\begin{table}%t3
%\centering
\par
\caption{\label{tab:multiMP}Detectability of the moon in our standard scenario as  a function of assumed photometric uncertainty.}
     \begin{tabular}{ l r}
       \hline\hline\noalign{\smallskip}
       $\sigma$ in mmag & Detectability\\
       \hline
        \phantom{10}5  & 90.2\% \\
        \phantom{1}10  & 59.8\% \\
        \phantom{1}20  & 30.6\% \\
        \phantom{1}50  & 12.8\% \\
       100  &  1.5\% \\
       \hline
  \end{tabular} \vspace*{-2mm}
\end{table}