\begin{table}
\caption{\label{tab1}The sources.}
\begin{tabular}{rccccrrccrrr}
\hline\hline
\noalign{\smallskip}
$N_{\rm sou}$ &$N_{\rm epo}$  &Source  &Epoch &$z$  &$f_{\rm RL}$\tablefootmark{a}  &$f_{\rm BAL}$\tablefootmark{b}   &$\log L_{\rm UV}$ &$\log L_{\rm X}$  &$\alpha_{\rm ox}$ &$\Delta\alpha_{\rm ox}$  &$HR3$  \\
(1) &(2)  &(3)  &(4) &(5)  &(6)  &(7)  &(8) &(9) &(10) &(11) &(12)  \\
\hline
  1 &   & 2XMM J003922.3+005951 & 53~365.828  & 1.989 &  0 & 0   & 31.05  & 26.58  & $-$1.71  & $-$0.04  & $-$0.46 \\
  2 &   & 2XMM J010647.9+004628 & 52~835.359  & 1.877 &  0 & 0   & 31.09  & 26.55  & $-$1.74  & $-$0.06  & $-$0.42 \\
  3 &   & 2XMM J011902.9$-$005633 & 52~831.922  & 1.614 &  0 & 0   & 30.39  & 26.20  & $-$1.61  & $-$0.05  & $-$0.47 \\
  4 &   & 2XMM J014251.7+133352 & 51~~916.445  & 1.075 & $-$1 & 0   & 30.24  & 26.71  & $-$1.35  &  0.18  & $-$0.27 \\
  5 &   & 2XMM J014814.0+140853 & 52~662.000  & 0.373 & $-$1 & 0   & 29.53  & 26.22  & $-$1.27  &  0.13  & $-$0.29 \\
  6 &   & 2XMM J015254.0+010435 & 52~276.062  & 0.570 &  0 & 0   & 29.24  & 25.84  & $-$1.30  &  0.05  & $-$0.40 \\
  7 &   & 2XMM J015258.6+010507 & 52~276.062  & 0.647 &  0 & 0   & 29.93  & 25.94  & $-$1.53  & $-$0.06  & $-$0.15 \\
  8 &   & 2XMM J015704.1$-$005656 & 53~565.277  & 1.779 &  0 & 0   & 30.94  & 26.16  & $-$1.83  & $-$0.18  & $-$0.44 \\
  9 &   & 2XMM J015733.8$-$004823 & 53~565.277  & 1.545 &  0 & 0   & 31.03  & 26.92  & $-$1.58  &  0.09  & $-$0.29 \\
 10 &   & 2XMM J020118.6$-$091936 & 53~023.926  & 0.661 &  0 & 0   & 30.51  & 26.35  & $-$1.59  & $-$0.01  & $-$0.35 \\
 11 &   & 2XMM J021100.8$-$095138 & 53~016.961  & 0.767 &  0 & 0   & 30.34  & 26.21  & $-$1.59  & $-$0.04  & $-$0.46 \\
 12 &   & 2XMM J023057.3$-$010033 & 53~398.395  & 0.650 &  0 & 0   & 30.14  & 25.93  & $-$1.62  & $-$0.11  & $-$0.38 \\
 13 &   & 2XMM J024040.8$-$081309 & 53~747.141  & 1.844 &  0 & 0   & 30.82  & 26.43  & $-$1.68  & $-$0.05  & $-$0.39 \\
 14 &   & 2XMM J024055.8$-$081952 & 53~747.141  & 1.802 &  0 & 0   & 30.87  & 26.40  & $-$1.71  & $-$0.07  & $-$0.27 \\
 15 &   & 2XMM J024105.8$-$081153 & 53~747.141  & 0.979 &  0 & 0   & 30.21  & 26.06  & $-$1.59  & $-$0.07  & $-$0.46 \\
 16 & 1 & 2XMM J024207.2+000038 & 51~754.270  & 0.384 &  0 & 0   & 28.99  & 25.43  & $-$1.37  & $-$0.06  & $-$0.44 \\
 16 & 2 & 2XMM J024207.2+000038 & 51~755.121  & 0.384 &  0 & 0   & 28.99  & 25.43  & $-$1.36  & $-$0.05  & $-$0.46 \\
 17 & 1 & 2XMM J024215.0$-$000209 & 51~754.270  & 1.012 &  0 & 0   & 29.97  & 25.75  & $-$1.62  & $-$0.14  & $-$0.58 \\
 17 & 2 & 2XMM J024215.0$-$000209 & 51~755.121  & 1.012 &  0 & 0   & 30.11  & 26.03  & $-$1.57  & $-$0.06  & $-$0.17 \\
 18 &   & 2XMM J024304.6+000005 & 51~754.270  & 1.995 &  0 & 1   & 31.06  & 27.04  & $-$1.54  &  0.13  & $-$0.11 \\
 19 & 1 & 2XMM J024308.1$-$000126 & 51~754.270  & 0.679 &  0 & 0   & 29.21  & 25.35  & $-$1.48  & $-$0.13  & $-$0.52 \\
 19 & 2 & 2XMM J024308.1$-$000126 & 51~755.121  & 0.679 &  0 & 0   & 29.38  & 25.56  & $-$1.47  & $-$0.09  & $-$0.31 \\
 20 &   & 2XMM J025301.5$-$011148 & 52~836.367  & 0.769 &  0 & 0   & 30.00  & 25.57  & $-$1.70  & $-$0.21  & $-$0.03 \\
 21 &   & 2XMM J030357.4$-$010906 & 53~785.020  & 1.520 &  0 & 0   & 30.96  & 26.85  & $-$1.58  &  0.08  & $-$0.24 \\
 22 &   & 2XMM J030627.5$-$001816 & 53~212.285  & 1.538 &  0 & 0   & 30.36  & 26.88  & $-$1.33  &  0.22  & $-$0.29 \\
 23 &   & 2XMM J030639.6+000725 & 52~681.762  & 2.172 &  0 & 0   & 30.92  & 26.26  & $-$1.79  & $-$0.14  & $-$0.50 \\
 24 &   & 2XMM J030641.7+000109 & 52~681.762  & 1.397 &  0 & 0   & 30.27  & 26.13  & $-$1.59  & $-$0.06  & $-$0.42 \\
 25 &   & 2XMM J030707.3$-$000424 & 52~681.762  & 0.664 &  0 & 0   & 29.64  & 25.87  & $-$1.45  & $-$0.03  & $-$0.38 \\
 26 &   & 2XMM J033810.1+002324 & 52~327.367  & 1.120 & $-$1 & 0   & 30.50  & 26.44  & $-$1.56  &  0.02  & $-$0.37 \\
 27 &   & 2XMM J033852.8+001905 & 52~327.367  & 0.459 & $-$1 & 0   & 29.40  & 24.69  & $-$1.81  & $-$0.43  &  0.17 \\
 28 &   & 2XMM J034131.1$-$011405 & 53~026.754  & 1.791 & $-$1 & 0   & 30.74  & 25.85  & $-$1.88  & $-$0.26  & $-$0.40 \\
 29 &   & 2XMM J073601.4+434455 & 52~205.023  & 1.814 &  0 & 0   & 30.84  & 26.59  & $-$1.63  &  0.01  & $-$0.44 \\
 30 &   & 2XMM J074110.6+311200 & 52~018.582  & 0.631 &  1 & 0   & 30.74  & 26.99  & $-$1.44  &  0.18  & $-$0.31 \\
 31 &   & 2XMM J074222.3+494147 & 52~025.754  & 0.927 &  0 & 0   & 30.58  & 26.45  & $-$1.58  &  0.01  & $-$0.42 \\
 32 &   & 2XMM J080711.0+390419 & 52~764.121  & 0.369 &  0 & 0   & 29.43  & 26.17  & $-$1.25  &  0.13  & $-$0.40 \\
 33 &   & 2XMM J081014.5+280337 & 52~552.309  & 0.821 &  0 & 0   & 30.66  & 26.91  & $-$1.44  &  0.16  & $-$0.38 \\
