\begin{table}%t2
\caption{\label{tab2}The average large and small separations $\langle \Delta \nu_{0} \rangle$,
$\langle d_{02} \rangle$, $\langle d_{13} \rangle$ for models with $Z_{i}$~=~0.025.}
\par
%\centering
\small
\begin{tabular}{c| r| r r r|r r r}
\hline\hline
&&&&&&& \\[-8pt]
  $M$&Age&\multicolumn{3}{c|}{No -- diffusion}&\multicolumn{3}{c}{Diffusion}\\
$(M_{\odot})$&(Gyr)&$\langle \Delta \nu_{0} \rangle$&
$\langle d_{02} \rangle$& $\langle d_{13} \rangle$&$\langle \Delta \nu_{0} \rangle$& $\langle d_{02} \rangle$& $\langle d_{13} \rangle$\\
 \hline
0.8& 0.5&199.40&  17.02&  27.43&   199.13&  17.00& 27.40\\
0.8& 1.0&197.97&  16.64&  26.90&   197.45&  16.60& 26.83\\
0.8& 1.5&196.87&  16.33&  26.47&   195.97&  16.26& 26.35\\
0.8& 2.0&195.89&  16.05&  26.07&   194.75&  15.95& 25.92\\
0.8& 2.5&194.97&  15.77&  25.68&   193.34&  15.63& 25.47\\
0.8& 3.0&194.03&  15.49&  25.30&   192.16&  15.32& 25.04\\
0.8& 3.5&193.15&  15.21&  24.91&   190.93&  15.01& 24.61\\
0.8& 4.0&192.20&  14.93&  24.52&   189.72&  14.70& 24.18\\
0.8& 4.5&191.30&  14.65&  24.14&   188.47&  14.38& 23.73\\
0.8& 5.0&190.43&  14.37&  23.75&   187.18&  14.05& 23.29\\
0.8& 5.5&189.33&  14.07&  23.34&   185.93&  13.73& 22.84\\
0.8& 6.0&188.51&  13.79&  22.96&   184.68&  13.40& 22.39\\
0.8& 6.5&187.50&  13.49&  22.55&   183.44&  13.07& 21.94\\
0.8& 7.0&186.52&  13.20&  22.15&   182.13&  12.73& 21.47\\
0.8& 7.5&185.52&  12.90&  21.74&   180.82&  12.39& 21.00\\
0.8& 8.0&184.52&  12.59&  21.33&   179.49&  12.05& 20.53\\
0.8& 8.5&183.48&  12.29&  20.91&   178.15&  11.70& 20.05\\
0.8& 9.0&182.41&  11.98&  20.49&   176.77&  11.34& 19.57\\
0.8& 9.5&181.31&  11.66&  20.06&   175.34&  10.98& 19.08\\
0.8&10.0&180.28&  11.35&  19.63&   173.88&  10.61& 18.58\\
0.8&10.5&179.10&  11.02&  19.19&   172.47&  10.25& 18.08\\
0.8&11.0&177.95&  10.70&  18.75&   170.97&   9.87& 17.57\\
0.8&11.5&176.45&  10.35&  18.28&   169.46&   9.50& 17.06\\
0.8&12.0&175.59&  10.03&  17.86&   167.93&   9.12& 16.54\\
0.8&12.5&174.34&   9.70&  17.40&   166.29&   8.73& 16.01\\
0.8&13.0&173.07&   9.36&  16.94&   164.68&   8.34& 15.48\\
0.9& 0.5&179.29&  16.03&  25.85&   179.43&  16.03& 25.86\\
0.9& 1.0&177.66&  15.60&  25.25&   177.12&  15.55& 25.17\\
0.9& 1.5&176.17&  15.19&  24.69&   175.32&  15.11& 24.56\\
0.9& 2.0&174.74&  14.79&  24.13&   173.54&  14.67& 23.95\\
0.9& 2.5&173.33&  14.39&  23.58&   171.71&  14.23& 23.34\\
0.9& 3.0&171.86&  13.98&  23.01&   169.93&  13.78& 22.72\\
0.9& 3.5&170.38&  13.56&  22.44&   168.20&  13.33& 22.10\\
0.9& 4.0&168.89&  13.14&  21.86&   166.24&  12.86& 21.45\\
0.9& 4.5&167.33&  12.71&  21.27&   164.38&  12.39& 20.80\\
0.9& 5.0&165.69&  12.27&  20.67&   162.39&  11.90& 20.13\\
0.9& 5.5&164.01&  11.82&  20.05&   160.40&  11.42& 19.46\\
0.9& 6.0&162.27&  11.37&  19.43&   158.33&  10.92& 18.77\\
0.9& 6.5&160.61&  10.92&  18.81&   156.26&  10.42& 18.08\\
0.9& 7.0&158.77&  10.46&  18.17&   154.06&   9.91& 17.37\\
0.9& 7.5&156.94&   9.99&  17.52&   151.82&   9.40& 16.65\\
