\begin{table}%t1
\caption{\label{table:1}\label{tab1}Near-IR~and mid-IR~photometry of our Hickson compact group sample.}
%\centering
\par
\begin{tabular}{cccccccccccc}
\hline
\hline\noalign{\smallskip}
HCG & Type & $z$ & $J$ & $H$ & $K_{\rm s}$ & $3.6~\mu$m & $4.5~\mu$m & $5.8~\mu$m & $8.0~\mu$m & $12.0~\mu$m & $24.0~\mu$m \\ 
(ID) &  &  & (mJy) & (mJy) & (mJy) & (mJy) & (mJy) & (mJy) & (mJy) & (mJy) & (mJy) \\ 
\hline
19a & E2 & 0.014 & 43.7 & 43.4 & 33.0 & 21.3 & 13.5 & 7.5 & 4.3 & 3.8 & 1.8 \\ 
19b & Scd & 0.014 & 10.9 & 11.1 & 8.6 & 5.9 & 4.2 & 8.6 & 20.0 & 11.7 & 24.2 \\ 
19c & Sdm & 0.014 & 4.4 & 4.1 & 2.5 & 3.2 & 1.4 & 2.3 & 5.1 & ... & 6.7 \\ 
\noalign{\smallskip}
26a & Scd & 0.032 & 12.8 & 13.9 & 23.0 & 12.1 & 8.5 & 16.8 & 43.5 & 12.5 & 29.2 \\ 
26b & E0 & 0.031 & 10.1 & 11.0 & 11.0 & 5.6 & 3.6 & 2.7 & 3.3 & ... & 9.0 \\ 
26c & S0 & 0.032 & 4.8 & 5.3 & 4.6 & 2.3 & 1.5 & 0.9 & 1.0 & ... & 0.9 \\ 
26d & cI & 0.030 & 1.9 & 2.2 & 2.5 & 1.2 & 0.9 & 0.6 & 0.8 & ... & ... \\ 
26e & Im & 0.032 & 0.5 & 0.6 & 1.1 & 0.7 & 0.5 & 0.9 & 2.6 & ... & 4.0 \\ 
26f & cI & 0.032 & 0.3 & 0.2 & 0.4 & 0.2 & 0.1 & ... & ... & ... & 0.3 \\ 
26g & S0 & 0.031 & 0.9 & 1.1 & 1.3 & 0.7 & 0.6 & 0.3 & 0.2 & ... & ... \\ 
 \noalign{\smallskip}
33a & E1 & 0.025 & 41.7 & 45.5 & 36.5 & 27.6 & 17.9 & 10.3 & 6.6 & ... & 2.6 \\ 
33b & E4 & 0.026 & 40.9 & 44.0 & 34.9 & 24.8 & 15.5 & 9.4 & 7.1 & ... & 2.3 \\ 
33c & Sdm & 0.026 & 29.6 & 25.0 & 16.8 & 21.2 & 15.2 & 21.4 & 58.6 & 16.3 & 41.2 \\ 
33d & E0 & 0.026 & 12.1 & 13.0 & 9.7 & 5.5 & 4.0 & 1.7 & 0.9 & ... & 0.1 \\ 
 \noalign{\smallskip}
37a & E7 & 0.022 & 64.7 & 79.6 & 72.1 & 61.7 & 37.2 & 19.3 & 13.1 & ... & 4.8 \\ 
37b & Sbc & 0.022 & 33.2 & 43.3 & 43.6 & 22.9 & 14.4 & 14.5 & 29.2 & 14.1 & 36.7 \\ 
37c & S0a & 0.024 & 11.1 & 11.9 & 10.4 & 3.5 & 2.3 & 1.8 & 2.1 & ... & 3.5 \\ 
37d & SBdm & 0.020 & 2.7 & 3.5 & 3.2 & 1.8 & 1.1 & 2.0 & 5.2 & 3.3 & 4.9 \\ 
37e & E0 & 0.021 & 4.4 & 5.6 & 5.2 & 2.4 & 1.5 & 1.0 & 1.1 & .. & 1.8 \\ 
 \noalign{\smallskip}
