0.001

0.002

0.003

0.004

0.001

0.002

0.003

0.004

0.005

960 1000 1040 1080 1120 1160 1200

0.001

0.002

0.003

0.004

Collision strength

Radiation damping

Without damping d) Kr^{33+}

Energy (Ryd)

Auger- plus Radiation damping GS83