\begin{table}%t2
%\centering
\par
\caption{\label{table:measuredQuantities}Overview of measured quantities. } 
\par
\begin{tabular}{c c c c c c c}        
\hline\hline  \noalign{\smallskip}               
$\lambda$   & PA      & NE        & SW       & 1$\sigma$ noise         & beam      & $F_\nu$ \\ 
($\mu$m)    & (\degr)  & (\arcsec) & (\arcsec)& (mJy~ \arcsec$^{-2}$)  & (\arcsec) & (Jy)    \\ 
\hline
70~$\mu$m  & 29\fdg9 & 68        & 67       & 0.079     & 5.6       & 16.0~$\pm$~0.8 \\
100~$\mu$m & 30\fdg3 & 55        & 56       & 0.086     & 8.6       &  9.8~$\pm$~0.5 \\
160~$\mu$m & 28\fdg1 & 63        & 60       & 0.044     & 11.3      &  5.1~$\pm$~0.5 \\
250~$\mu$m &         & 62        & 72       & 0.015     & 18.1      &  1.9~$\pm$~0.1 \\
350~$\mu$m &         & 42        & 83       & 0.007     & 25.2      & 0.72~$\pm$~0.05 \\
500~$\mu$m &         & 33        & 80       & 0.004     & 36.9      & 0.38~$\pm$~0.03 \\
\hline     
\end{tabular} 
\tablefoot{Position angle PA, northeast (NE) and  southwest (SW) extent (signal reaching the 1$\sigma$ noise), 
map noise level, beam $FWHM$, and the flux density integrated over a 60\arcsec\ aperture.} 
\end{table}