\begin{table}%t9
\caption{\label{line-iras18162}Observed line emissions parameters for IRAS18162$-$2048.} 
%\centerline
 {\small \begin{tabular}{lcccccccc}
\hline \hline
{\bf Species} & Transition  & $\Delta\varv$ & $T_{\rm mb}$ & $\sigma$ & $\int$$T_{\rm mb}$$\delta\varv$ & $\Delta\varv_{3\sigma}$ & $\Delta\varv_{1/2}$ & Comment \\ 
 & & km~s$^{-1}$ & K & mK & K.km~s$^{-1}$ &  km~s$^{-1}$ &  km~s$^{-1}$ &\\
\hline
CS & 3--2   & & &  &  & & & no obs. \\
 &5--4  & 2.93(0.01) & 7.41 & 38 & 22.10(0.03) & 6.78 & 2.91 &   \\
 & 7--6  & 2.46(0.04) & 4.05 & 237 & 9.3(0.1) & 4.08 & 2.14 &  \\
%\hline
C$^{34}$S & 3--2   & & &  &  & & & no obs. \\
 & 7--6   & 2.1(0.3) & 0.47 & 116 & 0.87(0.06) & 1.17 & 2.63 &  \\
%\hline
SO & $3_4{-}2_3$  & 2.24(0.01) & 5.27 & 40 & 12.00(0.04) & 6.46 & 2.10 &   \\
 & $5_6{-}4_5$  & 2.20(0.01) & 5.22 & 45 & 11.31(0.03) & 5.42 & 4.84 &   \\
 &$6_5{-}5_4$  & 2.24(0.03) & 2.80 & 79 & 6.25(0.08) & 4.52 & 1.78 &   \\
 & $8_8-7_7$  & 2.2(0.2) & 1.04 & 230 & 1.7(0.1) & 1.1 & 1.7 &  \\
%\hline
$^{34}$SO & $3_4{-}2_3$   & & & 38 & $<$0.007 & & & no det. \\   
 &$8_8-7_7$ &   &  & 123 &  $<$0.006 &  &  & no det.  \\
%\hline
SO$_2$ 	& $5_{1,5}{-}4_{0,4}$  & 3.3(0.1) & 0.72 & 34 & 1.86(0.04) & 6.46 & 1.68 &  \\
& $10_{0,10}{-}9_{1,9}$  & 1.69(0.07) & 0.43 & 33 & 0.75(0.02) & 2.39 & 1.75 & $^a$  \\
& $11_{1,11}{-}10_{0,10}$ ) & 3.86(0.08) & 1.14 & 35 & 4.20(0.07) & 7.88 & 3.49 &   \\
& $14_{0,14}{-}13_{1,13}$  & 3.63(0.09) & 1.02 & 59 & 3.71(0.07) & 5.81 & 3.68 &  \\
& $18_{0,18}{-}17_{1,17}$  & 1.2(0.5) & 0.13 & 75 & 0.16(0.05) &  & 3.7? & tentative det. \\ 
& $28_{4,24}-28_{3,25}$   &  &  & 42 & $<$0.007 &  &  &  no det. \\
%\hline
$^{34}$SO$_2$ 	& $5_{1,5}{-}4_{0,4}$    & & & 38 & $<$0.007 & & & no det. \\  %\hline
OCS 			& $8{-}7$   & 3.5(0.1) & 0.12 & 8 & 0.40(0.01) & 7.17 & 3.10 &   \\
& 13--12  & 4.7(0.5) & 0.23 & 51 & 0.75(0.06) & 2.85 & 6.26 &   \\
 & 19--18  & 5.12(0.08) & 0.55 & 33 & 2.53(0.04) & 7.55 & 4.55 & \\
% \hline
OC$^{34}$S & 8--7&   & & 9 & $<$0.003 &  & & no det.  \\
% \hline
H$_2$S 	& $1_{1,0}{-}1_{0,1}$  & 3.46(0.02) & 2.92 & 50 & 10.00(0.05) & 8.0 & 3.36 & $^a$  \\
& $2_{2,0}{-}2_{1,1}$   & 3.2(0.3) & 0.24 & 24 & 0.78(0.07) & 4.26 & 2.97 & $^b$ \\
% \hline
H$_2$$^{34}$S & $1_{1,0}{-}1_{0,1}$  & 2.3(0.1) & 0.60 & 65 & 1.15(0.06) & 2.58 & 1.55 &   \\
\hline 
\end{tabular}}
\medskip 
$^a$ Self-absorption at  $\varv_{\rm source}$; $^b$ unidentified lines @ $216.701026$ and $216.71.6$~GHz (25 and 4~km~s$^{-1}$).
\end{table}