 34 &   & 2XMM J081030.2+281326 & 52~552.309  & 0.887 &  0 & 0   & 30.20  & 26.39  & $-$1.46  &  0.06  & $-$0.40 \\
 35 &   & 2XMM J081108.6+280500 & 52~552.309  & 1.560 &  0 & 0   & 30.57  & 26.25  & $-$1.66  & $-$0.07  & $-$0.31 \\
 36 &   & 2XMM J082257.6+404149 & 53~464.184  & 0.865 &  1 & 0   & 30.12  & 26.87  & $-$1.25  &  0.26  & $-$0.40 \\
 37 & 1 & 2XMM J084905.0+445714 & 52~197.344  & 1.259 &  0 & 0   & 30.22  & 26.37  & $-$1.48  &  0.05  & $-$0.35 \\
 37 & 2 & 2XMM J084905.0+445714 & 52~203.820  & 1.259 &  0 & 0   & 30.22  & 26.29  & $-$1.51  &  0.02  & $-$0.45 \\
 38 &   & 2XMM J085522.9+375425 & 53~653.344  & 2.296 &  0 & 0   & 31.09  & 26.56  & $-$1.74  & $-$0.06  & $-$0.33 \\
 39 &   & 2XMM J085551.1+375752 & 53~653.344  & 1.929 &  0 & 1   & 31.31  & 26.62  & $-$1.80  & $-$0.08  & $-$0.34 \\
 40 &   & 2XMM J085609.4+374928 & 53~653.344  & 2.570 &  0 & 0   & 31.59  & 26.96  & $-$1.77  & $-$0.00  & $-$0.40 \\
 41 &   & 2XMM J085724.0+090349 & 52~743.902  & 1.049 &  0 & 0   & 31.22  & 26.65  & $-$1.75  & $-$0.05  &  0.09 \\
 42 &   & 2XMM J085808.9+274522 & 53~469.824  & 1.090 &  0 & 0   & 30.40  & 26.65  & $-$1.44  &  0.12  & $-$0.40 \\
 43 &   & 2XMM J090029.0+390145 & 53~108.977  & 0.964 &  0 & 0   & 30.63  & 26.65  & $-$1.53  &  0.07  & $-$0.38 \\
 44 &   & 2XMM J091029.0+542719 & 53~457.977  & 0.526 &  0 & 0   & 30.08  & 26.25  & $-$1.47  &  0.03  & $-$0.39 \\
 45 & 1 & 2XMM J091301.0+525929 & 52~746.621  & 1.377 &  0 & 0   & 31.67  & 27.90  & $-$1.45  &  0.33  & $-$0.25 \\
 45 & 2 & 2XMM J091301.0+525929 & 52~777.559  & 1.377 &  0 & 0   & 31.68  & 27.89  & $-$1.45  &  0.34  & $-$0.27 \\
 46 & 1 & 2XMM J091302.8+530322 & 52~746.621  & 0.631 &  0 & 0   & 29.80  & 25.75  & $-$1.55  & $-$0.10  &  0.41 \\
 46 & 2 & 2XMM J091302.8+530322 & 52~777.559  & 0.631 &  0 & 0   & 29.74  & 25.64  & $-$1.57  & $-$0.13  &  0.43 \\
 47 &   & 2XMM J091345.5+405629 & 52~756.375  & 0.442 &  1 & 0   & 29.52  & 27.11  & $-$0.93  &  0.47  & $-$0.36 \\
 48 &   & 2XMM J091528.7+441633 & 53~289.238  & 1.489 &  1 & 0   & 31.22  & 27.42  & $-$1.46  &  0.24  & $-$0.22 \\
 49 &   & 2XMM J091617.4+303038 & 52~751.641  & 0.215 &  0 & 0   & 29.15  & 25.22  & $-$1.51  & $-$0.18  & $-$0.35 \\
 50 &   & 2XMM J092138.4+301546 & 52~752.086  & 1.590 &  0 & 1   & 31.06  & 26.24  & $-$1.85  & $-$0.18  & $-$0.11 \\
 51 &   & 2XMM J092238.3+512120 & 53~651.457  & 1.753 &  0 & 0   & 30.35  & 26.12  & $-$1.62  & $-$0.07  & $-$0.67 \\
 52 &   & 2XMM J092246.9+512037 & 53~651.457  & 0.160 &  0 & 0   & 29.33  & 25.44  & $-$1.49  & $-$0.12  & $-$0.58 \\
 53 & 1 & 2XMM J093359.2+551550 & 52~374.898  & 1.863 &  0 & 0   & 30.79  & 26.99  & $-$1.46  &  0.17  & $-$0.31 \\
 53 & 2 & 2XMM J093359.2+551550 & 52~381.078  & 1.863 &  0 & 0   & 30.86  & 26.95  & $-$1.50  &  0.14  & $-$0.36 \\
 54 & 1 & 2XMM J094404.3+480647 & 53~292.855  & 0.392 &  0 & 0   & 29.85  & 25.78  & $-$1.57  & $-$0.11  & $-$0.35 \\
 54 & 2 & 2XMM J094404.3+480647 & 53~322.395  & 0.392 &  0 & 0   & 29.32  & 25.75  & $-$1.37  & $-$0.01  & $-$0.47 \\
 55 &   & 2XMM J094409.6+480813 & 53~322.395  & 1.111 &  0 & 0   & 29.70  & 25.53  & $-$1.60  & $-$0.17  & $-$0.00 \\
 56 &   & 2XMM J094437.9+035936 & 53~143.621  & 1.335 &  0 & 0   & 30.16  & 26.50  & $-$1.40  &  0.11  & $-$0.19 \\
 57 &   & 2XMM J094439.8+034940 & 53~143.621  & 0.155 &  0 & 0   & 29.31  & 25.30  & $-$1.54  & $-$0.18  & $-$0.30 \\
 58 &   & 2XMM J095253.7+075040 & 52~402.926  & 1.468 &  0 & 0   & 31.12  & 26.59  & $-$1.74  & $-$0.05  &  0.16 \\
 59 &   & 2XMM J095815.5+014922 & 53~500.598  & 1.509 &  0 & 0   & 30.41  & 27.10  & $-$1.27  &  0.29  & $-$0.35 \\
 60 &   & 2XMM J095819.8+022903 & 53~312.266  & 0.345 &  0 & 0   & 29.32  & 25.43  & $-$1.49  & $-$0.13  & $-$0.42 \\
 61 &   & 2XMM J095821.6+024628 & 53~348.320  & 1.403 &  1 & 0   & 30.56  & 26.70  & $-$1.48  &  0.11  & $-$0.35 \\
 62 &   & 2XMM J095834.0+024427 & 53~348.320  & 1.888 &  0 & 0   & 31.02  & 26.83  & $-$1.61  &  0.06  & $-$0.35 \\
 63 & 1 & 2XMM J095857.3+021314 & 52~984.953  & 1.024 &  0 & 0   & 29.78  & 27.09  & $-$1.03  &  0.42  & $-$0.29 \\
 63 & 2 & 2XMM J095857.3+021314 & 53~499.809  & 1.024 &  0 & 0   & 29.85  & 26.98  & $-$1.10  &  0.36  & $-$0.16 \\
 64 & 1 & 2XMM J095858.6+020139 & 53~351.918  & 2.454 &  0 & 0   & 31.05  & 26.99  & $-$1.56  &  0.11  & $-$0.49 \\
 64 & 2 & 2XMM J095858.6+020139 & 53~500.195  & 2.454 &  0 & 0   & 31.10  & 27.04  & $-$1.56  &  0.12  & $-$0.47 \\
 65 &   & 2XMM J095902.7+021906 & 52~984.953  & 0.345 &  0 & 0   & 28.94  & 26.00  & $-$1.13  &  0.17  & $-$0.34 \\
 66 &   & 2XMM J095908.3+024309 & 53~701.762  & 1.317 &  1 & 0   & 30.57  & 27.19  & $-$1.30  &  0.29  & $-$0.30 \\
