\begin{table}%t3
\caption{\label{tab3}The average large and small separations $\langle \Delta \nu_{0} \rangle$,
$\langle d_{02} \rangle$, $\langle d_{13} \rangle$ for models with $Z_{i}$~=~0.02.}
\par
 %\centering
\small
\begin{tabular}{c| r| r r r|r r r}
\hline\hline
&&&&&&& \\[-8pt]
  $M$&Age&\multicolumn{3}{c|}{No -- diffusion}&\multicolumn{3}{c}{Diffusion}\\
$(M_{\odot})$&(Gyr)&$\langle \Delta \nu_{0} \rangle$&
$\langle d_{02} \rangle$& $\langle d_{13} \rangle$&$\langle \Delta \nu_{0} \rangle$& $\langle d_{02} \rangle$& $\langle d_{13} \rangle$\\
 \hline
0.8& 0.5&198.16&  17.24&  27.78&  197.86&  17.21&  27.74\\
0.8& 1.0&196.74&  16.84&  27.22&  196.03&  16.78&  27.13\\
0.8& 1.5&195.52&  16.50&  26.75&  194.53&  16.42&  26.62\\
0.8& 2.0&194.43&  16.18&  26.30&  193.10&  16.06&  26.12\\
0.8& 2.5&193.41&  15.87&  25.87&  191.72&  15.71&  25.64\\
0.8& 3.0&192.33&  15.55&  25.43&  190.39&  15.36&  25.15\\
0.8& 3.5&192.30&  15.23&  24.99&  188.97&  15.01&  24.66\\
0.8& 4.0&190.24&  14.91&  24.55&  187.60&  14.65&  24.16\\
0.8& 4.5&189.25&  14.59&  24.11&  186.22&  14.29&  23.66\\
0.8& 5.0&188.09&  14.26&  23.65&  184.79&  13.92&  23.16\\
0.8& 5.5&186.95&  13.92&  23.19&  183.35&  13.55&  22.64\\
0.8& 6.0&185.89&  13.59&  22.74&  181.92&  13.17&  22.13\\
0.8& 6.5&184.74&  13.25&  22.27&  180.45&  12.79&  21.60\\
0.8& 7.0&183.60&  12.90&  21.80&  178.92&  12.40&  21.07\\
0.8& 7.5&182.39&  12.55&  21.32&  177.43&  12.01&  20.53\\
0.8& 8.0&181.20&  12.20&  20.85&  175.87&  11.61&  19.98\\
0.8& 8.5&179.98&  11.84&  20.36&  174.33&  11.20&  19.43\\
0.8& 9.0&178.63&  11.48&  19.86&  172.68&  10.79&  18.87\\
0.8& 9.5&177.37&  11.11&  19.37&  171.02&  10.37&  18.30\\
0.8&10.0&175.98&  10.73&  18.86&  169.30&   9.95&  17.73\\
0.8&10.5&174.37&  10.35&  18.33&  167.57&   9.53&  17.14\\
0.8&11.0&173.04&   9.97&  17.82&  165.77&   9.10&  16.56\\
0.8&11.5&171.66&   9.59&  17.30&  163.94&   8.67&  15.96\\
0.8&12.0&170.19&   9.20&  16.77&  161.97&   8.23&  15.35\\
0.8&12.5&168.64&   8.81&  16.24&  160.12&   7.79&  14.75\\
0.8&13.0&167.06&   8.42&  15.70&  158.10&   7.35&  14.13\\
0.9& 0.5&177.87&  16.20&  26.13&  177.52&  16.17&  26.08\\
0.9& 1.0&176.01&  15.72&  25.47&  175.31&  15.65&  25.36\\
0.9& 1.5&174.37&  15.26&  24.83&  173.28&  15.16&  24.67\\
0.9& 2.0&172.70&  14.80&  24.20&  171.25&  14.66&  23.98\\
0.9& 2.5&170.97&  14.33&  23.55&  169.22&  14.15&  23.28\\
0.9& 3.0&169.27&  13.86&  22.90&  167.13&  13.63&  22.56\\
0.9& 3.5&167.36&  13.37&  22.22&  164.98&  13.11&  21.83\\
0.9& 4.0&165.66&  12.89&  21.56&  162.82&  12.57&  21.09\\
0.9& 4.5&163.81&  12.39&  20.88&  160.53&  12.03&  20.34\\
0.9& 5.0&161.84&  11.88&  20.17&  158.28&  11.48&  19.57\\
