\begin{table}%t4
\caption{\label{table23Mo}Wind properties of the 23 \Mo\ model.}
%\centerline
 {\begin{tabular}{lcccc}     % 7 columns 
\hline\hline       
Stage & $\Delta t$ & log \Mdot   &  $\Delta M$  & $ {v}_{\infty}$ \\ 
      &  (Myr)    &   (\Mo/yr)    &    (\Mo)     &     (km~s$^{-1}$)          \\
\hline                    
  MS  & 6.374 & --6.87 & 0.81 & 2000  \\  
  RSG & 0.622 & --4.77 & 8.96 & 260 (*) \\
\hline                  
\end{tabular}}
\par
\smallskip
{ {Note: (*) The reported value was changed in the hydrodynamical simulations (see text for details).}}
\end{table}