54 & 12.19 & 11.79 & 11.67 & 11.59 & 11.46 &        &  0.8 &   3000 &  0.033 &   0.07 &   1.8 &                                  \\
161229.0-383420 &  13.58 & 11.58 & 11.00 &  9.55 &  8.73 &  8.45 &  8.34 &  8.36 &  8.24 &  8.14 &  8.20 &  1.6 &   3400 &  1.23  &    --   &  $<$1 &                                 \\
161353.9-380850 &  17.26 & 13.97 & 11.98 & 10.78 &  9.66 &  9.10 &  8.24 &  8.19 &  7.95 &  7.75 &  7.20 &  2.  &   2400 &  0.47  &    --   &  $<$1 &  2  \\
\multicolumn{17}{c}{\it Lupus 4}\\
155904.6-421058 & 18.66 & 16.07 & 15.10 & 13.42 & 12.79 & 12.36 &       &       &       &       &       & 1.5 & 2800 & 0.016 & 0.05 & 3.2  & \\
155921.8-412808 & 13.54 & 11.68 & 11.48 & 10.24 &  9.56 &  9.35 &       &       &       &       &       & 0.2 & 3400 & 0.26  & 0.35 & 1.6  & \\
160019.2-415635 & 15.81 & 13.82 & 13.30 & 11.91 & 11.38 & 11.10 & 10.78 & 10.69 & 10.59 & 10.50 & 10.30 & 0.4 & 3100 & 0.051 & 0.15 & 3.2  & \\
160336.9-414209 & 17.39 & 14.29 & 12.93 & 11.40 & 10.19 &  9.64 &       &       &       &       &       & 3.4 & 2800 & 0.22  &  --   & $<$1 & \\
160359.6-421356 & 18.26 & 15.95 & 15.23 & 13.74 & 13.12 & 12.74 &       &       &       &       &       & 0.8 & 2900 & 0.011 & 0.06 & 5.7  & \\
160348.1-414044 & 16.76 & 14.50 & 13.77 & 12.42 & 11.87 & 11.51 &       &       &       &       &       & 0.4 & 2900 & 0.032 & 0.07 & 2.   & \\
\hline
\end{tabular}
\medskip
{\it Notes}:\\
1: Weak T Taur star in \citet{Kra97}.\\
2: Most likely background giant.\\
3: X-ray source in \citet{Gon06}.\\
4: Detected at 70~$\mu$m; [70] = 0.62.\\
5: High residual fit (over 0.2~mag rms).\\
\end{table}