0.000

0.002

0.004

0.006

0.008

0.000

0.002

0.004

0.006

0.008

0.010

500 520 540 560 580 600

0.000

0.002

0.004

0.006

0.008

Collision strength

Radiation damping c) Fe^{23+}

Without damping

Energy (Ryd)

Auger- plus Radiation damping GS83 AS-DW