\begin{table}%t5
%\centering
\par
\caption{\label{CO_gauss}Parameters for the three Gaussians used to fit the CO feature.}
\begin{tabular}{c c c }
\hline  \hline
Gaussian   &   Peak position (cm$^{-1}$)      & {\it FHWM} (cm$^{-1}$)      \\  
\hline
1         &2103.0--2102.4         & 6.1--6.4     \\
2         &2094.6--2093.8          &2.1-2.5   \\
3          &2093.4--2092.7        & 8.4--8.7   \\
\hline
\end{tabular}
\end{table}