rγ radio index

0.2 0.4 0.6 0.8 1 1.2

Number of objects

0

10

20

30

40

50

60 Radio index 0.01 ± = 0.48 γ 0.01 ± = 0.15 σ /dof = 3.1/7 2χ

Delahaye, Lavalle, Lineros, Donato & Fornengo (2010)