\begin{table}%t2
\caption {\label{tab_zzfaint}\zphot accuracy expected for the faintest galaxies in the
  EDisCS sample, in the low-$z$ and high-$z$ fields, based on {\it Hyperz}. }
%\centerline
 {\begin{tabular}{clccccccc}
\hline \hline
Clusters & Redshift interval & Galaxy type &
$\langle \Delta_z \rangle$ & $\sigma_z$ &
$\sigma_{z,\rm MAD}$ & $\sigma(\Delta z/(1+z))$ & $l\%$ & $g\%$  \\
\hline 
Low-$z$ & $0.3 $~$\le$~\zphot$ \le $~$1$ &  all & 
--0.003  &   0.153& 0.158 &    0.105 &4.0 &    1.0 \\
%
High-$z$ & $0.3$~$ \le$~\zphot~$ \le$~$ 1$ & all &
--0.037  &    0.159&  0.156  &    0.095 &  2.2 &   6.2 \\
%
High-$z$ & $0.45$~$ \le$~\zphot~$ \le$~$ 1$ & all &  
--0.027 &     0.156 & 0.151 &     0.091 & 1.0 & 6.9 \\
Low-$z$ & $0.3$~$ \le$~\zphot$ \le 1$ &  E/S0 & 
--0.025 & 0.155 & 0.172 & 0.113 & 3.2 & 0.0  \\
      &                             & Sbc & 
0.025 & 0.151 & 0.158 & 0.106 & 4.6 & 0.7 \\
      &                             & Scd & 
0.021& 0.129 & 0.124 & 0.082 & 2.7 & 1.8 \\
      &                             & Im & 
--0.012 & 0.172 & 0.161 & 0.113 & 8.8 & 2.5  \\
      &                             & SB &
--0.096& 0.156 & 0.238 & 0.155 & 6.7 & 5.6 \\
High-$z$ & $0.3 \le$  \zphot~$ \le$~$ 1$ & E/S0 & 
--0.040  &   0.155 &0.151&     0.091 &2.0& 2.6 \\
      &                             & Sbc & 
--0.041 &     0.164&  0.172 &     0.108 & 2.1 & 1.9  \\
      &                             &  Scd & 
--0.017 &    0.166 &0.146 &    0.092 & 1.7 & 8.7 \\
      &                             & Im & 
--0.026  &   0.143& 0.142 &    0.088 & 0.9 & 2.8 \\
      &                             & SB & 
--0.075 &    0.150& 0.191  &   0.125 & 6.3 & 23.7 \\
\hline 
\end{tabular}}
\par
\smallskip
Notes:  
the accuracy reached for the different spectral types of
  galaxies is also presented.  The information given is the same as in
  Table~\ref{zzsum}, for the current spectroscopic sample. \vspace{-1mm}
\end{table}