\begin{table}%t2
%\renewcommand\arraystretch{1.25}
%\setlength\tabcolsep{4.5pt}
%\centering
\small
\caption{\label{t2}Summary of the two Gaussian fits to the correlation profile and 
the CaII H line.}
\begin{tabular}{ccccccc}
 \hline\hline
Profile  & $\lambda_{0}$ & {\it FWHM}  & Max  & $\lambda_{0}$ & {\it FWHM} & Max \\
 Type    &      (\AA)    &  (\AA)&       flux   &      (\AA)    &  (\AA)&     flux   \\
\hline
Correlation&  --1.27      & 0.395 & 0.880    &   --0.888      & 0.314 & 0.17 \\
CaII H   &    3967.04     & 0.24  & 0.879    &   3967.26     & 0.23  &  2.96   \\
\hline
\end{tabular}
\end{table}