38a & Sbc & 0.029 & 17.1 & 21.5 & 18.1 & 11.1 & 8.0 & 16.4 & 46.9 & ... & 44.5 \\ 
38b & SBd & 0.029 & 15.4 & 18.8 & 14.7 & 12.3 & 8.5 & 16.3 & 27.6 & 8.3 & 45.2 \\ 
38c & Im & 0.029 & 9.2 & 11.1 & 8.4 & 6.5 & 4.4 & 8.4 & 24.2 & 5.6 & 67.8 \\ 
38d & SBa & 0.029 & 6.7 & 7.8 & 6.6 & 3.4 & 2.5 & 1.2 & 1.4 & ... & 0.4 \\ 
 \noalign{\smallskip}
40a & E3 & 0.022 & 79.4 & 78.7 & 74.2 & 45.4 & 28.0 & 20.2 & 15.3 & ... & 4.0 \\ 
40b & S0 & 0.023 & 35.1 & 33.3 & 31.1 & 18.7 & 12.2 & 8.9 & 8.8 & ... & 3.0 \\ 
40c & Sbc & 0.021 & 37.3 & 43.1 & 45.7 & 29.4 & 19.7 & 34.7 & 83.5 & ... & 73.4 \\ 
40d & SBa & 0.022 & 31.7 & 32.0 & 30.7 & 21.3 & 14.3 & 22.7 & 66.9 & ... & 88.1 \\ 
40e & Sc & 0.022 & 8.8 & 8.7 & 8.5 & 6.4 & 4.1 & 4.0 & 5.9 & ... & 5.6 \\ 
40f & E1 & 0.021 & 5.9 & 4.4 & 3.0 & 1.4 & 1.0 & 0.9 & 0.8 & ... & ... \\ 
 \noalign{\smallskip}
47a & Sbc & 0.032 & 26.8 & 35.0 & 28.0 & 20.7 & 13.3 & 20.3 & 52.3 & 22.1 & 87.0 \\ 
47b & E3 & 0.032 & 16.0 & 21.4 & 16.9 & 11.8 & 7.2 & 4.1 & 2.4 & ... & 0.6 \\ 
47c & Sc & 0.032 & 4.5 & 5.9 & 4.5 & 3.0 & 1.9 & 2.3 & 2.4 & ... & 9.9 \\ 
47d & Sd & 0.032 & 5.7 & 7.1 & 5.9 & 3.6 & 2.4 & 2.3 & 6.4 & ... & 4.5 \\ 
 \noalign{\smallskip}
54a & Sdm & 0.005 & 10.2 & 8.6 & 6.0 & 6.7 & 5.3 & 6.8 & 10.3 & ... & 4.4 \\ 
54b & Im & 0.005 & 5.6 & 5.6 & 4.4 & 3.7 & 2.9 & 5.5 & 11.1 & ... & 22.7 \\ 
54c & Im & 0.005 & 1.3 & 1.1 & 1.4 & 2.3 & 1.5 & 2.1 & 4.1 & ... & 2.8 \\ 
54d & Im & 0.006 & 0.5 & 0.7 & 0.6 & 0.5 & 0.4 & 0.3 & 0.7 & ... & 0.7 \\ 
 \noalign{\smallskip}
55a & E0 & 0.054 & 14.4 & 17.2 & 16.6 & 6.5 & 3.9 & 2.7 & 1.2 & ... & 0.6 \\ 
55b & S0 & 0.052 & 7.3 & 7.4 & 7.3 & 3.4 & 2.2 & 1.3 & 0.7 & ... & 0.3 \\ 
55c & E3 & 0.052 & 7.7 & 10.8 & 11.6 & 5.5 & 3.8 & 3.9 & 10.9 & ... & 7.7 \\ 
55d & E2 & 0.054 & 4.3 & 4.9 & 4.8 & 2.1 & 1.4 & 0.9 & 0.7 & ... & 0.6 \\ 
55e & Sc & 0.054 & 1.2 & 2.2 & 2.2 & 1.8 & 1.3 & 0.9 & 4.0 & ... & 6.3 \\ 
 \noalign{\smallskip}
56a & Sc & 0.027 & 15.7 & 25.0 & 13.5 & 6.8 & 4.4 & 6.1 & 13.0 & 3.9 & 13.4 \\ 
56b & SB0 & 0.026 & 35.0 & 52.9 & 29.5 & 25.9 & 30.4 & 39.0 & 53.7 & 49.8 & 185 \\ 
