/ ndf

2χ 111.1 / 60 Constant 0.106±

4.244 Slope 0.090± -1.129

>1 TeV [Crab] VHE F 0 1 2 3 4 5 6 7 8 9 10

# observations

-2 10

-1 10

1

10