\begin{table}
\caption{\label{tab:Corot3data}\textit{Harps} data for CoRoT-3b.} 
\small \begin{tabular}{ccc}
\hline \hline\noalign{\smallskip}
jdb (-~2~450~000)&RV $({\rm km~ s}^{-1})$& $\sigma_{RV}$ $({\rm km~ s}^{-1})$\\
\hline
4704.488668&--55.88060&0.04256\\
4704.508308&--55.93619&0.02717\\
4704.527948&--55.92654&0.03160\\
4704.547600&--56.05763&0.02704\\
4704.567240&--56.17478&0.02755\\
4704.586880&--56.31702&0.02778\\
4704.606520&--56.35708&0.02753\\
4704.626160&--56.41691&0.02421\\
4704.645800&--56.48690&0.02394\\
4704.665440&--56.48597&0.02551\\
4704.685277&--56.58493	&0.02760\\
\hline
\end{tabular}
\end{table}