\begin{table}
%   \caption{Parameters of CH fine structure lines of the $N=1\leftarrow1$ transition. }
% \label{t:parameters}
% %\begin{center}
\par
%  \begin{tabular}{ccccc}
%  \hline\hline
%
% $ J$ &
% $ F$ & Frequency & $E_{l}/\kappa$ & $S$\\
%   &  & (MHz) & (K) & \\
% \hline
%
%          3/2$\leftarrow$ 1/2 & $1+\leftarrow1-$&532721.679 &  0.16&0.165 \\
%          3/2$\leftarrow$ 1/2 & $2+\leftarrow1-$&532723.926 &  0.16&0.827 \\
%          3/2$\leftarrow$ 1/2 & $1+\leftarrow0-$&532793.309 &  0.16&0.331 \\
%          3/2$\leftarrow$ 1/2 & $2-\leftarrow1+$&536761.145 &  0.0 &0.831\\
%          3/2$\leftarrow$ 1/2 & $1-\leftarrow1+$&536781.954 &  0.0 &0.166 \\
%          3/2$\leftarrow$ 1/2 & $1-\leftarrow0+$&536795.678 &  0.0&0.332 \\
% \hline
%  \end{tabular}
% %\end{center}
\par
% Note: { Taken from CDMS, see also Section 3. }
%
% \end{table}