\begin{table}%tb3
%%\centering

\par
\caption{\label{jan10carma}Julian day, flux, and uncertainty values for the millimeter light curve on 2010 January 11--12, recorded at a central frequency of 92.5~GHz with CARMA.} 
\begin{tabular}{cccccc}
\hline  \hline \noalign{\smallskip}
 ~Julian day & Flux & $\sigma$ &  ~Julian day & Flux & $\sigma$  \\
 ($+$2450000) & [mJy] & [mJy] & ($+$2450000) & [mJy] & [mJy]  \\
\hline
 5208.572  &  30.3  &	3.6  &  5208.843  &  18.6   &  3.4  \\
 5208.576  &  27.6  &	3.8  &  5208.847  &  18.1   &  4.0  \\
 5208.579  &  26.2  &	3.5  &  5208.850  &  25.3   &  4.0  \\
 5208.586  &  27.3  &	3.0  &  5208.857  &  17.4   &  4.1  \\
 5208.590  &  26.8  &	3.2  &  5208.860  &  14.9   &  4.4  \\
 5208.594  &  27.5  &	3.2  &  5208.864  &  18.1   &  4.9  \\
 5208.601  &  26.5  &	3.0  &  5208.879  &  19.9   &  4.9  \\
 5208.604  &  29.1  &	3.3  &  5208.883  &  23.3   &  6.2  \\
 5208.608  &  23.6  &	3.4  &  5208.886  &  21.5   &  5.3  \\
 5208.615  &  20.8  &	3.6  &  5208.893  &  18.5   &  5.2  \\
 5208.618  &  17.0  &	3.9  &  5208.897  &  13.1   &  5.5  \\
 5208.622  &  15.2  &	4.4  &  5208.900  &  11.2   &  5.7  \\
 5208.628  &  28.4  &	3.7  &  5208.907  &  9.4    &  5.9  \\
 5208.632  &  27.0  &	3.5  &  5208.910  &  9.6    &  6.2  \\
 5208.636  &  23.0  &	3.7  &  5208.914  &  10.1   &  6.1  \\
 5208.643  &  28.5  &	3.1  &  5208.921  &  12.4   &  7.7  \\
 5208.647  &  21.8  &	3.0  &   ~ &  ~ &  ~ \\
 5208.650  &  24.3  &	3.0  &   ~ &  ~ &  ~ \\
 5208.657  &  21.1  &	3.1  &   ~ &  ~ &  ~ \\
 5208.660  &  16.1  &	3.1  &   ~ &  ~ &  ~ \\
 5208.664  &  21.1  &	3.0  &   ~ &  ~ &  ~ \\
 5208.671  &  29.8  &	3.1  &   ~ &  ~ &  ~ \\
 5208.674  &  29.9  &	8.0  &   ~ &  ~ &  ~ \\
 5208.678  &  20.2  &	3.2  &   ~ &  ~ &  ~ \\
 5208.685  &  13.1  &	2.9  &   ~ &  ~ &  ~ \\
 5208.689  &  18.4  &	2.9  &   ~ &  ~ &  ~ \\
 5208.692  &  18.9  &	3.1  &   ~ &  ~ &  ~ \\
 5208.700  &  21.1  &	3.0  &   ~ &  ~ &  ~ \\
 5208.703  &  29.2  &	3.1  &   ~ &  ~ &  ~ \\
 5208.707  &  19.1  &	3.0  &   ~ &  ~ &  ~ \\
 5208.714  &  24.7  &	2.8  &   ~ &  ~ &  ~ \\
 5208.717  &  25.6  &	7.7  &   ~ &  ~ &  ~ \\
 5208.721  &  20.3  &	4.0  &   ~ &  ~ &  ~ \\
 5208.728  &  24.4  &	3.5  &   ~ &  ~ &  ~ \\
 5208.732  &  22.0  &	3.8  &   ~ &  ~ &  ~ \\
 5208.735  &  17.8  &	4.1  &   ~ &  ~ &  ~ \\
 5208.743  &  23.4  &	3.7  &   ~ &  ~ &  ~ \\
 5208.747  &  30.9  &	3.8  &   ~ &  ~ &  ~ \\
 5208.750  &  24.8  &	3.8  &   ~ &  ~ &  ~ \\
 5208.757  &  21.3  &	3.4  &   ~ &  ~ &  ~ \\
 5208.760  &  19.9  &	3.4  &   ~ &  ~ &  ~ \\
 5208.765  &  19.5  &	3.3  &   ~ &  ~ &  ~ \\
 5208.772  &  22.0  &	3.1  &   ~ &  ~ &  ~ \\
 5208.775  &  21.1  &	3.2  &   ~ &  ~ &  ~ \\
 5208.778  &  18.7  &	3.5  &   ~ &  ~ &  ~ \\
 5208.786  &  2.8   &	3.1  &   ~ &  ~ &  ~ \\
 5208.790  &  25.1  &	5.7  &   ~ &  ~ &  ~ \\
 5208.794  &  18.9  &	4.3  &   ~ &  ~ &  ~ \\
 5208.801  &  16.7  &	3.2  &   ~ &  ~ &  ~ \\
 5208.804  &  22.4  &	3.5  &   ~ &  ~ &  ~ \\
 5208.808  &  17.0  &	3.7  &   ~ &  ~ &  ~ \\
 5208.815  &  21.0  &	3.5  &   ~ &  ~ &  ~ \\
 5208.819  &  15.6  &	3.5  &   ~ &  ~ &  ~ \\
 5208.822  &  1.3   &	3.7  &   ~ &  ~ &  ~ \\
 5208.829  &  9.7   &	3.4  &   ~ &  ~ &  ~ \\
 5208.833  &  20.9  &	3.6  &   ~ &  ~ &  ~ \\
 5208.836  &  4.0   &	3.7  &   ~ &  ~ &  ~ \\		      
\hline			      
\end{tabular}		      
\end{table}