\begin{table}%t1
\caption{\label{table:1}NTT-EMMI telescope settings.}           
 %\centerline
{\small                    
\begin{tabular}{c c c c c c}      
\hline\hline                
 Distance to &  Grating &  Central  & Wavelength    & Resolution & Integration\\     
 HD 44179 &          &  wavelength   & coverage & $\lambda/\Delta\lambda$     & time\\    
 (arcsec) &          &  (\AA{})	   & (\AA{})    &  & (s)\\    
\hline                       
   0 & 6 & 5870  & 640 & 5000   & 60 \\     
   0 & 6 & 6500  & 640 & 5000   & 60 \\
   3 & 6 & 5870  & 640 & 5000   & 500 \\
   3 & 6 & 6500  & 640 & 5000   & 500 \\
   7 & 6 & 5870  & 640 & 5000   & 2000 \\
   7 & 6 & 6500  & 640 & 5000   & 2000\\
   16 & 7 & 6200 & 1300 & 2600  & 3600\\
   20 & 7 & 6200 & 1300 & 2600  & 3600\\
\hline 
  \end{tabular}}                               
\tablefoot{The slit orientation is 105$^{\circ}$ east from north, perpendicular to the nebula's symmetry axis.}
\end{table}