\begin{table}%t3
\caption{\label{RVfittable}Parameters of the \corots\ system derived from the combined MCMC analysis.} 
%\centerline
 {\small \begin{tabular}{l l l}
\hline  \hline
Fitted parameters & Value & Units \\
\hline\noalign{\smallskip}
 ${(R_{\rm p}/R_{\rm star})^2}$& $\rm 0.01461^{ +0.00030}_{-0.00032}$& \\[1mm]
 $t_T$  &$\rm 0.0290 ^{+0.00038} _{ -0.00053}$& \\[1mm]
 $b$ & $\rm 0.755^{+  0.017}_ {-0.022}$& \\[1mm]
 $K$  &$\rm 59.1^{+6.2}_{-3.1}$ & \ms \\[1mm]
$e \cos\omega$ &$\rm -0.057^{+0.048}_{-0.020}$& \\[1mm]
$e \sin\omega$ &$\rm -0.071^{+0.147} _{-0.130}$& \\[1mm]
\hline
\end{tabular}}
\medskip
$t_T$ denotes the transit duration given in fraction of phase; $b$ the impact parameter and $K$ the RV~semi-amplitude.
\end{table}