\begin{table}
\caption{\label{GR_tab_zzfaint}\zphot accuracy expected for the faintest galaxies in the
  EDisCS sample, based on the GR code. } 
%\centerline
 {\begin{tabular}{clccccccc}
\hline \hline
Clusters & Redshift interval & Galaxy type &
$\langle \Delta_z \rangle$ & $\sigma_z$ &
$\sigma_{z,\rm MAD}$ & $\sigma(\Delta z/(1+z))$ & $l\%$ & $g\%$  \\
\hline 
Low-$z$ & $0.3 $~$\le$  \zphot$ \le$~$ 1$ &  all & 
0.034  &   0.136 & 0.124 &    0.082 & 3.1 &    0.0 \\
%
High-$z$ & $0.3$~$ \le$  \zphot$ \le $~$1$ & all &
0.003  &    0.131&  0.134  &    0.081&  3.4&   2.9\\
%
High-$z$ & $0.45 $~$\le$  \zphot$ \le$~$ 1$ & all &  
0.016 &     0.124 & 0.130 &     0.078 & 3.4 & 3.0 \\
\hline
Low-$z$ & $0.3$~$ \le$  \zphot$ \le$~$ 1$ &  E/S0 & 
0.015 & 0.123 & 0.118 & 0.078 & 1.8 & 0.0  \\
      &                             & Sbc & 
0.043 & 0.128 & 0.124 & 0.081 & 0.7 & 0.0 \\
      &                             & Scd & 
0.036 & 0.145 & 0.112 & 0.075 & 6.4 & 0.0 \\
      &                             & Im & 
0.093 & 0.179 & 0.153 & 0.103 & 8.9 & 0.0  \\
      &                             & SB &
0.041 & 0.145 & 0.129 & 0.083 & 6.7 & 0.0 \\
\hline
High-$z$ & $0.3$~$ \le$~\zphot~$ \le$~$ 1$ & E/S0 & 
0.014  &   0.129 &0.149&     0.088 & 1.2& 1.6 \\
      &                             & Sbc & 
--0.010 &   0.125 &  0.128 &     0.080 & 0.9 & 1.3  \\
      &                             &  Scd & 
--0.008 &    0.134 &0.114 &    0.067 & 4.0 & 4.7 \\
      &                             & Im & 
0.012  &   0.124 & 0.122 &    0.073 & 5.4 & 0.0 \\
      &                             & SB & 
0.011 &    0.140 & 0.134  &   0.092 & 13.6 & 11.7 \\
\hline 
\end{tabular}}
\par
\smallskip
Notes: the accuracy reached for the different spectral types of
  galaxies is also presented.  The information given is the same as in
  Tables~\ref{zzsum} and~\ref{tab_zzfaint}, for the current spectroscopic
  sample.  
\end{table}