\begin{table}%t4
%\centering
\par
\caption{\label{G352xrayfit}The best$-$fit model of the global X-ray spectrum of G352.7$-$0.1. The 
elemental abundances listed are those considered to be free parameters of 
the model.}
\par
\small
\begin{tabular}{lccc}  
\hline \hline
Parameters  & Values  \\
\hline
 $kT$ (keV) & 1.9 $\pm$ 0.2 \\
 $\tau$ (s~cm$^{-3}$)  & $4.5 \pm 0.5 \times 10^{10}$ \\
 Si abundance  & 2.4 $\pm$ 0.2 \\
 S abundance  & 3.8 $\pm$ 0.3  \\
 Ar abundance & 4.7 $\pm$ 1.2 \\
 $N_{\rm H}$ (cm$^{-2}$) & 2.6 $\pm$ 0.3 $\times$ 10$^{22}$ \\
\hline
\end{tabular}\vspace*{2mm}
\end{table}