\begin{table}%t2
\caption{\label{bench_scale}Orbital scaling parameters\tablefootmark{\dagger} for the 72CF calculation.}
\par
%\centering
\par
\begin{tabular}{lllllllllll}
\hline\hline\noalign{\smallskip}
 & 1s & 1.4009 & & & & & & & & \\
 & 2s & 1.1147 & 2p & 1.0577 & & & & & & \\
 & 3s & 1.1331 & 3p & 1.1056 & 3d & 1.1310 & & & & \\
 & \ol{4}s & --0.9817 & \ol{4}p & --0.9335 & \ol{4}d & --0.9132 & \ol{4}f & --0.8931 & & \\
 & \ol{5}s & --1.2067 & \ol{5}p & --1.1951 & \ol{5}d & 1.0955 & \ol{5}f & --1.5571 & \ol{5}g & --1.2925 \\
\hline
\end{tabular}
\tablefoot {\tablefoottext{\dagger}{See text for physical significance of the scaling parameters.}}
\end{table}