\begin{table}%t6
\caption{\label{tab6}The average large and small separations $\langle \Delta \nu_{0} \rangle$,
$\langle d_{02} \rangle$, $\langle d_{13} \rangle$ for models with $Z_{i}$~=~0.005.}
\par
\small%\centerline

\begin{tabular}{c| r| r r r|r r r}
\hline\hline
&&&&&&& \\[-8pt]
  $M$&Age&\multicolumn{3}{c|}{No -- diffusion}&\multicolumn{3}{c}{Diffusion}\\
$(M_{\odot})$&(Gyr)&$\langle \Delta \nu_{0} \rangle$&
$\langle d_{02} \rangle$& $\langle d_{13} \rangle$&$\langle \Delta \nu_{0} \rangle$& $\langle d_{02} \rangle$& $\langle d_{13} \rangle$\\
 \hline
0.8& 0.5&198.93& 18.71& 30.17&  197.99&  18.65& 30.07\\
0.8& 1.0&195.92& 18.05& 29.24&  194.94&  17.97& 29.11\\
0.8& 1.5&193.92& 17.46& 28.42&  192.10&  17.30& 28.19\\
0.8& 2.0&191.50& 16.83& 27.55&  189.19&  16.63& 27.24\\
0.8& 2.5&189.08& 16.19& 26.68&  186.19&  15.94& 26.29\\
0.8& 3.0&186.51& 15.54& 25.78&  183.17&  15.24& 25.31\\
0.8& 3.5&183.96& 14.89& 24.88&  180.08&  14.52& 24.33\\
0.8& 4.0&181.18& 14.21& 23.94&  176.74&  13.79& 23.31\\
0.8& 4.5&178.33& 13.53& 23.00&  173.47&  13.06& 22.29\\
0.8& 5.0&175.40& 12.84& 22.03&  169.99&  12.31& 21.34\\
0.8& 5.5&172.28& 12.13& 21.05&  166.40&  11.56& 20.17\\
0.8& 6.0&169.04& 11.42& 20.05&  162.63&  10.80& 19.09\\
0.8& 6.5&165.62& 10.71& 19.03&  158.79&  10.05& 18.00\\
0.8& 7.0&162.09&  9.99& 18.00&  154.62&   9.29& 16.88\\
0.8& 7.5&158.02&  9.26& 16.93&  150.34&   8.55& 15.75\\
0.8& 8.0&154.26&  8.56& 15.88&  145.80&   7.82& 14.62\\
0.8& 8.5&150.17&  7.87& 14.81&  141.02&   7.13& 13.48\\
0.8& 9.0&145.67&  7.20& 13.72&  135.90&   6.06& 12.35\\
0.8& 9.5&140.91&  6.58& 12.65&  130.57&   5.04& 11.24\\
0.8&10.0&135.94&  5.07& 11.59&  124.32&   3.68& 10.20\\
0.8&10.5&130.63&  4.11& 10.58&  117.05&   2.91&  9.23\\
0.8&11.0&124.22&  2.81&  9.63&  110.01&   1.48&  8.34\\
0.9& 0.5&169.31& 16.95& 27.43&  168.30&  16.87& 27.30\\
0.9& 1.0&165.62& 16.07& 26.20&  163.86&  15.91& 25.96\\
0.9& 1.5&161.79& 15.18& 24.95&  159.24&  14.95& 24.60\\
0.9& 2.0&157.88& 14.28& 23.68&  154.83&  13.99& 23.24\\
0.9& 2.5&153.80& 13.36& 22.37&  150.12&  13.02& 21.84\\
0.9& 3.0&149.55& 12.44& 21.04&  145.25&  12.04& 20.42\\
0.9& 3.5&145.08& 11.51& 19.68&  140.18&  11.06& 18.96\\
0.9& 4.0&140.41& 10.58& 18.28&  134.78&  10.09& 17.47\\
0.9& 4.5&135.41&  9.66& 16.86&  129.31&   9.15& 15.97\\
0.9& 5.0&130.12&  8.77& 15.41&  122.93&   8.23& 14.42\\
0.9& 5.5&124.49&  7.60& 13.95&  117.34&   6.83& 12.95\\
0.9& 6.0&118.51&  6.49& 12.51&  109.88&   5.43& 11.35\\
0.9& 6.5&111.99&  5.13& 11.13&  101.60&   4.21&  9.96\\
1.0& 0.5&142.29& 14.93& 24.41&  140.75&  14.78& 24.19\\
1.0& 1.0&137.36& 13.79& 22.77&  134.60&  13.52& 22.37\\
1.0& 1.5&132.21& 12.63& 21.08&  128.37&  12.27& 20.53\\
1.0& 2.0&126.89& 11.48& 19.35&  121.95&  11.03& 18.65\\
1.0& 2.5&121.19& 10.33& 17.56&  115.34&   9.84& 16.75\\
1.0& 3.0&115.10&  9.22& 15.72&  108.45&   8.70& 14.83\\
1.0& 3.5&108.52&  7.75& 13.87&  100.35&   6.88& 12.81\\
1.0& 4.0&101.52&  6.34& 12.04&   91.65&   5.52& 10.99\\
1.0& 4.5& 91.57&  4.47& 10.13&   83.64&   3.69&  8.99\\
 \hline
\end{tabular}
\medskip
 Note. The above average large separations are calculated averaging over $n$~= 10, 11, 22, ..., 30. The mean small separations are averaged over $n$~= 10, 11, 12, ..., 30 at a fixed~$l$ (as~indicated).
\end{table}