\begin{table}%t2
\caption{\label{multiT-fit2}Parameters of the 3-T fit to the spectrum of \object{TW Hya}. 
  }
    \leavevmode
    \footnotesize
    %\centerline
{\begin{tabular}[h]{lcc}
    \hline
      \hline
      Parameters &  &\\
      \hline\noalign{\smallskip}
      log$N_{\rm H}$[cm$^{-2}]$  & 20.72(.09)& \\
      distance           & 53.7~pc&\\
      w-shift            & 1.2e-4&\\
      broadening         &  $287~{\rm km~s}^{-1}$ \\
      $T_1$[keV]         & 0.127(.012)& \\
      $T_2$[keV]         & 0.264(.007)& \\
      $T_3$[keV]         & 1.45(.43) &\\ 
      $T_{\rm Bb}$[keV]      & 0.187(.016)&\\
      \hline\noalign{\smallskip}      
      $EM_1$[10$^{51}$cm$^{-3}$]  & 11.5(3.3)&\\
      $EM_2$[10$^{51}$cm$^{-3}$]  & 26.3(2.1)&\\
      $EM_3$[10$^{51}$cm$^{-3}$]  &  9.3(2.5)&\\
      $Area_{\rm Bb}$[10$^{8}$cm$^{2}$]& 3.57(1.7)& \\ 
      \hline\noalign{\smallskip}
      $n_{\rm e}$\ion{O}{vii}[10$^{11}$cm$^{-3}$] & 6.3(2.6)&\\
      $n_{\rm e}$\ion{Ne}{ix}[10$^{12}$cm$^{-3}$] & 2.5(0.4)&\\
      \hline \noalign{\smallskip}     
      $L_{\rm X1}$[10$^{30}$erg/s]$^a$& 0.14(.04) &\\
      $L_{\rm X2}$[10$^{30}$erg/s]    & 0.83(.07) &\\
      $L_{\rm X3}$[10$^{30}$erg/s]    & 0.29(.08)&\\
      $L_{\rm Bb}$[10$^{30}$erg/s]    & 0.43(.20)&\\
      $L_{\rm Tot}$[10$^{30}$erg/s]   & 1.69(.22)&\\
      \hline\noalign{\smallskip}
                                 &          & $A$/O\\      
      C                          & 1.26(.23)&1.26(.24)\\
      N                          & 2.87(.31)&2.87(.33)\\
      O                          & 1.00(.04)&1.00(.06)\\
      Ne                         & 10.3(.34)&10.3(.53)\\
      Mg                         & 1.61(.89)&1.61(.89)\\
      Si                         & 1.35(.43)&1.35(.43)\\
      Fe                         & 0.61(.06)&0.61(.06)\\
      Ni                         & 0.70(.49)&0.70(.49)\\
      \hline \noalign{\smallskip}     
      $\chi^2$/d.o.f.            &1564/1536&  \\
      $\chi^2_{\rm red}$             & 1.02 &\\
      \hline 
      \end{tabular}}
\smallskip
\par
Notes: Statistical 1$\sigma$ errors are in parentheses. The emitted luminosity ($L_{\rm X}$) is given in
  the range from 0.3 to 10~keV.
\end{table}