\begin{table}%t6
\caption{\label{tab:tableGX349+2_par}Best-fit parameters of the multi-component model $\mathsf{wabs\cdot(compTB[1]+compTB[2])}$ for the source~GX~349$+$2. }
\par
%\centering
\par
\begin{tabular}{ccc}
\hline\hline \noalign{\smallskip}
Parameter & HR $<$ 7 & HR $>$ 7\\
\hline
\multicolumn{3}{c}{$\mathsf{compTB[1]}$ (thermal:$\log A=8$, $\delta=0$)}\\
$kT_{\rm s}$&$0.3~({<}0.9)$&$0.4({<}2.2)$\\
$kT_{\rm e}$&$3^{\rm +1.8}_{-0.1}$&$2.8^{\rm +4.7}_{-0.08}$\\
$\alpha$&$1.1^{\rm +0.2}_{-0.2}$&$1.1^{\rm +0.5}_{-0.4}$\\
$\tau$\tablefootmark{d} &5.0&5.2\\
CAF\tablefootmark{d} &2.1&2.0\\
\hline
\multicolumn{3}{c}{$\mathsf{compTB[2]}$ (blackbody: $\log A=-8$)}\\
$kT_{\rm s}$&$1.7^{\rm +0.3}_{-0.3}$&$1.2^{\rm +0.7}_{-0.1}$\\
$R_{\rm bb}$\tablefootmark{b,d} &$5.2^{\rm +2.6}_{-1.5}$&$9.8^{\rm +2.5}_{-5.9}$\\
$kT_{\rm e}$&--&--\\
$\alpha$&--&--\\
$\delta$&--&--\\
$\log A$&$[-8]$&$[-8]$\\
\hline \noalign{\smallskip}
$L_{\rm tot}$\tablefootmark{c,d} &3.4&2.2\\
\hline \noalign{\smallskip}
$L_{\rm bb}$\tablefootmark{c,d} &0.3&0.3\\
&(9$\%$)&(14$\%$)\\
\hline \noalign{\smallskip}
$\chi^2/{\rm d.o.f.}$&104/115&76/114\\
\hline
\end{tabular}
\tablefoot {Errors are computed at 90$\%$ confidence level for a single parameter.
\tablefoottext{a}{In~keV;}
\tablefoottext{b}{in~km;}
\tablefoottext{c}{in units of $10^{38}$~erg~s$^{-1}$, in the 0.1$-$200~keV energy range;}
\tablefoottext{d}{computed as reported in Sect.~\ref{other}.}}
\end{table}