\begin{table}%t5
\caption{\label{tab5}The average large and small separations $\langle \Delta \nu_{0} \rangle$,
$\langle d_{02} \rangle$, $\langle d_{13} \rangle$ for models with $Z_{i}$~=~0.01.}
\par
%\centering
\small
\begin{tabular}{c| r| r r r|r r r}
\hline\hline
&&&&&&& \\[-8pt]
  $M$&Age&\multicolumn{3}{c|}{No -- diffusion}&\multicolumn{3}{c}{Diffusion}\\
$(M_{\odot})$&(Gyr)&$\langle \Delta \nu_{0} \rangle$&
$\langle d_{02} \rangle$& $\langle d_{13} \rangle$&$\langle \Delta \nu_{0} \rangle$& $\langle d_{02} \rangle$& $\langle d_{13} \rangle$\\
 \hline
0.8& 0.5&198.08&  18.03&  29.06&  197.67&  18.03&  29.00\\
0.8& 1.0&196.20&  17.53&  28.36&  195.49&  17.50&  28.26\\
0.8& 1.5&194.54&  17.07&  27.72&  193.26&  16.98&  27.53\\
0.8& 2.0&192.70&  16.59&  27.05&  191.23&  16.47&  26.83\\
0.8& 2.5&191.33&  16.14&  26.43&  189.22&  15.97&  26.13\\
0.8& 3.0&189.68&  15.69&  25.78&  187.16&  15.45&  25.41\\
0.8& 3.5&188.01&  15.21&  25.12&  185.13&  14.92&  24.70\\
0.8& 4.0&186.29&  14.72&  24.45&  182.83&  14.38&  23.94\\
0.8& 4.5&184.51&  14.22&  23.77&  180.80&  13.84&  23.21\\
0.8& 5.0&182.66&  13.72&  23.08&  178.58&  13.29&  22.45\\
0.8& 5.5&180.88&  13.21&  22.39&  176.29&  12.73&  21.68\\
0.8& 6.0&178.86&  12.69&  21.67&  173.93&  12.16&  20.89\\
0.8& 6.5&176.89&  12.16&  20.95&  171.42&  11.58&  20.09\\
0.8& 7.0&174.76&  11.63&  20.22&  168.96&  11.00&  19.28\\
0.8& 7.5&172.57&  11.08&  19.47&  164.90&  10.35&  18.35\\
0.8& 8.0&170.33&  10.52&  18.72&  163.68&   9.79&  17.63\\
0.8& 8.5&167.95&   9.96&  17.94&  160.92&   9.20&  16.79\\
0.8& 9.0&165.51&   9.41&  17.16&  157.99&   8.60&  15.93\\
0.8& 9.5&162.98&   8.85&  16.37&  154.98&   8.00&  15.06\\
0.8&10.0&160.26&   8.29&  15.57&  151.82&   7.41&  14.18\\
0.8&10.5&157.42&   7.73&  14.75&  148.47&   6.83&  13.30\\
0.8&11.0&154.46&   7.18&  13.93&  145.02&   6.27&  12.41\\
0.8&11.5&151.32&   6.63&  13.10&  141.35&   5.73&  11.52\\
0.8&12.0&148.05&   6.11&  12.26&  137.49&   4.77&  10.64\\
0.8&12.5&144.55&   5.60&  11.43&  133.53&   3.86&   9.79\\
0.8&13.0&141.08&   4.64&  10.61&  129.25&   2.97&   8.97\\
0.9& 0.5&174.52&  16.71&  26.99&  174.10&  16.67&  26.93\\
0.9& 1.0&171.79&  16.03&  26.04&  170.88&  15.94&  25.91\\
0.9& 1.5&169.18&  15.36&  25.11&  167.79&  15.22&  24.90\\
0.9& 2.0&166.50&  14.68&  24.16&  164.64&  14.48&  23.87\\
0.9& 2.5&163.65&  13.98&  23.19&  161.39&  13.74&  22.83\\
0.9& 3.0&160.81&  13.27&  22.20&  158.04&  12.98&  21.76\\
0.9& 3.5&157.79&  12.55&  21.19&  154.55&  11.77&  20.67\\
0.9& 4.0&154.66&  11.83&  20.16&  151.09&  11.44&  19.57\\
0.9& 4.5&151.36&  11.09&  19.11&  147.19&  10.65&  18.42\\
0.9& 5.0&147.91&  10.35&  18.03&  143.32&   9.86&  17.27\\
0.9& 5.5&144.23&   9.60&  16.93&  139.25&   9.08&  16.10\\
0.9& 6.0&140.44&   8.87&  15.82&  134.93&   8.31&  14.91\\
0.9& 6.5&136.49&   8.14&  14.69&  130.41&   7.57&  13.70\\
0.9& 7.0&132.12&   7.40&  13.53&  125.66&   6.86&  12.50\\
0.9& 7.5&127.43&   6.58&  12.38&  120.66&   5.87&  11.31\\
1.0& 0.5&150.08&  15.06&  24.46&  149.35&  14.99&  24.35\\
1.0& 1.0&146.07&  14.14&  23.15&  144.34&  13.97&  22.90\\
1.0& 1.5&142.14&  13.22&  21.84&  140.36&  13.02&  21.56\\
1.0& 2.0&138.06&  12.28&  20.50&  135.66&  12.03&  20.11\\
1.0& 2.5&133.74&  11.34&  19.12&  130.88&  11.03&  18.65\\
1.0& 3.0&129.27&  10.40&  17.71&  125.83&  10.04&  17.14\\
1.0& 3.5&124.50&   9.46&  16.25&  120.60&   9.07&  15.62\\
1.0& 4.0&119.46&   8.55&  14.78&  114.99&   8.05&  14.07\\
1.0& 4.5&114.03&   7.21&  13.28&  109.37&   6.83&  12.52\\
1.0& 5.0&108.72&   5.98&  11.81&  103.70&   5.97&  11.03\\
1.0& 5.5&102.69&   4.76&  10.37&   97.82&   4.94&   9.55\\
1.1& 0.5&127.64&  13.20&  21.73&  126.72&  13.09&  21.58\\
1.1& 1.0&122.68&  12.05&  20.06&  120.76&  11.84&  19.75\\
1.1& 1.5&117.52&  10.90&  18.33&  114.38&  10.58&  17.84\\
1.1& 2.0&112.01&   9.75&  16.54&  108.39&   9.39&  15.98\\
1.1& 2.5&106.19&   8.65&  14.71&  101.87&   8.25&  13.96\\
1.1& 3.0&100.05&   7.08&  12.75&   95.48&   7.13&  12.07\\
1.1& 3.5& 93.83&   6.33&  10.88&   88.87&   5.96&  10.10\\
1.2& 0.5&110.24&  11.48&  19.36&  106.63&  11.11&  18.69\\
1.2& 1.0&104.36&  10.13&  17.27&   99.28&   9.62&  16.43\\
1.2& 1.5& 97.93&   8.64&  15.01&   92.05&   8.17&  14.12\\
1.2& 2.0& 91.00&   7.47&  12.66&   84.27&   6.86&  11.82\\
 \hline
\end{tabular}
\end{table}