\begin{table}%t2
\caption{\label{rratio}Flux values of the ``final'' model and its individual components.} 
%\centerline
{
\begin{tabular}{c|cc|cc} 
	\hline \hline
\rule[-0.6em]{0pt}{1.7em} Model	&	\multicolumn{2}{c|}{Flux at $0.5{-}2~$keV} &	\multicolumn{2}{c}{Flux at $2{-}10~$keV}	\\
\rule[-0.6em]{0pt}{1.7em} component	&	\multicolumn{2}{c|}{$[10^{-12}$erg~cm$^{-2}$~s$^{-1}$]}	&	\multicolumn{2}{c}{$[10^{-12}$erg~cm$^{-2}$~s$^{-1}$]}	 \\
\rule[-0.6em]{0pt}{1.7em} 	& 	PN	&	MOS &	PN	&	MOS\\
\hline
\rule[-0.6em]{0pt}{1.7em} total	model	& $7.05^{\rm +0.03}_{-0.03}$	&	$7.00^{\rm +0.03}_{-0.03}$	& $25.0^{\rm +0.1}_{-0.2}$	&	$25.4^{\rm +0.1}_{-0.2}$	\\
\rule[-0.6em]{0pt}{1.7em} unabsorbed model	& $16.6^{\rm +0.2}_{-0.2}$	&	$16.7^{\rm +0.2}_{-0.2}$	& $25.7^{\rm +0.2}_{-0.2}$	&	$26.5^{\rm +0.2}_{-0.2}$	\\
\rule[-0.6em]{0pt}{1.7em} {\powerlaw}	& $13.6^{\rm +0.1}_{-0.2}$	&	$14.3^{\rm +0.1}_{-0.1}$	& $22.6^{\rm +0.3}_{-0.2}$	&	$23.8^{\rm +0.1}_{-0.1}$	\\
\rule[-0.6em]{0pt}{1.7em} {\reflion}$_{\rm ion}$	& $1.9^{\rm +0.2}_{-0.2}$	&	$1.1^{\rm +0.1}_{-0.1}$	& $1.6^{\rm +0.1}_{-0.2}$	&	$0.9^{\rm +0.1}_{-0.1}$	\\
\rule[-0.6em]{0pt}{1.7em} {\reflion}$_{\rm cold}$	& $1.1^{\rm +0.1}_{-0.1}$	&	$1.3^{\rm +0.1}_{-0.1}$	& $1.5^{\rm +0.1}_{-0.1}$	&	$1.8^{\rm +0.2}_{-0.1}$	\\
\hline
\rule[-0.6em]{0pt}{1.7em} $R_{\rm ion}$ $^*$		& $0.12^{\rm +0.01}_{-0.01}$	&	$0.07^{\rm +0.01}_{-0.01}$ & $0.06^{\rm +0.01}_{-0.01}$	&	$0.03^{\rm +0.01}_{-0.01}$\\
\rule[-0.6em]{0pt}{1.7em} $R_{\rm cold}$ $^*$	& $0.07^{\rm +0.01}_{-0.01}$	&	$0.08^{\rm +0.01}_{-0.01}$ & $0.06^{\rm +0.01}_{-0.01}$	&	$0.07^{\rm +0.01}_{-0.01}$\\
\hline
\end{tabular}}
\tablefoot{$^*$ the ratios of the reflection component flux values to the flux 
value of the total unabsorbed model (sum of the primary and reflected radiation).}
\end{table}