 67 &   & 2XMM J095918.7+020951 & 52~984.953  & 1.157 &  1 & 0   & 30.03  & 26.81  & $-$1.24  &  0.25  & $-$0.28 \\
 68 &   & 2XMM J095924.4+015954 & 53~351.918  & 1.236 &  0 & 0   & 30.95  & 26.65  & $-$1.65  &  0.01  & $-$0.40 \\
 69 &   & 2XMM J095946.0+024743 & 53~701.762  & 1.067 &  0 & 0   & 30.65  & 26.42  & $-$1.62  & $-$0.02  & $-$0.43 \\
 70 &   & 2XMM J095949.4+020141 & 53~351.918  & 1.753 &  0 & 0   & 30.94  & 25.61  & $-$2.05  & $-$0.40  & $-$0.76 \\
 71 &   & 2XMM J095958.0+014327 & 53~328.664  & 1.618 &  0 & 0   & 30.56  & 25.72  & $-$1.86  & $-$0.27  & $-$0.63 \\
 72 &   & 2XMM J100001.3+024845 & 53~340.984  & 0.766 &  0 & 0   & 29.99  & 26.04  & $-$1.52  & $-$0.04  & $-$0.40 \\
 73 & 1 & 2XMM J100012.9+023522 & 52~981.777  & 0.699 &  0 & 0   & 30.03  & 26.12  & $-$1.50  & $-$0.01  & $-$0.42 \\
 73 & 2 & 2XMM J100012.9+023522 & 53~340.984  & 0.699 &  0 & 0   & 30.13  & 26.04  & $-$1.57  & $-$0.06  & $-$0.56 \\
 73 & 3 & 2XMM J100012.9+023522 & 53~697.477  & 0.699 &  0 & 0   & 29.84  & 25.99  & $-$1.48  & $-$0.02  & $-$0.56 \\
 74 &   & 2XMM J100024.3+015053 & 52~983.094  & 1.664 &  0 & 0   & 30.35  & 26.42  & $-$1.51  &  0.04  & $-$0.29 \\
 75 & 1 & 2XMM J100024.6+023148 & 52~981.777  & 1.318 &  0 & 0   & 30.75  & 26.47  & $-$1.64  & $-$0.02  & $-$0.40 \\
 75 & 2 & 2XMM J100024.6+023148 & 53~697.477  & 1.318 &  0 & 0   & 30.72  & 26.25  & $-$1.71  & $-$0.10  & $-$0.45 \\
 76 &   & 2XMM J100025.2+015852 & 52~983.094  & 0.373 &  0 & 0   & 29.39  & 26.00  & $-$1.30  &  0.08  & $-$0.35 \\
 77 & 1 & 2XMM J100043.1+020637 & 52~983.484  & 0.360 &  0 & 0   & 28.98  & 25.43  & $-$1.36  & $-$0.06  & $-$0.41 \\
 77 & 2 & 2XMM J100043.1+020637 & 53~697.738  & 0.360 &  0 & 0   & 29.05  & 25.41  & $-$1.40  & $-$0.08  & $-$0.11 \\
 78 &   & 2XMM J100058.8+015359 & 53~329.047  & 1.559 &  0 & 0   & 30.36  & 26.65  & $-$1.42  &  0.13  & $-$0.17 \\
 79 & 1 & 2XMM J100114.3+022356 & 52~979.078  & 1.799 &  0 & 0   & 30.93  & 26.56  & $-$1.68  & $-$0.03  & $-$0.40 \\
 79 & 2 & 2XMM J100114.3+022356 & 53~697.227  & 1.799 &  0 & 0   & 30.88  & 26.61  & $-$1.64  &  0.00  & $-$0.24 \\
 80 &   & 2XMM J100116.7+014053 & 53~331.000  & 2.055 &  0 & 0   & 30.95  & 26.30  & $-$1.78  & $-$0.12  & $-$0.49 \\
 81 & 1 & 2XMM J100120.2+023341 & 52~979.078  & 1.834 &  0 & 0   & 30.65  & 26.11  & $-$1.74  & $-$0.14  & $-$0.39 \\
 81 & 2 & 2XMM J100120.2+023341 & 53~697.227  & 1.834 &  0 & 0   & 30.82  & 26.49  & $-$1.66  & $-$0.03  & $-$0.42 \\
 82 &   & 2XMM J100130.3+014304 & 53~331.000  & 1.571 &  0 & 0   & 30.46  & 26.25  & $-$1.62  & $-$0.05  & $-$0.18 \\
 83 &   & 2XMM J100132.2+013419 & 53~331.000  & 1.360 &  0 & 0   & 30.35  & 26.09  & $-$1.63  & $-$0.08  & $-$0.23 \\
 84 &   & 2XMM J100205.2+554258 & 52~926.145  & 1.151 &  0 & 0   & 30.79  & 26.55  & $-$1.63  & $-$0.00  &  0.35 \\
 85 & 1 & 2XMM J100219.5+015537 & 53~330.234  & 1.509 &  0 & 0   & 30.29  & 26.06  & $-$1.62  & $-$0.08  & $-$0.57 \\
 85 & 2 & 2XMM J100219.5+015537 & 53~696.145  & 1.509 &  0 & 0   & 30.42  & 26.13  & $-$1.65  & $-$0.09  & $-$0.62 \\
 86 &   & 2XMM J100226.3+021923 & 53~504.160  & 1.294 &  0 & 0   & 30.17  & 26.41  & $-$1.44  &  0.08  & $-$0.41 \\
 87 & 1 & 2XMM J100232.1+023537 & 53~350.574  & 0.658 &  0 & 0   & 30.00  & 25.98  & $-$1.54  & $-$0.05  & $-$0.47 \\
 87 & 2 & 2XMM J100232.1+023537 & 53~695.887  & 0.658 &  0 & 0   & 29.89  & 25.93  & $-$1.52  & $-$0.05  & $-$0.52 \\
 88 & 1 & 2XMM J100234.3+015011 & 53~330.234  & 1.506 &  0 & 0   & 30.93  & 26.43  & $-$1.73  & $-$0.08  & $-$0.52 \\
 88 & 2 & 2XMM J100234.3+015011 & 53~693.703  & 1.506 &  0 & 0   & 30.95  & 26.61  & $-$1.66  & $-$0.00  & $-$0.38 \\
 89 &   & 2XMM J100236.6+015949 & 53~330.234  & 1.516 &  0 & 0   & 30.60  & 26.11  & $-$1.72  & $-$0.13  & $-$0.27 \\
 90 & 1 & 2XMM J100238.2+013747 & 53~330.621  & 2.506 &  0 & 0   & 31.23  & 26.96  & $-$1.64  &  0.06  & $-$0.21 \\
 90 & 2 & 2XMM J100238.2+013747 & 53~693.703  & 2.506 &  0 & 0   & 31.29  & 26.71  & $-$1.76  & $-$0.04  & $-$0.54 \\
 91 &   & 2XMM J100248.9+325130 & 53~677.328  & 1.537 &  0 & 0   & 30.68  & 26.87  & $-$1.46  &  0.15  & $-$0.39 \\
 92 &   & 2XMM J100325.0+325305 & 53~677.328  & 2.511 &  0 & 0   & 31.29  & 26.47  & $-$1.85  & $-$0.13  & $-$0.31 \\
 93 &   & 2XMM J100441.0+410944 & 53~115.141  & 1.022 &  0 & 0   & 30.63  & 25.84  & $-$1.84  & $-$0.24  & $-$0.34 \\
 94 &   & 2XMM J100717.2+124543 & 52~763.820  & 1.281 &  0 & 0   & 31.21  & 26.79  & $-$1.70  &  0.00  & $-$0.39 \\
 95 &   & 2XMM J100726.0+124856 & 52~763.820  & 0.241 &  1 & 1   & 30.46  & 25.70  & $-$1.83  & $-$0.26  & $-$0.15 \\
 96 &   & 2XMM J101148.9+554102 & 52~224.977  & 1.533 &  0 & 0   & 30.72  & 26.51  & $-$1.61  &  0.00  & $-$0.27 \\
