\begin{table}%t2
  \caption{\label{table:obs-results}Results from TIMMI2 photometry and spectroscopy.}
  %\setlength\tabcolsep{6.2pt}
  %\centerline
{\begin{tabular}{lcccccccr}
    \hline
    \hline\\[-3mm]
    Object              &  Origin
    &  Airmass (N-spec) &  $t_{{\rm int}}$  (N-spec)      & 
                           $F_{{\rm N1}}$                 &
                           $F_{{\rm N10.4}}$              &
                           $F_{{\rm N11.9}}$              & Ref. &
                           N-spec features                   \\ 
                                                & 
    &                   &  [min]                             &      
                           [Jy]                              & 
                           [Jy]                              &
                           [Jy]                              &      &
                                                             \\\hline\\[-3mm]
			 HD 3003             &  technical
			 &  1.2              &      24          
    &  0.58 $\pm$ 0.03  &  0.32 $\pm$ 0.03  &  0.20 $\pm$ 0.10      & ...
    &  stellar                          \\
HD 34~700            &  technical
    &  1.2--1.5     &      60         
    &  ...               &  ...               &  0.79 $\pm$ 0.29      & ...
    &  PAH                              \\
HD 80~951            &  077.C-0054
    &  1.7              &      53       
    &  ...               &  ...               &  0.44 $\pm$ 0.03      & (1)
    &  stellar                          \\
HD 109~085           &  archive
    &  1.1              &      12       
    &  ...               &  ...               &  1.51 $\pm$ 0.24      & (2)
    &  stellar                          \\
HD 123~356           &  archive
    &  1.0              &      18       
    &  ...               &  1.51 $\pm$ 0.05  &  1.68 $\pm$ 0.06      & ...
    &  silicate emission                \\
HD 143~006           &  archive
    &  1.1              &      24       
    &  ...               &  ...               &  0.86 $\pm$ 0.06      & (1)
    &  silicate emission                \\
HD 155~555           &  077.C-0054
    &  1.3              &      58       
    &  ...               &  ...               &  0.46 $\pm$ 0.03      & ...
    &  stellar                          \\
HD 181~296           &  077.C-0054
    &  1.2              &      64       
    &  0.59 $\pm$ 0.05  &  ...               &  ...                   & ...
    &  stellar                          \\
HD 190~073           &  technical
    &  1.5              &      12       
    &  ...               &  ...               &  7.16 $\pm$ 0.43      & (1)   
    &  silicate emission                \\       
HD 319~139           &  077.C-0054
    &  1.0              &     160       
    &  ...               &  ...               &  0.36 $\pm$ 0.03      & ...
    &  silicate emission                \\
CD-43 344           &  technical
    &  1.1              &      24       
    &  3.78 $\pm$ 0.05  &  3.82 $\pm$ 0.05  &  3.04 $\pm$ 0.05      & ...
    &  silicate emission                \\
FU Ori              &  technical  
    &  1.4              &      20       
    &  ...               &  6.00 $\pm$ 0.03  &  5.61 $\pm$ 0.03      & ...
    &  silicate emission                \\
KK Oph              &  archive
    &  1.2              &      12       
    & 10.09 $\pm$ 0.05  &  ...               & 10.71 $\pm$ 0.08      & ...
    &  silicate emission                \\
PDS 144 N           &  077.C-0054
    &  1.0              &      32       
    &  ...               &  ...               &  1.74 $\pm$ 0.09      & (3)
    &  PAH                              \\
PDS 144 S           &  077.C-0054
    &  1.0              &      13       
    &  ...               &  ...               &  2.49 $\pm$ 0.13      & (3)
    &  silicate emission                \\
    \noalign{\smallskip}
    \hline
  \end{tabular}}
\par
           Results from TIMMI2 photometry and spectroscopy are merged in
           this table. The airmass and TIMMI2 integration times refer to 
           $N$-band spectroscopy. Mid-IR photometry was obtained in the 
           specified TIMMI2 filters with central wavelengths 8.6~$\mu$m 
           (N1), 10.3~$\mu$m (N10.4) and 11.6~$\mu$m (N11.9). Errors 
           represent the accuracy of the aperture photometry. 
           Where no own measurements were available, e.g, for some archive
           data, we adapted data from (1)~IRAS, (2)~Wyatt et~al.\ (\cite{Wyatt}) or (3)~Perrin et~al.\ (\cite{Perrin}).
\end{table}