/ ndf

2χ 74.62 / 64

Gauss

N 7.99± 48.08

Gauss

μ 0.0249 ± 0.3285

Gauss

σ 0.0186 ± 0.1137

LnN 3.27± 45.55 Lnσ 0.052 ± 1.022 Lnμ 0.1086 ± 0.1025

>1TeV [Crab] VHE F 0 1 2 3 4 5 6 7 8 9 10

# observations

-2 10

-1 10

1

10 ± ± ± ±