\begin{table}%t2
\caption{\label{newmin}New times of minimum light of DI~Her.}
\par
%\centering
\par
\begin{tabular}{llrcl}
\hline\hline\noalign{\smallskip}
 ${\rm HJD} - 2~400~000$    &  Error (days)  & Epoch  & Filter & Observatory  \\
\hline
52~456.46107  & 0.0005 & 482.0 &  $R$  &  \ova \\
53~511.47699  & 0.0004 & 582.0 &  $R$  &  \ova \\
53~933.48379  & 0.0005 & 622.0 &  $I$  &  \valmez  \\
54~239.43802  & 0.0008 & 651.0 &  $R$  &  \ova  \\
54~627.36687\tablefootmark{*} & 0.0005 & 687.5 & $\it VRI$ &  \ova  \\
\hline
\end{tabular}
\tablefoot {\tablefoottext{*}{Mean value of $\it VRI$ measurements.}}
\end{table}