 97 &   & 2XMM J101720.6+385738 & 52~215.426  & 0.629 &  0 & 0   & 29.77  & 26.27  & $-$1.34  &  0.11  & $-$0.33 \\
 98 &   & 2XMM J101850.4+411508 & 52~216.008  & 0.577 &  0 & 0   & 30.24  & 26.41  & $-$1.47  &  0.06  & $-$0.46 \\
 99 &   & 2XMM J101857.5+412549 & 52~216.008  & 2.123 &  0 & 0   & 30.69  & 26.73  & $-$1.52  &  0.09  & $-$0.18 \\
100 &   & 2XMM J102003.7+081837 & 52~055.531  & 2.094 &  0 & 0   & 30.81  & 27.24  & $-$1.37  &  0.26  & $-$0.24 \\
101 &   & 2XMM J102117.7+131546 & 52~764.246  & 1.565 &  0 & 0   & 31.00  & 26.73  & $-$1.64  &  0.02  & $-$0.53 \\
102 &   & 2XMM J102124.9+130115 & 52~764.246  & 1.007 &  0 & 0   & 30.41  & 26.46  & $-$1.52  &  0.04  & $-$0.44 \\
103 &   & 2XMM J102147.4+130850 & 52~764.246  & 0.656 &  0 & 0   & 30.05  & 26.35  & $-$1.42  &  0.07  & $-$0.38 \\
104 &   & 2XMM J102350.9+041542 & 51~883.770  & 1.809 &  0 & 0   & 30.93  & 26.46  & $-$1.72  & $-$0.07  & $-$0.28 \\
105 &   & 2XMM J103031.6+052455 & 52~781.621  & 1.183 &  0 & 0   & 31.36  & 26.48  & $-$1.87  & $-$0.14  & $-$0.38 \\
106 &   & 2XMM J103216.0+505119 & 53~473.809  & 0.173 &  0 & 0   & 29.15  & 25.63  & $-$1.35  & $-$0.02  & $-$0.11 \\
107 &   & 2XMM J103338.7+004226 & 53~715.141  & 0.361 &  0 & 0   & 29.10  & 24.88  & $-$1.62  & $-$0.29  & $-$0.62 \\
108 &   & 2XMM J103413.9+585252 & 52~930.035  & 0.745 &  0 & 0   & 30.78  & 26.33  & $-$1.71  & $-$0.09  & $-$0.46 \\
109 &   & 2XMM J103922.6+643417 & 53~677.684  & 2.128 & $-$1 & 0   & 31.19  & 26.74  & $-$1.71  & $-$0.01  & $-$0.19 \\
110 &   & 2XMM J103935.7+533039 & 52~040.297  & 0.229 &  0 & 0   & 28.79  & 25.43  & $-$1.29  & $-$0.02  & $-$0.36 \\
111 &   & 2XMM J103951.5+643005 & 53~677.684  & 0.402 &  1 & 0   & 28.82  & 24.24  & $-$1.76  & $-$0.48  & $-$0.41 \\
112 &   & 2XMM J104155.7+061256 & 52~777.816  & 1.478 &  0 & 0   & 30.62  & 26.01  & $-$1.77  & $-$0.17  & $-$0.46 \\
113 &   & 2XMM J104542.2+525112 & 53~303.078  & 1.058 &  1 & 0   & 30.85  & 27.30  & $-$1.37  &  0.27  & $-$0.37 \\
114 &   & 2XMM J104609.8+530008 & 53~303.078  & 1.179 &  0 & 0   & 30.61  & 26.41  & $-$1.61  & $-$0.02  & $-$0.27 \\
115 &   & 2XMM J104613.6+525554 & 53~303.078  & 0.503 &  0 & 0   & 30.31  & 26.14  & $-$1.60  & $-$0.06  & $-$0.66 \\
116 & 1 & 2XMM J105039.5+572336 & 52~562.273  & 1.447 &  1 & 0   & 30.52  & 26.66  & $-$1.48  &  0.10  & $-$0.30 \\
116 & 2 & 2XMM J105039.5+572336 & 52~564.340  & 1.447 &  1 & 0   & 30.51  & 26.54  & $-$1.52  &  0.06  & $-$0.44 \\
117 &   & 2XMM J105143.8+335927 & 52~407.168  & 0.167 &  0 & 0   & 29.65  & 26.04  & $-$1.39  &  0.03  & $-$0.39 \\
118 &   & 2XMM J105204.5+440152 & 52~754.262  & 1.524 &  0 & 0   & 30.83  & 26.64  & $-$1.61  &  0.02  & $-$0.12 \\
119 & 1 & 2XMM J105221.0+440439 & 52~754.262  & 0.968 &  0 & 0   & 30.80  & 26.06  & $-$1.82  & $-$0.19  & $-$0.47 \\
119 & 2 & 2XMM J105221.0+440439 & 52~783.555  & 0.968 &  0 & 0   & 30.85  & 26.31  & $-$1.74  & $-$0.10  & $-$0.43 \\
120 & 1 & 2XMM J105224.9+441505 & 52~754.262  & 0.443 &  0 & 0   & 29.48  & 26.29  & $-$1.23  &  0.16  & $-$0.37 \\
120 & 2 & 2XMM J105224.9+441505 & 52~783.555  & 0.443 &  0 & 0   & 29.40  & 26.15  & $-$1.25  &  0.13  & $-$0.43 \\
121 & 1 & 2XMM J105239.6+572431 & 51~661.148  & 1.112 &  0 & 0   & 30.91  & 26.67  & $-$1.63  &  0.02  & $-$0.41 \\
121 & 2 & 2XMM J105239.6+572431 & 52~209.797  & 1.112 &  0 & 0   & 30.78  & 26.82  & $-$1.52  &  0.10  & $-$0.43 \\
121 & 3 & 2XMM J105239.6+572431 & 52~217.285  & 1.112 &  0 & 0   & 30.78  & 26.81  & $-$1.52  &  0.10  & $-$0.36 \\
121 & 4 & 2XMM J105239.6+572431 & 52~566.344  & 1.112 &  0 & 0   & 30.72  & 26.70  & $-$1.54  &  0.07  & $-$0.33 \\
121 & 5 & 2XMM J105239.6+572431 & 52~568.359  & 1.112 &  0 & 0   & 30.73  & 26.75  & $-$1.53  &  0.09  & $-$0.41 \\
121 & 6 & 2XMM J105239.6+572431 & 52~570.340  & 1.112 &  0 & 0   & 30.73  & 26.79  & $-$1.51  &  0.11  & $-$0.42 \\
121 & 7 & 2XMM J105239.6+572431 & 52~605.977  & 1.112 &  0 & 0   & 30.74  & 26.70  & $-$1.55  &  0.07  & $-$0.40 \\
121 & 8 & 2XMM J105239.6+572431 & 52~612.199  & 1.112 &  0 & 0   & 30.73  & 26.72  & $-$1.54  &  0.08  & $-$0.40 \\
121 & 9 & 2XMM J105239.6+572431 & 52~614.160  & 1.112 &  0 & 0   & 30.73  & 26.75  & $-$1.53  &  0.09  & $-$0.38 \\
122 & 1 & 2XMM J105316.7+573550 & 51~661.148  & 1.205 &  0 & 0   & 30.00  & 27.10  & $-$1.11  &  0.38  & $-$0.30 \\
122 & 2 & 2XMM J105316.7+573550 & 52~570.340  & 1.205 &  0 & 0   & 30.21  & 26.99  & $-$1.24  &  0.28  & $-$0.30 \\
122 & 3 & 2XMM J105316.7+573550 & 52~572.340  & 1.205 &  0 & 0   & 30.19  & 27.00  & $-$1.23  &  0.29  & $-$0.29 \\
122 & 4 & 2XMM J105316.7+573550 & 52~605.977  & 1.205 &  0 & 0   & 30.26  & 27.04  & $-$1.23  &  0.30  & $-$0.29 \\
