\begin{table}%t3
%\centering
\par
\caption{\label{tab:abstract}Summary of the sets of state-to-state rate coefficients (STSR) $R(j_1 \tau_1 j_2 \rightarrow j'_1 \tau'_1 j'_2)(T)$ available in BASECOL (sets (1), (2), (3), (4) below 10th level), and effective rate coefficients (ER) $\hat{R}_{j_2}(j_1 \tau_1 \rightarrow j'_1 \tau'_1)(T)$.}
\begin{tabular}{ccccccccc}
\hline\hline
Set  &       &          &       & $T_{\rm min}$(K) & $T_{\rm max}$(K) & Transitions & $T1$ & $T2$  \\
\hline
(1) & $j_2$ = 1   & $j'_2 = 1$ & STSR   & 5 & 1500 &  20 levels &  5\%  & 10\% \\
(2a) &             & $j'_2 =$ 3 & STSR   & 300 & 1500 &  20 levels & 20\% & 20\%--40\% (Note)\\
(2b) &             & $j'_2 =$ 3 & STSR   & 5 & 300 &  20 levels & A2 & A2 \\
    &             & $\sum_{j'2}$ & ER & 5 & 1500 &  20 levels & 5\%  & 15\%--20\% \\
\hline
(3) & $j_2 = 3$  & $j'_2 = 1$ & STSR   & 5 & 1500 &  10 levels & A2 &  \\
(4) &            & $j'_2$ = 3 & STSR   & 5 & 1500 &  10 levels & 10\% &  \\
    &            & $\sum_{j'2}$ & ER & 5 & 1500 &  10 levels & 15\%  &  \\
\hline
\end{tabular}
\tablefoot{Column 1 labels the set of state-to-state rate coefficients. $T_{\rm min}$(K) and $T_{\rm max}$(K) indicate the lowest and highest temperatures at which calculations and fits have been performed for the relevant sets of data. The column ``Transition'' indicates the number of levels among which rate coefficients are provided. $T$1, $T$2 indicate the worst expected accuracy: $T$1 for transitions among the 10 first levels of para-H$_2$O, $T$2 for de-excitation from the 11th--20th levels. A2 means ``not good but negligible''. Note: for set (2a) and $T$2, the accuracy is 20\% for de-excitation to the first 13th levels and 40\% for de-excitation to the 14th--19th levels.}
\end{table}