\begin{table}%t3
\caption{\label{tab3}Model fit.}             % title of Table
%\centerline
 {                          % used for centering table
\begin{tabular}{l l l l l l }        % centered columns (4 columns)
\hline\hline                 % inserts double horizontal lines
Object  &${\it SpT}$ & $n$  & $d_0 $ & log~($g$) & $V$  \\    % table heading 
  & &  &(micron) & (cgs) & (km s$^{-1}$)  \\    
\hline                        % inserts single horizontal line
2MASSW J1438082+640836 & M~9.5 & 1.0 & 0.7 & 	5.0    &  18.7 \\
 &  & 1.5& 0.7 & 	5.0    &  20.5 \\
2MASSW J1507476-162738 & L5  & 1.0 & 0.44 & 	5.255    &  27.2 \\
 &  & 1.5& 0.44 & 	5.230    &  27.2 \\
2MASSI J1807159+501531 & 	L1.5 & 1.0 & 0.5 & 	5.41    & 76.0 \\
 &  & 1.5& 0.44 & 	5.37   &  76.0 \\
\hline                                   %inserts single line
\end{tabular}}
\par
\smallskip
Note: {Bailer-Jones (2004) has measured the projected rotational velocity for
2MASSW J1507476-162738 as 27.2~km~s$^{-1}$, while Reiner \& Basri (2008) have reported the projected velocity for 2MASSW J1807159+501531 to be 76~km~s$^{-1}$.} 
\end{table}