122 & 5 & 2XMM J105316.7+573550 & 52~614.160  & 1.205 &  0 & 0   & 30.23  & 27.11  & $-$1.20  &  0.33  & $-$0.26 \\
123 &   & 2XMM J110334.7+355108 & 52~044.387  & 1.200 &  0 & 0   & 30.05  & 25.89  & $-$1.60  & $-$0.11  & $-$0.61 \\
124 &   & 2XMM J111038.5+483116 & 52~426.695  & 2.955 &  0 & 0   & 32.01  & 27.26  & $-$1.83  &  0.01  & $-$0.44 \\
125 &   & 2XMM J111706.4+441333 & 52~408.680  & 0.144 &  0 & 0   & 29.71  & 26.06  & $-$1.40  &  0.03  & $-$0.10 \\
126 &   & 2XMM J111753.3+412016 & 53~715.844  & 2.221 &  1 & 0   & 31.13  & 27.59  & $-$1.36  &  0.33  & $-$0.33 \\
127 &   & 2XMM J111830.2+402554 & 52~411.293  & 0.155 &  0 & 0   & 29.92  & 25.99  & $-$1.51  & $-$0.04  & $-$0.53 \\
128 &   & 2XMM J112026.2+134024 & 51~875.809  & 0.982 &  0 & 0   & 30.32  & 26.57  & $-$1.44  &  0.10  & $-$0.39 \\
129 &   & 2XMM J112048.9+133822 & 51~875.809  & 0.513 &  0 & 0   & 29.64  & 25.04  & $-$1.76  & $-$0.34  & $-$0.02 \\
130 &   & 2XMM J112611.6+425245 & 51~871.109  & 0.156 &  0 & 0   & 28.68  & 23.82  & $-$1.86  & $-$0.61  &  0.52 \\
131 &   & 2XMM J113109.4+311405 & 51~870.762  & 0.290 &  1 & 0   & 30.30  & 26.82  & $-$1.33  &  0.21  & $-$0.36 \\
132 & 1 & 2XMM J113224.0+525157 & 53~127.523  & 0.837 &  0 & 0   & 30.14  & 26.06  & $-$1.56  & $-$0.05  & $-$0.21 \\
132 & 2 & 2XMM J113224.0+525157 & 53~313.078  & 0.837 &  0 & 0   & 30.01  & 25.88  & $-$1.59  & $-$0.10  & $-$0.48 \\
133 &   & 2XMM J114856.5+525426 & 53~313.254  & 1.633 &  1 & 0   & 31.77  & 27.88  & $-$1.49  &  0.31  & $-$0.25 \\
134 &   & 2XMM J115838.5+435505 & 53~687.480  & 1.208 &  1 & 0   & 30.33  & 26.31  & $-$1.54  &  0.00  & $-$0.20 \\
135 &   & 2XMM J115851.0+435048 & 53~687.480  & 0.287 &  0 & 0   & 29.02  & 25.42  & $-$1.38  & $-$0.07  & $-$0.47 \\
136 &   & 2XMM J120504.4+352209 & 52~782.684  & 2.279 &  0 & 0   & 31.55  & 26.98  & $-$1.75  &  0.01  & $-$0.30 \\
137 &   & 2XMM J120522.1+443141 & 52~801.723  & 1.921 &  0 & 1   & 31.06  & 26.61  & $-$1.71  & $-$0.04  & $-$0.07 \\
138 &   & 2XMM J121342.9+025248 & 52~273.520  & 0.641 &  0 & 0   & 29.65  & 25.50  & $-$1.59  & $-$0.17  & $-$0.61 \\
139 & 1 & 2XMM J121426.5+140259 & 52~075.359  & 1.279 &  1 & 0   & 30.36  & 27.15  & $-$1.23  &  0.32  & $-$0.31 \\
139 & 2 & 2XMM J121426.5+140259 & 53~177.242  & 1.279 &  1 & 0   & 30.40  & 27.23  & $-$1.22  &  0.34  & $-$0.30 \\
140 &   & 2XMM J121640.5+071224 & 53~165.395  & 0.586 &  0 & 0   & 30.72  & 26.77  & $-$1.52  &  0.09  & $-$0.42 \\
141 &   & 2XMM J121713.1+070236 & 53~165.395  & 1.203 &  0 & 0   & 30.73  & 26.59  & $-$1.59  &  0.03  & $-$0.58 \\
142 &   & 2XMM J121919.0+063926 & 52~626.047  & 0.654 &  0 & 0   & 29.78  & 25.93  & $-$1.48  & $-$0.03  & $-$0.44 \\
143 &   & 2XMM J122018.4+064120 & 52~460.359  & 0.286 &  0 & 0   & 29.63  & 26.46  & $-$1.22  &  0.20  & $-$0.38 \\
144 &   & 2XMM J122528.4+131725 & 53~366.883  & 1.794 &  0 & 0   & 31.60  & 26.54  & $-$1.94  & $-$0.17  & $-$0.43 \\
145 &   & 2XMM J122556.1+130656 & 52~456.777  & 1.350 &  0 & 0   & 30.68  & 26.50  & $-$1.60  &  0.01  & $-$0.26 \\
146 &   & 2XMM J122703.3+125402 & 53~358.168  & 1.278 &  0 & 0   & 30.59  & 26.15  & $-$1.70  & $-$0.11  & $-$0.37 \\
147 &   & 2XMM J122742.9+013438 & 52~083.336  & 1.279 &  0 & 0   & 30.54  & 26.54  & $-$1.53  &  0.05  & $-$0.24 \\
148 &   & 2XMM J122923.7+075359 & 52~430.555  & 0.854 &  0 & 0   & 29.79  & 26.53  & $-$1.25  &  0.20  & $-$0.30 \\
149 & 1 & 2XMM J123049.7+640848 & 51~685.082  & 1.040 & $-$1 & 0   & 30.35  & 26.18  & $-$1.60  & $-$0.05  & $-$0.50 \\
149 & 2 & 2XMM J123049.7+640848 & 52~760.367  & 1.040 & $-$1 & 0   & 30.32  & 25.77  & $-$1.74  & $-$0.20  & $-$0.37 \\
150 & 1 & 2XMM J123054.1+110011 & 52~833.379  & 0.236 &  0 & 0   & 29.95  & 26.36  & $-$1.38  &  0.10  & $-$0.42 \\
150 & 2 & 2XMM J123054.1+110011 & 53~717.434  & 0.236 &  0 & 0   & 30.03  & 26.28  & $-$1.44  &  0.05  & $-$0.42 \\
150 & 3 & 2XMM J123054.1+110011 & 53~721.234  & 0.236 &  0 & 0   & 30.02  & 26.30  & $-$1.43  &  0.06  & $-$0.43 \\
151 & 1 & 2XMM J123229.6+641115 & 51~685.082  & 0.743 &  0 & 0   & 30.39  & 25.95  & $-$1.70  & $-$0.14  & $-$0.40 \\
151 & 2 & 2XMM J123229.6+641115 & 52~760.367  & 0.743 &  0 & 0   & 30.45  & 26.26  & $-$1.61  & $-$0.04  & $-$0.42 \\
152 &   & 2XMM J123335.1+475801 & 53~173.680  & 0.382 &  0 & 0   & 30.19  & 26.65  & $-$1.36  &  0.16  & $-$0.47 \\
153 &   & 2XMM J123356.1+074755 & 53~161.492  & 0.371 &  0 & 0   & 29.31  & 26.13  & $-$1.22  &  0.14  & $-$0.39 \\
154 &   & 2XMM J123413.4+475352 & 53~173.680  & 0.373 &  1 & 0   & 30.05  & 26.27  & $-$1.45  &  0.04  & $-$0.49 \\
155 &   & 2XMM J123508.2+393019 & 53~149.184  & 0.968 &  0 & 0   & 30.03  & 25.87  & $-$1.60  & $-$0.11  & $-$0.42 \\