0.9& 8.0&154.95&   9.52&  16.86&   149.51&   8.89& 15.92\\
0.9& 8.5&152.94&   9.04&  16.19&   147.17&   8.37& 15.18\\
0.9& 9.0&150.85&   8.56&  15.51&   144.69&   7.85& 14.43\\
0.9& 9.5&148.69&   8.07&  14.82&   142.14&   7.33& 13.67\\
0.9&10.0&146.42&   7.59&  14.12&   139.58&   6.81& 12.91\\
0.9&10.5&144.06&   7.11&  13.41&   136.72&   6.30& 12.13\\
0.9&11.0&141.60&   6.62&  12.69&   133.87&   5.80& 11.35\\
0.9&11.5&138.99&   6.15&  11.96&   130.88&   5.32& 10.56\\
0.9&12.0&136.34&   5.68&  11.23&   127.77&   4.48&  9.79\\
0.9&12.5&133.57&   5.23&  10.50&   124.59&   4.04&  9.03\\
0.9&13.0&130.55&   4.39&   9.77&   121.42&   3.26&  8.30\\
1.0& 0.5&159.74&  14.92&  24.13&   159.36&  14.88& 24.07\\
1.0& 1.0&157.53&  14.36&  23.35&   156.72&  14.28& 23.23\\
1.0& 1.5&155.30&  13.80&  22.57&   154.20&  13.68& 22.39\\
1.0& 2.0&153.12&  13.23&  21.78&   151.60&  13.06& 21.53\\
1.0& 2.5&150.84&  12.65&  20.97&   148.93&  12.44& 20.65\\
1.0& 3.0&148.52&  12.06&  20.15&   146.18&  11.80& 19.76\\
1.0& 3.5&145.70&  11.43&  19.26&   143.40&  11.15& 18.85\\
1.0& 4.0&143.49&  10.84&  18.43&   140.64&  10.51& 17.93\\
1.0& 4.5&140.96&  10.23&  17.56&   137.48&   9.84& 16.96\\
1.0& 5.0&138.09&   9.60&  16.65&   134.35&   9.17& 15.99\\
\hline
1.0& 5.5&135.19&   8.97&  15.73&   131.15&   8.51& 15.01\\
1.0& 6.0&132.18&   8.35&  14.79&   127.77&   7.85& 14.01\\
1.0& 6.5&129.05&   7.73&  13.84&   124.11&   7.20& 12.98\\
1.0& 7.0&125.72&   7.11&  12.87&   120.80&   6.58& 11.98\\
1.0& 7.5&122.28&   6.52&  11.90&   116.87&   5.69& 10.95\\
1.0& 8.0&118.58&   5.64&  10.92&   113.13&   4.84&  9.76\\
1.0& 8.5&114.99&   4.79&   9.96&   109.26&   4.00&  8.93\\
1.0& 9.0&111.22&   3.97&   8.99&   104.68&   2.89&  7.87\\
1.1& 0.5&140.35&  13.62&  22.15&   139.95&  13.57& 22.08\\
1.1& 1.0&137.26&  12.87&  21.09&   136.42&  12.77& 20.95\\
1.1& 1.5&134.09&  12.11&  20.01&   132.86&  11.96& 19.80\\
1.1& 2.0&130.84&  11.34&  18.91&   129.21&  11.14& 18.62\\
1.1& 2.5&127.34&  10.55&  17.77&   125.42&  10.31& 17.41\\
1.1& 3.0&123.83&   9.76&  16.60&   121.60&   9.49& 16.19\\
1.1& 3.5&120.13&   8.98&  15.41&   117.42&   8.66& 14.91\\
1.1& 4.0&116.23&   8.21&  14.19&   113.19&   7.86& 13.63\\
1.1& 4.5&112.17&   7.45&  12.95&   108.88&   7.09& 12.35\\
1.1& 5.0&107.94&   6.53&  11.71&   104.59&   5.97& 11.06\\
1.1& 5.5&103.82&   5.39&  10.44&   100.03&   4.81&  9.71\\
1.2& 0.5&122.13&  12.15&  20.00&   121.76&  12.10& 19.92\\
1.2& 1.0&118.14&  11.20&  18.62&   117.14&  11.08& 18.44\\
1.2& 1.5&113.93&  10.24&  17.19&   112.49&  10.06& 16.93\\
1.2& 2.0&109.60&   9.27&  15.73&   107.64&   8.97& 15.39\\
1.2& 2.5&105.03&   8.36&  14.10&   102.82&   8.07& 13.72\\
1.2& 3.0&100.35&   7.49&  11.98&    97.84&   7.12& 12.26\\
1.2& 3.5& 95.67&   6.54&  11.14&    92.96&   6.39& 10.53\\
1.2& 4.0& 90.99&   6.40&   9.42&    87.99&   5.02&  8.98\\
1.2& 4.5& 85.14&   4.12&   7.80&    82.68&   4.13&  7.28\\
 \hline
 \end{tabular}
 \end{table}