56c & S0 & 0.027 & 18.8 & 24.8 & 15.0 & 7.7 & 3.3 & 3.8 & 3.2 & ... & 0.9 \\ 
56d & S0 & 0.028 & 9.3 & 13.8 & 7.8 & 4.7 & 3.1 & 5.9 & 14.8 & 5.4 & 20.2 \\ 
56e & S0 & 0.027 & 5.7 & 7.2 & 4.4 & 2.0 & 1.4 & 2.1 & 4.2 & 1.8 & 6.6 \\ 
 \noalign{\smallskip}
57a & Sbc & 0.029 & 56.7 & 62.2 & 67.9 & 33.8 & 18.5 & 15.0 & 18.1 & 12.5 & 13.8 \\ 
57b & SBb & 0.030 &26.7 & 26.8 & 27.2 & 14.1 & 8.9 & 6.8 & 10.0 & ... & 8.1 \\ 
57c & E3 & 0.030 & 22.1 & 23.0 & 23.7 & 12.8 & 8.7 & 4.2 & 2.7 & 1.4 & 0.4 \\ 
57d & SBc & 0.030 & 13.1 & 13.4 & 14.1 & 7.6 & 4.9 & 7.4 & 18.1 & 6.6 & 24.0 \\ 
57e & S0a & 0.030 & 20.1 & 20.8 & 21.4 & 9.5 & 6.1 & 3.8 & 4.1 & ... & 2.1 \\ 
57f & E4 & 0.031 & 13.7 & 13.6 & 14.3 & 6.7 & 4.3 & 1.5 & 1.0 & ... & 0.9 \\ 
57g & SB0 & 0.032 & 11.7 & 11.8 & 12.0 & 5.4 & 3.3 & 1.5 & 0.7 & ... & ... \\ 
57h & SBb & 0.031 & 3.8 & 3.9 & 3.9 & 1.8 & 1.2 & 0.8 & 1.9 & ... & 2.5 \\  
\noalign{\smallskip} 
71a & Sbc & 0.031 & 29.9 & 36.5 & 22.6 & 17.4 & 11.3 & 16.5 & 32.6 & 24.0 & 29.2 \\ 
71b & SB0 & 0.032 & 17.3 & 21.2 & 14.1 & 8.5 & 5.8 & 10.6 & 9.1 & 9.3 & 52.7 \\ 
71c & Sbc & 0.029 & 3.5 & 4.4 & 2.8 & 2.0 & 1.2 & 2.1 & 5.2 & ... & 4.3 \\ 
71d & SB0 & 0.031 & 6.3 & 7.7 & 5.1 & 3.2 & 2.1 & 1.2 & 1.1 & ... & 2.5 \\ 
79a & Sa & 0.015 & 33.5 & 36.0 & 27.4 & 23.7 & 15.2 & 18.8 & 30.9 & 11.9 & 23.3 \\ 
79b & S0 & 0.015 & 37.3 & 40.3 & 30.9 & 17.6 & 14.6 & 15.8 & 12.2 & 6.6 & 33.7 \\ 
79c & S0 & 0.014 & 12.6 & 12.7 & 9.1 & 10.2 & 5.7 & 4.0 & 2.0 & ... & 1.2 \\ 
79d & Sdm & 0.015 & 4.3 & 3.2 & 3.2 & 2.2 & 1.2 & 1.5 & 3.5 & ... & 5.2 \\ 
79e & Scd & 0.015 & 5.7 & 6.1 & 5.3 & 4.3 & 3.3 & 4.0 & 17.5 & 5.8 & 0.5 \\ 
\noalign{\smallskip}
95a & Sbc & 0.040 & 30.5 & 33.5 & 28.6 & 18.0 & 11.0 & 6.7 & 7.8 & ... & 1.3 \\ 
95b & SB0 & 0.039 & 11.9 & 13.0 & 13.3 & 9.2 & 6.4 & 14.1 & 30.4 & 23.1 & 41.2 \\ 
95c & Sbc & 0.039 & 10.4 & 11.1 & 9.7 & 7.1 & 4.3 & 4.9 & 10.6 & 13.6 & 19.8 \\ 
95d & SB0 & 0.041 & 7.7 & 8.5 & 9.4 & 4.8 & 3.1 & 2.6 & 6.7 & 4.7 & 5.6\\
\hline
\end{tabular}
\end{table}