\begin{table}%t2
\caption{\label{tbl_prop}Properties of NLTT~11748.}
\par
\small%\centerline
 {
\begin{tabular}{llc}
\hline\hline
Parameters & Measurement & Reference \\
\hline
RA (J2000.0)        & 03 45 16.83 & 1 \\
Dec (J2000.0)        & +17 48 08.71 & 1 \\
Effective temperature & $8540\pm50$ K & 2 \\
Surface gravity       & $6.20\pm0.15$ & 2 \\
Mass                  & $0.167\pm0.005~M_\odot$ & 2 \\
$M_V$                 & $9.72\pm0.33$ & 2 \\
Distance              & $199\pm40$ pc & 2 \\
$\varv_{\rm rad}$     & $415\pm50$ km s$^{-1}$ & 2 \\
Proper motion         & $\mu_{\rm RA} = 0.2361\pm0.0043\arcsec$ yr$^{-1}$ & 1,3 \\
                      & $\mu_{\rm Dec} = -0.1792\pm0.0043\arcsec$ yr$^{-1}$ & 1,3 \\
Kinematics            & $U = -406\pm57$ km s$^{-1}$ & 2 \\
                      & $V = -219\pm66$ km s$^{-1}$ & 2 \\
		      & $W = -161\pm35$ km s$^{-1}$ & 2 \\
\hline               
\end{tabular}}
\medskip
References: (1) \citet{sal2003}; (2) this work; (3) \citet{lep2005}.
\end{table}