156 &   & 2XMM J123527.3+392824 & 53~149.184  & 2.158 &  0 & 0   & 31.04  & 26.97  & $-$1.56  &  0.11  & $-$0.34 \\
157 & 1 & 2XMM J123622.9+621526 & 52~047.398  & 2.587 &  0 & 0   & 30.79  & 26.81  & $-$1.53  &  0.10  & $-$0.17 \\
157 & 2 & 2XMM J123622.9+621526 & 52~047.977  & 2.587 &  0 & 0   & 30.77  & 26.65  & $-$1.58  &  0.04  & $-$0.42 \\
157 & 3 & 2XMM J123622.9+621526 & 52~056.293  & 2.587 &  0 & 0   & 30.55  & 26.70  & $-$1.48  &  0.10  & $-$0.35 \\
157 & 4 & 2XMM J123622.9+621526 & 52~061.379  & 2.587 &  0 & 0   & 30.55  & 26.68  & $-$1.49  &  0.09  & $-$0.37 \\
157 & 5 & 2XMM J123622.9+621526 & 52~967.422  & 2.587 &  0 & 0   & 30.57  & 26.02  & $-$1.75  & $-$0.16  & $-$0.84 \\
157 & 6 & 2XMM J123622.9+621526 & 52~987.977  & 2.587 &  0 & 0   & 30.46  & 26.51  & $-$1.51  &  0.06  & $-$0.08 \\
158 & 1 & 2XMM J123759.5+621102 & 52~047.398  & 0.910 &  0 & 0   & 30.51  & 26.65  & $-$1.48  &  0.10  & $-$0.35 \\
158 & 2 & 2XMM J123759.5+621102 & 52~047.977  & 0.910 &  0 & 0   & 30.49  & 26.72  & $-$1.45  &  0.12  & $-$0.30 \\
158 & 3 & 2XMM J123759.5+621102 & 52~056.293  & 0.910 &  0 & 0   & 30.53  & 26.58  & $-$1.52  &  0.06  & $-$0.39 \\
158 & 4 & 2XMM J123759.5+621102 & 52~061.379  & 0.910 &  0 & 0   & 30.52  & 26.59  & $-$1.51  &  0.07  & $-$0.33 \\
158 & 5 & 2XMM J123759.5+621102 & 52~967.422  & 0.910 &  0 & 0   & 30.31  & 26.43  & $-$1.49  &  0.05  & $-$0.23 \\
159 & 1 & 2XMM J123800.9+621336 & 52~047.398  & 0.440 &  0 & 0   & 29.59  & 25.58  & $-$1.54  & $-$0.13  & $-$0.53 \\
159 & 2 & 2XMM J123800.9+621336 & 52~047.977  & 0.440 &  0 & 0   & 29.57  & 25.48  & $-$1.57  & $-$0.16  & $-$0.55 \\
159 & 3 & 2XMM J123800.9+621336 & 52~056.293  & 0.440 &  0 & 0   & 29.57  & 25.33  & $-$1.63  & $-$0.22  & $-$0.46 \\
159 & 4 & 2XMM J123800.9+621336 & 52~061.379  & 0.440 &  0 & 0   & 29.55  & 25.50  & $-$1.56  & $-$0.15  & $-$0.47 \\
159 & 5 & 2XMM J123800.9+621336 & 52~967.422  & 0.440 &  0 & 0   & 29.48  & 25.42  & $-$1.56  & $-$0.17  & $-$0.24 \\
159 & 6 & 2XMM J123800.9+621336 & 52~979.543  & 0.440 &  0 & 0   & 29.46  & 25.33  & $-$1.58  & $-$0.19  & $-$0.32 \\
160 &   & 2XMM J124406.9+113524 & 51~911.711  & 1.344 &  0 & 0   & 30.26  & 26.80  & $-$1.33  &  0.20  & $-$0.37 \\
161 &   & 2XMM J124540.9$-$002744 & 52~452.605  & 1.693 &  0 & 0   & 31.07  & 27.29  & $-$1.45  &  0.23  & $-$0.33 \\
162 &   & 2XMM J124728.5+671725 & 53~703.648  & 1.220 & $-$1 & 0   & 30.57  & 26.43  & $-$1.59  & $-$0.00  & $-$0.38 \\
163 &   & 2XMM J125535.1+565238 & 52~067.582  & 1.803 &  0 & 0   & 30.84  & 26.33  & $-$1.73  & $-$0.09  & $-$0.52 \\
164 &   & 2XMM J125536.2+564959 & 52~067.582  & 1.374 &  0 & 0   & 30.24  & 25.94  & $-$1.65  & $-$0.12  &  0.08 \\
165 &   & 2XMM J125642.1+564719 & 52~067.582  & 1.956 &  0 & 0   & 30.62  & 26.50  & $-$1.58  &  0.02  & $-$0.45 \\
166 &   & 2XMM J125840.2+283426 & 51~719.062  & 1.321 &  0 & 0   & 30.66  & 26.03  & $-$1.78  & $-$0.18  & $-$0.27 \\
167 &   & 2XMM J125849.8$-$014303 & 52~272.977  & 0.967 &  0 & 0   & 31.13  & 26.98  & $-$1.59  &  0.10  & $-$0.44 \\
168 & 1 & 2XMM J125903.9+344702 & 52~804.578  & 0.608 &  0 & 0   & 29.79  & 26.20  & $-$1.38  &  0.07  & $-$0.34 \\
168 & 2 & 2XMM J125903.9+344702 & 52~976.324  & 0.608 &  0 & 0   & 29.41  & 25.94  & $-$1.33  &  0.05  & $-$0.35 \\
169 & 1 & 2XMM J130028.5+283010 & 52~432.785  & 0.649 &  1 & 0   & 30.57  & 27.02  & $-$1.36  &  0.23  & $-$0.34 \\
169 & 2 & 2XMM J130028.5+283010 & 53~162.824  & 0.649 &  1 & 0   & 30.73  & 27.05  & $-$1.41  &  0.21  & $-$0.35 \\
169 & 3 & 2XMM J130028.5+283010 & 53~174.715  & 0.649 &  1 & 0   & 30.73  & 27.08  & $-$1.40  &  0.22  & $-$0.34 \\
169 & 4 & 2XMM J130028.5+283010 & 53~198.680  & 0.649 &  1 & 0   & 30.73  & 27.11  & $-$1.39  &  0.23  & $-$0.37 \\
170 & 1 & 2XMM J130048.1+282321 & 52~432.785  & 1.924 &  0 & 0   & 31.58  & 26.83  & $-$1.82  & $-$0.05  & $-$0.43 \\
170 & 2 & 2XMM J130048.1+282321 & 53~162.824  & 1.924 &  0 & 0   & 31.44  & 26.66  & $-$1.84  & $-$0.10  & $-$0.35 \\
170 & 3 & 2XMM J130048.1+282321 & 53~174.715  & 1.924 &  0 & 0   & 31.43  & 26.62  & $-$1.85  & $-$0.11  & $-$0.34 \\
170 & 4 & 2XMM J130048.1+282321 & 53~198.680  & 1.924 &  0 & 0   & 31.43  & 26.64  & $-$1.84  & $-$0.10  & $-$0.41 \\
171 &   & 2XMM J130257.8+673006 & 52~381.281  & 1.837 &  1 & 0   & 31.03  & 26.84  & $-$1.61  &  0.06  & $-$0.27 \\
172 &   & 2XMM J130454.3+673007 & 52~381.281  & 0.539 & $-$1 & 0   & 29.59  & 25.80  & $-$1.46  & $-$0.05  & $-$0.37 \\
173 &   & 2XMM J130942.2$-$014139 & 53~539.754  & 0.824 &  0 & 0   & 30.26  & 25.71  & $-$1.75  & $-$0.22  & $-$0.31 \\
174 &   & 2XMM J130952.0$-$013217 & 53~539.754  & 1.844 &  1 & 0   & 30.57  & 26.78  & $-$1.45  &  0.14  & $-$0.26 \\
