\begin{table}%t3
%\centering
\par
\caption{\label{Kes79xrayfit}The best-fit of the global X-ray spectrum of Kes 79. The elemental
abundances listed are those left free parameters in the model.}
\par
\small
\begin{tabular}{lccc}  
\hline\hline 
Parameters  & Values  \\
\hline
$kT$ (keV)              & $0.70 \pm 0.01$ \\
$\tau$ (s~cm$^{-3}$)  & $6.2 \pm 0.2 \times 10^{10}$ \\
Ne abundance          & $0.67 \pm 0.02$ \\
Mg abundance          & $0.65 \pm 0.02$ \\
Si abundance          & $0.66 \pm 0.01$ \\
S abundance           & $\rm 1.25^{+0.05}_{-0.06}$  \\
Ar abundance          & $\rm 5.0^{+0.8}_{-1.6}$ \\
Fe abundance          & $\rm 0.54^{+0.01}_{-0.02}$ \\
$N_{\rm H}$ (cm$^{-2}$)   & $\rm 1.52^{+0.01}_{-0.02} \times 10^{22}$ \\
\hline
\end{tabular}
\end{table}