0.9& 5.5&159.86&  11.37&  19.46&  155.95&  10.92&  18.80\\
0.9& 6.0&157.76&  10.85&  18.74&  153.46&  10.35&  18.00\\
0.9& 6.5&155.62&  10.32&  18.00&  151.00&  9.79 &  17.20\\
0.9& 7.0&153.35&   9.79&  17.25&  148.35&  9.21 &  16.38\\
0.9& 7.5&151.04&   9.26&  16.49&  145.64&  8.63 &  15.54\\
0.9& 8.0&148.72&   8.72&  15.73&  142.79&  8.05 &  14.70\\
0.9& 8.5&146.08&   8.17&  14.93&  139.90&  7.48 &  13.84\\
0.9& 9.0&143.38&   7.63&  14.13&  136.86&  6.91 &  12.98\\
0.9& 9.5&140.63&   7.09&  13.32&  133.68&  6.35 &  12.10\\
0.9&10.0&137.71&   6.56&  12.50&  130.35&  5.81 &  11.55\\
0.9&10.5&134.66&   6.05&  11.68&  126.86&  4.93 &  10.36\\
0.9&11.0&131.43&   5.55&  10.85&  123.11&  4.08 &   9.50\\
0.9&11.5&128.06&   4.68&  10.04&  119.78&  3.27 &   8.69\\
1.0& 0.5&157.44&  14.98&  24.25&  156.97& 14.94 &  24.18\\
1.0& 1.0&154.87&  14.34&  23.36&  154.05& 14.26 &  23.23\\
1.0& 1.5&152.41&  13.71&  22.47&  151.12& 13.57 &  22.27\\
1.0& 2.0&149.78&  13.05&  21.56&  148.14& 12.87 &  21.29\\
1.0& 2.5&147.01&  12.38&  20.62&  145.04& 12.16 &  20.28\\
1.0& 3.0&144.22&  11.70&  19.66&  141.85& 11.43 &  19.25\\
1.0& 3.5&141.30&  11.02&  18.68&  138.83& 10.72 &  18.23\\
1.0& 4.0&138.23&  10.32&  17.68&  135.12&  9.96 &  16.52\\
1.0& 4.5&134.99&  9.62 &  16.02&  131.58&  9.23 &  16.04\\
1.0& 5.0&131.83&  8.93 &  15.62&  127.84&  8.49 &  14.37\\
1.0& 5.5&128.30&  8.23 &  13.98&  124.00&  7.77 &  13.80\\
1.0& 6.0&124.48&  7.55 &  12.53&  119.94&  7.07 &  12.65\\
1.0& 6.5&120.60&  6.89 &  11.83&  115.66&  6.40 &  11.34\\
1.0& 7.0&116.41&  6.26 &  11.28&  111.45&  5.66 &   9.96\\
\hline
1.0& 7.5&112.27&  5.54 &  10.21&  107.18&  4.82 &   9.38\\
1.1& 0.5&137.27& 13.55 &  22.09&  136.82& 13.49 &  21.96\\
1.1& 1.0&133.72& 12.70 &  20.88&  132.82& 12.59 &  20.73\\
1.1& 1.5&130.06& 11.84 &  19.65&  128.43& 11.66 &  19.38\\
1.1& 2.0&126.27& 10.97 &  18.38&  124.53& 10.76 &  18.07\\
1.1& 2.5&122.36& 10.10 &  17.03&  120.14&  9.84 &  16.66\\
1.1& 3.0&118.16&  9.22 &  15.75&  115.72&  8.93 &  15.30\\
1.1& 3.5&113.80&  8.37 &  14.28&  110.97&  8.05 &  13.82\\
1.1& 4.0&109.24&  7.47 &  13.15&  106.06&  7.14 &  12.49\\
1.1& 4.5&104.48&  6.69 &  11.48&  101.30&  6.30 &  10.88\\
1.2& 0.5&118.87&  11.97&  19.80&  118.27& 11.90 &  19.70\\
1.2& 1.0&114.35&  10.92&  18.25&  113.15& 10.77 &  18.03\\
1.2& 1.5&109.48&   9.78&  16.64&  107.73&  9.58 &  16.33\\
1.2& 2.0&104.66&   8.83&  14.99&  102.36&  8.50 &  14.50\\
1.2& 2.5& 99.48&   7.53&  13.36&   96.97&  7.39 &  12.77\\
1.2& 3.0& 94.16&   7.38&  11.38&   91.11&  6.43 &  11.04\\
1.2& 3.5& 89.07&   6.19&   9.75&   85.85&  5.13 &   9.17\\
1.2& 4.0& 81.80&   4.17&   7.96&   79.92&  4.03 &   7.30\\
\hline
\end{tabular}
\end{table}