B1351+267

DECLINATION (J2000)

RIGHT ASCENSION (J2000)

13 53 35.930 35.928 35.926 35.924 35.922 35.920

26 31 47.60

47.58

47.56

47.54

47.52

47.50

47.48

47.46

47.44