175 &   & 2XMM J131817.6+324053 & 52~465.020  & 1.647 &  0 & 0   & 31.33  & 27.05  & $-$1.64  &  0.08  & $-$0.39 \\
176 &   & 2XMM J132419.8+053704 & 53~197.707  & 0.203 &  1 & 0   & 28.80  & 23.65  & $-$1.98  & $-$0.71  & $-$0.54 \\
177 &   & 2XMM J132607.0+655543 & 53~125.266  & 1.513 & $-$1 & 0   & 30.99  & 26.52  & $-$1.72  & $-$0.06  & $-$0.37 \\
178 &   & 2XMM J132623.0+011501 & 53~370.500  & 1.232 &  0 & 0   & 30.43  & 26.12  & $-$1.65  & $-$0.09  & $-$0.32 \\
179 &   & 2XMM J132711.1+011010 & 53~370.500  & 0.971 &  0 & 0   & 30.54  & 26.34  & $-$1.61  & $-$0.03  & $-$0.36 \\
180 &   & 2XMM J133526.7+405958 & 52~621.199  & 1.765 &  0 & 0   & 31.16  & 26.65  & $-$1.73  & $-$0.04  & $-$0.06 \\
181 &   & 2XMM J134044.5$-$004516 & 53~549.691  & 0.386 &  0 & 0   & 30.03  & 25.99  & $-$1.55  & $-$0.06  & $-$0.40 \\
182 &   & 2XMM J134113.9$-$005314 & 53~549.691  & 0.237 &  1 & 0   & 29.39  & 26.41  & $-$1.14  &  0.24  & $-$0.36 \\
183 &   & 2XMM J134252.9+403202 & 52~433.379  & 0.906 &  1 & 0   & 29.78  & 26.74  & $-$1.17  &  0.28  & $-$0.26 \\
184 & 1 & 2XMM J134256.5+000057 & 52~482.906  & 0.804 &  0 & 0   & 30.01  & 26.64  & $-$1.30  &  0.19  & $-$0.22 \\
184 & 2 & 2XMM J134256.5+000057 & 53~033.730  & 0.804 &  0 & 0   & 29.90  & 26.69  & $-$1.23  &  0.24  & $-$0.34 \\
185 &   & 2XMM J134740.9+581242 & 52~066.254  & 2.050 &  1 & 0   & 31.66  & 27.64  & $-$1.54  &  0.24  & $-$0.36 \\
186 &   & 2XMM J134749.8+582109 & 52~066.254  & 0.646 &  0 & 0   & 30.83  & 27.08  & $-$1.44  &  0.19  & $-$0.37 \\
187 &   & 2XMM J134834.2+262205 & 52~652.574  & 0.918 &  0 & 0   & 30.42  & 26.54  & $-$1.49  &  0.07  & $-$0.59 \\
188 &   & 2XMM J134848.2+262219 & 52~652.574  & 0.595 &  0 & 0   & 30.06  & 26.07  & $-$1.53  & $-$0.03  & $-$0.46 \\
189 &   & 2XMM J135639.1+051950 & 53~213.418  & 1.394 &  0 & 0   & 30.49  & 26.76  & $-$1.43  &  0.14  & $-$0.46 \\
190 &   & 2XMM J140040.4+621243 & 53~109.504  & 0.661 &  0 & 0   & 29.48  & 25.79  & $-$1.42  & $-$0.03  & $-$0.58 \\
191 & 1 & 2XMM J141642.3+521813 & 51~746.934  & 1.285 &  0 & 0   & 31.01  & 26.38  & $-$1.78  & $-$0.11  & $-$0.28 \\
191 & 2 & 2XMM J141642.3+521813 & 51~748.750  & 1.285 &  0 & 0   & 31.00  & 26.39  & $-$1.77  & $-$0.11  & $-$0.12 \\
191 & 3 & 2XMM J141642.3+521813 & 51~748.926  & 1.285 &  0 & 0   & 30.98  & 26.51  & $-$1.72  & $-$0.06  & $-$0.10 \\
192 &   & 2XMM J141700.7+445606 & 52~616.805  & 0.114 &  0 & 0   & 29.39  & 25.61  & $-$1.45  & $-$0.07  & $-$0.47 \\
193 &   & 2XMM J142355.5+383150 & 53~528.645  & 1.205 &  0 & 0   & 30.45  & 26.32  & $-$1.59  & $-$0.02  & $-$0.71 \\
194 &   & 2XMM J142406.6+383714 & 52~851.906  & 1.561 &  0 & 0   & 31.02  & 26.62  & $-$1.69  & $-$0.02  & $-$0.58 \\
195 & 1 & 2XMM J142435.9+421030 & 52~848.184  & 2.218 &  0 & 0   & 31.68  & 27.37  & $-$1.65  &  0.14  & $-$0.25 \\
195 & 2 & 2XMM J142435.9+421030 & 52~991.941  & 2.218 &  0 & 0   & 31.63  & 27.14  & $-$1.72  &  0.06  & $-$0.44 \\
196 & 1 & 2XMM J142455.5+421408 & 52~848.184  & 0.316 &  0 & 0   & 30.29  & 26.27  & $-$1.54  & $-$0.00  & $-$0.45 \\
196 & 2 & 2XMM J142455.5+421408 & 52~991.941  & 0.316 &  0 & 0   & 30.22  & 26.28  & $-$1.51  &  0.02  & $-$0.41 \\
197 &   & 2XMM J142904.3+012228 & 51~753.441  & 0.420 &  0 & 0   & 29.34  & 25.87  & $-$1.34  &  0.03  & $-$0.28 \\
198 &   & 2XMM J142917.6+012059 & 51~753.441  & 1.133 &  0 & 0   & 30.59  & 26.40  & $-$1.61  & $-$0.02  & $-$0.35 \\
199 &   & 2XMM J142931.5+012124 & 51~753.441  & 1.518 &  0 & 0   & 30.69  & 26.46  & $-$1.62  & $-$0.01  & $-$0.55 \\
200 &   & 2XMM J142943.0+474726 & 52~425.266  & 0.221 &  0 & 0   & 29.91  & 26.23  & $-$1.41  &  0.06  & $-$0.44 \\
201 & 1 & 2XMM J143025.8+415957 & 52~617.281  & 0.352 &  0 & 0   & 29.26  & 25.82  & $-$1.32  &  0.03  & $-$0.43 \\
201 & 2 & 2XMM J143025.8+415957 & 52~656.703  & 0.352 &  0 & 0   & 29.12  & 25.84  & $-$1.26  &  0.07  & $-$0.38 \\
202 &   & 2XMM J143424.9+033912 & 53~600.020  & 1.120 &  0 & 0   & 30.61  & 26.42  & $-$1.61  & $-$0.02  & $-$0.38 \\
203 &   & 2XMM J143440.4+484139 & 52~647.297  & 1.945 &  0 & 0   & 31.11  & 25.97  & $-$1.97  & $-$0.29  & $-$0.75 \\
204 &   & 2XMM J143506.5+033258 & 53~600.020  & 2.404 &  0 & 0   & 30.90  & 26.85  & $-$1.55  &  0.10  & $-$0.34 \\
205 &   & 2XMM J143513.9+484149 & 52~647.297  & 1.887 &  0 & 1   & 30.54  & 26.82  & $-$1.43  &  0.15  & $-$0.36 \\
206 &   & 2XMM J143621.2+484606 & 52~647.297  & 2.395 &  0 & 0   & 31.15  & 26.58  & $-$1.76  & $-$0.07  & $-$0.72 \\
207 &   & 2XMM J143822.0+642000 & 51~908.621  & 1.163 & $-$1 & 0   & 30.69  & 26.46  & $-$1.63  & $-$0.02  & $-$0.40 \\
208 &   & 2XMM J144414.6+063306 & 53~412.715  & 0.208 &  0 & 0   & 29.64  & 26.49  & $-$1.21  &  0.21  & $-$0.38 \\
