\begin{table}%t1
%%\centering

\par
\caption{\label{flusso}Flux obtained by Cintala and our model in the range 5--100~$\mu$m.}
\small \begin{tabular}{ccc}
\hline \hline \noalign{\smallskip}
{\bf Model} & $\frac{\vec{N}}{\mathbf{year}}$ &   $\frac{\mathbf{g}}{\mathbf{cm^{2}\cdot s}}$\\
\hline\noalign{\smallskip}
Cintala's model & $4.073 \times 10^{16}$   &  $1.402\times 10^{-16}$\\
Our's model & $3.104 \times 10^{18}$   &  $2.382\times 10^{-14}$\\
\hline
\end{tabular}
\end{table}