0.0000

0.0005

0.0010

0.0015

0.0000

0.0005

0.0010

0.0015

0.0020

230 240 250 260 270 280

0.0000

0.0005

0.0010

0.0015

Collision strength

Radiation damping

Without damping b) Ar^{15+}

Energy (Ryd)

Auger- plus Radiation damping GS83