209 &   & 2XMM J144645.9+403506 & 52~497.062  & 0.267 &  0 & 0   & 30.39  & 26.13  & $-$1.63  & $-$0.07  & $-$0.54 \\
210 &   & 2XMM J150121.9+014401 & 53~574.242  & 0.608 &  1 & 0   & 29.18  & 26.36  & $-$1.08  &  0.26  &  0.06 \\
211 &   & 2XMM J150148.8+014403 & 53~574.242  & 0.484 &  0 & 0   & 29.45  & 25.79  & $-$1.40  & $-$0.01  & $-$0.37 \\
212 &   & 2XMM J150948.6+333626 & 52~852.219  & 0.512 &  0 & 0   & 29.40  & 25.45  & $-$1.52  & $-$0.14  & $-$0.46 \\
213 &   & 2XMM J151443.0+365050 & 52~511.234  & 0.371 &  1 & 0   & 30.41  & 26.95  & $-$1.33  &  0.23  & $-$0.38 \\
214 &   & 2XMM J151551.6+000304 & 53~209.027  & 1.775 &  0 & 0   & 30.96  & 26.29  & $-$1.79  & $-$0.13  &  0.02 \\
215 &   & 2XMM J151630.2$-$010108 & 53~220.680  & 1.212 &  0 & 0   & 30.37  & 26.20  & $-$1.60  & $-$0.05  & $-$0.48 \\
216 &   & 2XMM J151630.2$-$005625 & 53~220.680  & 1.921 &  1 & 1   & 30.98  & 26.77  & $-$1.62  &  0.04  & $-$0.34 \\
217 &   & 2XMM J151652.7$-$005834 & 53~220.680  & 1.722 &  0 & 0   & 31.10  & 26.89  & $-$1.62  &  0.06  & $-$0.29 \\
218 &   & 2XMM J151842.8+424933 & 53~245.457  & 1.465 &  0 & 0   & 30.73  & 26.52  & $-$1.62  & $-$0.00  & $-$0.14 \\
219 & 1 & 2XMM J152553.8+513649 & 52~252.004  & 2.882 &  0 & 1   & 31.69  & 27.87  & $-$1.47  &  0.32  & $-$0.37 \\
219 & 2 & 2XMM J152553.8+513649 & 52~256.246  & 2.882 &  0 & 1   & 31.64  & 27.84  & $-$1.46  &  0.32  & $-$0.39 \\
220 &   & 2XMM J153322.8+324351 & 52~485.520  & 1.899 &  0 & 0   & 30.57  & 26.86  & $-$1.42  &  0.17  & $-$0.31 \\
221 &   & 2XMM J153438.1+553945 & 52~411.594  & 1.130 &  0 & 0   & 30.26  & 26.43  & $-$1.47  &  0.06  & $-$0.50 \\
222 &   & 2XMM J154530.3+484608 & 52~678.859  & 0.400 &  0 & 0   & 30.53  & 26.07  & $-$1.71  & $-$0.13  & $-$0.57 \\
223 &   & 2XMM J160106.2+084605 & 52~860.309  & 1.207 &  0 & 0   & 30.47  & 27.03  & $-$1.32  &  0.25  & $-$0.35 \\
224 &   & 2XMM J160658.2+271706 & 53~580.660  & 0.934 &  1 & 0   & 30.41  & 27.22  & $-$1.22  &  0.34  & $-$0.20 \\
225 & 1 & 2XMM J162855.6+394034 & 52~461.664  & 1.520 &  0 & 0   & 30.74  & 26.29  & $-$1.71  & $-$0.09  & $-$0.66 \\
225 & 2 & 2XMM J162855.6+394034 & 52~501.555  & 1.520 &  0 & 0   & 30.81  & 26.79  & $-$1.54  &  0.09  & $-$0.24 \\
226 &   & 2XMM J164221.1+390333 & 53~237.520  & 1.713 &  0 & 0   & 30.95  & 26.78  & $-$1.60  &  0.06  & $-$0.34 \\
227 &   & 2XMM J165713.2+352441 & 51~972.938  & 2.329 &  0 & 0   & 31.12  & 26.93  & $-$1.61  &  0.08  & $-$0.16 \\
228 &   & 2XMM J170100.6+641208 & 52~425.770  & 2.736 & $-$1 & 0   & 32.32  & 27.52  & $-$1.84  &  0.06  & $-$0.43 \\
229 & 1 & 2XMM J170639.3+240606 & 52~707.043  & 0.836 &  0 & 0   & 29.67  & 25.90  & $-$1.45  & $-$0.02  & $-$0.32 \\
229 & 2 & 2XMM J170639.3+240606 & 52~864.641  & 0.836 &  0 & 0   & 29.56  & 26.01  & $-$1.36  &  0.05  & $-$0.13 \\
230 &   & 2XMM J171359.4+640939 & 52~615.277  & 1.359 &  0 & 0   & 30.80  & 26.50  & $-$1.65  & $-$0.02  & $-$0.58 \\
231 &   & 2XMM J212909.6+001214 & 52~576.086  & 1.339 &  0 & 0   & 30.39  & 25.93  & $-$1.71  & $-$0.15  & $-$0.58 \\
232 & 1 & 2XMM J221738.4+001207 & 52~596.160  & 1.121 &  0 & 0   & 29.81  & 25.84  & $-$1.52  & $-$0.07  & $-$0.40 \\
232 & 2 & 2XMM J221738.4+001207 & 52~623.918  & 1.121 &  0 & 0   & 29.86  & 25.85  & $-$1.54  & $-$0.08  & $-$0.39 \\
233 & 1 & 2XMM J221751.3+001146 & 52~596.160  & 1.491 &  0 & 0   & 30.38  & 26.36  & $-$1.55  &  0.00  & $-$0.37 \\
233 & 2 & 2XMM J221751.3+001146 & 52~623.918  & 1.491 &  0 & 0   & 30.39  & 26.36  & $-$1.55  &  0.01  & $-$0.39 \\
234 & 1 & 2XMM J221755.2+001513 & 52~596.160  & 2.092 &  0 & 0   & 30.47  & 26.37  & $-$1.57  & $-$0.00  & $-$0.39 \\
234 & 2 & 2XMM J221755.2+001513 & 52~623.918  & 2.092 &  0 & 0   & 30.32  & 26.52  & $-$1.46  &  0.08  & $-$0.29 \\
235 &   & 2XMM J223607.6+134355 & 52~787.641  & 0.326 & $-$1 & 0   & 30.41  & 26.31  & $-$1.57  & $-$0.01  & $-$0.50 \\
236 &   & 2XMM J233706.4+002132 & 52~249.578  & 0.713 &  0 & 0   & 29.37  & 26.10  & $-$1.25  &  0.12  & $-$0.34 \\
237 &   & 2XMM J233707.2+002007 & 52~249.578  & 1.901 &  0 & 0   & 31.11  & 26.70  & $-$1.69  & $-$0.01  & $-$0.58 \\
238 &   & 2XMM J233722.0+002238 & 52~249.578  & 1.376 &  0 & 0   & 30.46  & 26.00  & $-$1.71  & $-$0.14  & $-$0.51 \\
239 &   & 2XMM J234715.3+005808 & 52~636.617  & 1.487 &  0 & 0   & 30.22  & 26.66  & $-$1.37  &  0.16  & $-$0.48 \\
240 &   & 2XMM J234715.9+005602 & 52~636.617  & 0.456 &  0 & 0   & 29.04  & 25.63  & $-$1.31  &  0.01  & $-$0.50 \\
241 &   & 2XMM J234724.7+005248 & 52~636.617  & 1.323 &  1 & 0   & 30.53  & 26.98  & $-$1.36  &  0.22  & $-$0.28 \\
 \end{tabular}
 \tablefoot{\tablefoottext{a}{1=radio-loud; 0=radio-quiet; -1=radio-unclassified.} \\
\tablefoottext{b}{1=BAL; 0=non-BAL}.}
 \end{table}