10^3 10^4 10^5 10^6 0 10 20 30 40 50 60 70 80 90 100 A+R vs

R

A+R vs

U

R vs

U

Percentage (%)

Temperature ((z+1)^2 K)

10% 20% 30% d) Ar^{15+}