0 1 2 3 4 x 10^{-12} 0

0.5

1

1.5

2

Turbulence energy integrals (m^{1/3})

Frequency (%)

0 0.5 1 1.5 x 10^{-12} 0 2 4 6 8 10 TOT (>2m) FA (>500m) a b