-1.8 -1.6 -1.4 -1.2 -1 -0.8 -0.6

-0.5

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 0.4 0.5

[Fe/H]

[N/Fe]

M9 M10 M310 M11 M12 P data T data