\begin{table}%t1
\caption{\label{table1}The thermal conductive cooling timescale at $T_{\rm p}=10^7$~K for a range of loop half-lengths and plasma densities.} 
\par
\small%\centering
\par
\begin{tabular}{lccccc}
\hline\hline
&$n=10^7$~cm$^{-3}$&$10^8$&$10^9$&$10^{10}$\\
\hline
$L_{1/2}=10^9$~cm&$\tau_{\rm C}=0.0131$~s&0.131&1.31&13.1\\
$2 \times 10^9$&0.0524&0.524&5.24&52.4\\
$4 \times 10^9$&0.2095&2.095&20.95&209.5\\
$8 \times 10^9$&0.8379&8.379&83.79&837.9\\
\hline
\end{tabular}
\end{table}